 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_LSS_CAL305.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     LSS       FORS2.1999-11-01T21:07:40.444
 FORS2_LSS_CAL305.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     LSS       FORS2.1999-11-01T21:31:40.847
 FORS2_LSS_CAL305.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     LSS       FORS2.1999-11-01T21:34:06.065
 FORS2_LSS_CAL305.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     LSS       FORS2.1999-11-01T21:35:30.303
 FORS2_LSS_CAL305.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     LSS       FORS2.1999-11-01T21:37:03.934
 FORS2_IMG305.fits                          60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-01T21:43:52.743
 FORS2_IMG_CAL305.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016700 FORS2     IMG       FORS2.1999-11-01T21:44:51.141
 FORS2_IMG_CALSKY305.fits                   60.A-9203(C)    TEST       1275525000  -142440012             2.007100 FORS2     IMG       FORS2.1999-11-01T23:27:52.639
 FORS2_IMG_CALSKY305.1.fits                 60.A-9203(C)    CALIB      1275525000  -142440012             8.701000 FORS2     IMG       FORS2.1999-11-01T23:28:34.037
 FORS2_IMG_CALSKY305.2.fits                 60.A-9203(C)    TEST       1275525000  -142440012             2.007800 FORS2     IMG       FORS2.1999-11-01T23:31:12.269
 FORS2_IMG_CALSKY305.3.fits                 60.A-9203(C)    CALIB      1275525000  -142440012            29.171900 FORS2     IMG       FORS2.1999-11-01T23:31:53.264
 FORS2_IMG_CALSKY305.4.fits                 60.A-9203(C)    CALIB      1275512029  -142440012            45.225000 FORS2     IMG       FORS2.1999-11-01T23:33:17.245
 FORS2_IMG_CALSKY305.5.fits                 60.A-9203(C)    CALIB      1275486087  -142440012            64.196000 FORS2     IMG       FORS2.1999-11-01T23:34:54.795
 FORS2_IMG_CALSKY305.6.fits                 60.A-9203(C)    TEST       1275525000  -142440012             1.996200 FORS2     IMG       FORS2.1999-11-01T23:38:09.228
 FORS2_IMG_CALSKY305.7.fits                 60.A-9203(C)    CALIB      1275525000  -142440012            59.145800 FORS2     IMG       FORS2.1999-11-01T23:38:50.254
 FORS2_IMG_CALSKY305.8.fits                 60.A-9203(C)    CALIB      1275537970  -142440012            97.218100 FORS2     IMG       FORS2.1999-11-01T23:40:42.351
 FORS2_IMG_CALSKY305.9.fits                 60.A-9203(C)    CALIB      1275563912  -142440012           158.690000 FORS2     IMG       FORS2.1999-11-01T23:43:11.697
 FORS2_STD305.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             7.000000 FORS2     IMG       FORS2.1999-11-01T23:58:56.130
 FORS2_STD305.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             7.002000 FORS2     IMG       FORS2.1999-11-02T00:00:04.608
 FORS2_STD306.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             5.003100 FORS2     IMG       FORS2.1999-11-02T00:01:13.081
 FORS2_STD306.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            10.010000 FORS2     IMG       FORS2.1999-11-02T00:02:20.105
 FORS2_STD306.2.fits                        60.A-9203(C)    CALIB      1119525001   -38730996             7.002500 FORS2     IMG       FORS2.1999-11-02T00:14:26.187
 FORS2_STD306.3.fits                        60.A-9203(C)    CALIB      1119697988   -38561004             7.001100 FORS2     IMG       FORS2.1999-11-02T00:15:59.732
 FORS2_STD306.4.fits                        60.A-9203(C)    CALIB      1119351992   -38561040             7.004700 FORS2     IMG       FORS2.1999-11-02T00:20:44.012
 FORS2_STD306.5.fits                        60.A-9203(C)    CALIB      1119351956   -38900988             7.002200 FORS2     IMG       FORS2.1999-11-02T00:22:44.782
 FORS2_STD306.6.fits                        60.A-9203(C)    CALIB      1119698060   -38900988             7.002900 FORS2     IMG       FORS2.1999-11-02T00:24:12.279
 FORS2_STD306.7.fits                        60.A-9203(C)    CALIB      1119525001   -38730996             6.992900 FORS2     IMG       FORS2.1999-11-02T00:26:27.261
 FORS2_STD306.8.fits                        60.A-9203(C)    CALIB      1119697988   -38561004             7.000000 FORS2     IMG       FORS2.1999-11-02T00:28:21.026
 FORS2_STD306.9.fits                        60.A-9203(C)    CALIB      1119351992   -38561040             7.002600 FORS2     IMG       FORS2.1999-11-02T00:30:31.753
 FORS2_STD306.10.fits                       60.A-9203(C)    CALIB      1119351956   -38900988             7.002700 FORS2     IMG       FORS2.1999-11-02T00:32:06.869
 FORS2_STD306.11.fits                       60.A-9203(C)    CALIB      1119698060   -38900988             7.004900 FORS2     IMG       FORS2.1999-11-02T00:33:38.494
 FORS2_STD306.12.fits                       60.A-9203(C)    CALIB      1119525001   -38730996             4.995800 FORS2     IMG       FORS2.1999-11-02T00:35:36.761
 FORS2_STD306.13.fits                       60.A-9203(C)    CALIB      1119697988   -38561004             4.990300 FORS2     IMG       FORS2.1999-11-02T00:37:23.580
 FORS2_STD306.14.fits                       60.A-9203(C)    CALIB      1119351992   -38561040             4.994900 FORS2     IMG       FORS2.1999-11-02T00:39:42.849
 FORS2_STD306.15.fits                       60.A-9203(C)    CALIB      1119351956   -38900988             5.007500 FORS2     IMG       FORS2.1999-11-02T00:42:58.675
 FORS2_STD306.16.fits                       60.A-9203(C)    CALIB      1119698060   -38900988             4.997500 FORS2     IMG       FORS2.1999-11-02T00:44:28.954
 FORS2_STD306.17.fits                       60.A-9203(C)    CALIB      1119525001   -38730996            10.000200 FORS2     IMG       FORS2.1999-11-02T00:46:37.788
 FORS2_STD306.18.fits                       60.A-9203(C)    CALIB      1119697988   -38561004            10.000200 FORS2     IMG       FORS2.1999-11-02T00:48:45.894
 FORS2_STD306.19.fits                       60.A-9203(C)    CALIB      1119351992   -38561040            10.001500 FORS2     IMG       FORS2.1999-11-02T00:50:12.718
 FORS2_STD306.20.fits                       60.A-9203(C)    CALIB      1119351956   -38900988             9.997500 FORS2     IMG       FORS2.1999-11-02T00:51:47.712
 FORS2_STD306.21.fits                       60.A-9203(C)    CALIB      1119698060   -38900988            10.010500 FORS2     IMG       FORS2.1999-11-02T00:53:18.029
 test.fits                                  NULL            TEST      -2147483648 -2147483648             0.018300 FORS2     FREE      FORS2.1999-11-02T01:02:30.786
 test.1.fits                                NULL            TEST      -2147483648 -2147483648             0.019000 FORS2     FREE      FORS2.1999-11-02T01:05:01.827
 FORS2_STD306.22.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             6.996100 FORS2     IMG       FORS2.1999-11-02T01:11:06.434
 FORS2_STD306.23.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             7.006300 FORS2     IMG       FORS2.1999-11-02T01:12:15.601
 FORS2_STD306.24.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             5.007500 FORS2     IMG       FORS2.1999-11-02T01:13:25.590
 FORS2_STD306.25.fits                       60.A-9203(C)    CALIB      1119577500   -38788992            10.000000 FORS2     IMG       FORS2.1999-11-02T01:14:31.963
 FORS2_STD306.26.fits                       60.A-9203(C)    CALIB      1259624998   -61530012            10.002100 FORS2     IMG       FORS2.1999-11-02T01:23:07.001
 FORS2_STD306.27.fits                       60.A-9203(C)    CALIB      1265500501    57620988            10.002400 FORS2     IMG       FORS2.1999-11-02T01:30:13.604
 FORS2_IMG306.fits                          60.A-9203(C)    SCIENCE     110306998   -73134000             0.250000 FORS2     IMG       FORS2.1999-11-02T01:42:08.609
 FORS2_IMG306.1.fits                        60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T01:56:58.453
 FORS2_IMG306.2.fits                        60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T01:58:12.155
 FORS2_IMG306.3.fits                        60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T01:59:14.506
 FORS2_IMG306.4.fits                        60.A-9203(C)    SCIENCE     110306998   -73134000             0.250000 FORS2     IMG       FORS2.1999-11-02T02:05:33.807
 FORS2_IMG306.5.fits                        60.A-9203(C)    SCIENCE     110306998   -73134000             0.250000 FORS2     IMG       FORS2.1999-11-02T02:06:38.692
 FORS2_IMG306.6.fits                        60.A-9203(C)    SCIENCE     110306998   -73134000             0.273600 FORS2     IMG       FORS2.1999-11-02T02:07:43.190
 FORS2_IMG306.7.fits                        60.A-9203(C)    SCIENCE     110306998   -73134000             0.250000 FORS2     IMG       FORS2.1999-11-02T02:08:45.690
 FORS2_IMG306.8.fits                        60.A-9203(C)    SCIENCE       8178300    -2220696           299.950400 FORS2     IMG       FORS2.1999-11-02T02:14:21.046
 FORS2_IMG306.9.fits                        60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T02:22:53.246

Nov 15, 99 16:38 Page 1/3

CD.1999-11-01

Printed by Eckhard Sutorius

FORS 2 1/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG306.10.fits                       60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T02:23:56.013
 FORS2_IMG306.11.fits                       60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-02T02:25:04.511
 FORS2_IMG306.12.fits                       60.A-9203(C)    SCIENCE   -2147483648 -2147483648             0.274300 FORS2     IMG       FORS2.1999-11-02T02:26:06.841
 FORS2_IMG306.13.fits                       60.A-9203(C)    SCIENCE       8084998    -2282004           299.992800 FORS2     IMG       FORS2.1999-11-02T02:31:21.802
 FORS2_IMG306.14.fits                       60.A-9203(C)    SCIENCE     143857501    -5708016           598.973100 FORS2     IMG       FORS2.1999-11-02T02:42:51.231
 FORS2_IMG306.15.fits                       60.A-9203(C)    SCIENCE     171492001   -35106012            20.000000 FORS2     IMG       FORS2.1999-11-02T03:01:51.181
 FORSFieldAcq306.fits                       NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-02T03:17:09.236
 FORS2_IMG306.16.fits                       60.A-9203(C)    SCIENCE      59454000   -92746008           599.986700 FORS2     IMG       FORS2.1999-11-02T03:35:19.720
 FORS2_IMG306.17.fits                       60.A-9203(C)    SCIENCE     215167201  -165148704            29.998000 FORS2     IMG       FORS2.1999-11-02T03:52:21.678
 FORS2_IMG306.18.fits                       60.A-9203(C)    SCIENCE     215152837  -165148704           120.000500 FORS2     IMG       FORS2.1999-11-02T03:59:00.481
 FORS2_IMG306.19.fits                       60.A-9203(C)    SCIENCE     215152837  -165148704           100.003000 FORS2     IMG       FORS2.1999-11-02T04:02:02.991
 FORS2_IMG306.20.fits                       60.A-9203(C)    SCIENCE     215152837  -165148704           119.990600 FORS2     IMG       FORS2.1999-11-02T04:04:45.335
 FORS2_IMG306.22.fits                       60.A-9203(C)    SCIENCE     215152837  -165148704           499.978100 FORS2     IMG       FORS2.1999-11-02T04:15:03.207
 FORSFieldAcq306.1.fits                     NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-02T04:46:21.450
 FORS2_MOS306.fits                          60.A-9203(C)    SCIENCE      50487102  -260870616             4.997500 FORS2     MOS       FORS2.1999-11-02T04:51:28.843
 FORS2_IMG306.23.fits                       60.A-9203(C)    SCIENCE      50487102  -260870616             5.003000 FORS2     IMG       FORS2.1999-11-02T04:52:52.879
 FORS2_MOS306.1.fits                        60.A-9203(C)    SCIENCE      50487102  -260870616           179.990300 FORS2     MOS       FORS2.1999-11-02T05:00:39.020
 FORS2_MOS306.2.fits                        60.A-9203(C)    SCIENCE      50487102  -260870616           180.000400 FORS2     MOS       FORS2.1999-11-02T05:39:23.115
 FORS2_MOS306.3.fits                        60.A-9203(C)    SCIENCE      50487102  -260870616           239.985300 FORS2     MOS       FORS2.1999-11-02T05:45:25.826
 FORS2_MOS306.4.fits                        60.A-9203(C)    SCIENCE      50487102  -260870616           239.995400 FORS2     MOS       FORS2.1999-11-02T05:53:11.033
 FORS2_MOS306.5.fits                        60.A-9203(C)    SCIENCE      50487102  -260870616           179.987900 FORS2     MOS       FORS2.1999-11-02T05:59:56.466
 FORS2_HTR_ACQ.fits                         NULL            SCIENCE     301078501    79251984             3.963700 FORS2     FREE      FORS2.1999-11-02T06:23:52.204
 FORS2_HTR_ACQ306.fits                      NULL            SCIENCE     301078501    79251984            60.006500 FORS2     FREE      FORS2.1999-11-02T06:30:05.845
 FORS2_HTR_ACQ306.1.fits                    NULL            SCIENCE     301078501    79251984            29.999300 FORS2     FREE      FORS2.1999-11-02T06:37:14.883
 FORS2_HTR_ACQ306.2.fits                    NULL            SCIENCE     301073104    79246116            29.998600 FORS2     FREE      FORS2.1999-11-02T06:45:12.677
 FORS2_HTR_ACQ306.3.fits                    NULL            SCIENCE     301073968    79245504            30.012000 FORS2     FREE      FORS2.1999-11-02T06:53:06.636
 FORS2_HTR_ACQ306.4.fits                    NULL            SCIENCE     301072244    79246692            30.003400 FORS2     FREE      FORS2.1999-11-02T06:56:43.475
 FORS2_HTR_ACQ306.5.fits                    NULL            SCIENCE     301071898    79246440            29.995600 FORS2     FREE      FORS2.1999-11-02T07:01:55.629
 FORS2_HTR_ACQ306.6.fits                    NULL            SCIENCE     301072590    79246944            29.995200 FORS2     FREE      FORS2.1999-11-02T07:05:46.822
 FORS2_IMG306.24.fits                       60.A-9203(C)    SCIENCE     299700000   -23280012           599.983700 FORS2     IMG       FORS2.1999-11-02T07:51:36.474
 FORS2_IMG306.25.fits                       60.A-9203(C)    SCIENCE     301892698   -23167512           299.982600 FORS2     IMG       FORS2.1999-11-02T08:11:07.773
 FORS2_IMG306.26.fits                       60.A-9203(C)    SCIENCE     301953085   -23167512           299.985300 FORS2     IMG       FORS2.1999-11-02T08:27:31.330
 FORS2_IMG306.27.fits                       60.A-9203(C)    SCIENCE     301953085   -23167512           599.975400 FORS2     IMG       FORS2.1999-11-02T08:36:24.060
 FORS2_IMG_CALSKY306.fits                   60.A-9203(C)    TEST        598335001   -97209000             2.006700 FORS2     IMG       FORS2.1999-11-02T08:56:55.269
 FORS2_IMG_CALSKY306.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.996100 FORS2     IMG       FORS2.1999-11-02T08:59:19.728
 FORS2_IMG_CALSKY306.2.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.998200 FORS2     IMG       FORS2.1999-11-02T09:10:31.767
 FORS2_IMG_CALSKY306.3.fits                 60.A-9203(C)    CALIB       598335001   -97198992            37.548400 FORS2     IMG       FORS2.1999-11-02T09:11:14.534
 FORS2_IMG_CALSKY306.4.fits                 60.A-9203(C)    CALIB       598335001   -97188984            29.748000 FORS2     IMG       FORS2.1999-11-02T09:12:44.945
 FORS2_IMG_CALSKY306.5.fits                 60.A-9203(C)    CALIB       598335001   -97179012            22.129400 FORS2     IMG       FORS2.1999-11-02T09:14:07.765
 FORS2_IMG_CALSKY306.6.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.999500 FORS2     IMG       FORS2.1999-11-02T09:15:41.490
 FORS2_IMG_CALSKY306.7.fits                 60.A-9203(C)    CALIB       598335001   -97219008            20.061200 FORS2     IMG       FORS2.1999-11-02T09:16:23.685
 FORS2_IMG_CALSKY306.8.fits                 60.A-9203(C)    CALIB       598335001   -97229016            15.395500 FORS2     IMG       FORS2.1999-11-02T09:17:36.845
 FORS2_IMG_CALSKY306.9.fits                 60.A-9203(C)    CALIB       598335001   -97238988            11.713800 FORS2     IMG       FORS2.1999-11-02T09:18:44.965
 FORS2_IMG_CALSKY306.10.fits                60.A-9203(C)    TEST        598335001   -97209000             1.998100 FORS2     IMG       FORS2.1999-11-02T09:20:14.290
 FORS2_IMG_CALSKY306.11.fits                60.A-9203(C)    CALIB       598335001   -97198992             6.945700 FORS2     IMG       FORS2.1999-11-02T09:20:56.696
 FORS2_IMG_CALSKY306.12.fits                60.A-9203(C)    CALIB       598335001   -97188984             4.901000 FORS2     IMG       FORS2.1999-11-02T09:21:56.230
 FORS2_IMG_CALSKY306.13.fits                60.A-9203(C)    CALIB       598335001   -97179012             3.639800 FORS2     IMG       FORS2.1999-11-02T09:22:54.701
 FORS2_IMG_CALSKY306.14.fits                60.A-9203(C)    TEST        598335001   -97209000             1.999900 FORS2     IMG       FORS2.1999-11-02T09:24:24.418
 FORS2_IMG_CALSKY306.15.fits                60.A-9203(C)    CALIB       598335001   -97219008             2.929300 FORS2     IMG       FORS2.1999-11-02T09:25:06.444
 FORS2_IMG_CALSKY306.16.fits                60.A-9203(C)    CALIB       598335001   -97229016             2.221000 FORS2     IMG       FORS2.1999-11-02T09:26:02.637
 FORS2_IMG_CALSKY306.17.fits                60.A-9203(C)    CALIB       598335001   -97238988             1.756000 FORS2     IMG       FORS2.1999-11-02T09:26:58.135
 FORS2_IMG_CAL306.fits                      60.A-9203(C)    CALIB       598335001   -97229016             0.022000 FORS2     IMG       FORS2.1999-11-02T09:29:35.389
 FORS2_IMG_CAL306.1.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.020200 FORS2     IMG       FORS2.1999-11-02T09:30:24.081
 FORS2_IMG_CAL306.2.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020200 FORS2     IMG       FORS2.1999-11-02T09:31:13.004
 FORS2_IMG_CAL306.3.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.020300 FORS2     IMG       FORS2.1999-11-02T09:32:02.259
 FORS2_IMG_CAL306.4.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020100 FORS2     IMG       FORS2.1999-11-02T09:32:51.355
 FORS2_IMG_CAL306.5.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.017600 FORS2     IMG       FORS2.1999-11-02T09:33:47.776
 FORS2_IMG_CAL306.6.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019800 FORS2     IMG       FORS2.1999-11-02T09:34:37.814
 FORS2_IMG_CAL306.7.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.019900 FORS2     IMG       FORS2.1999-11-02T09:35:26.866

Nov 15, 99 16:38 Page 2/3

CD.1999-11-01

Printed by Eckhard Sutorius

FORS 2 2/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CAL306.8.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019800 FORS2     IMG       FORS2.1999-11-02T09:36:16.311
 FORS2_IMG_CAL306.9.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.019800 FORS2     IMG       FORS2.1999-11-02T09:37:05.357
 FORS2_IMG_CAL306.10.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.020000 FORS2     IMG       FORS2.1999-11-02T09:38:59.939
 FORS2_IMG_CAL306.11.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.019100 FORS2     IMG       FORS2.1999-11-02T09:40:48.334
 FORS2_IMG_CAL306.12.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.018300 FORS2     IMG       FORS2.1999-11-02T09:42:36.134
 FORS2_IMG_CAL306.13.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.020400 FORS2     IMG       FORS2.1999-11-02T09:44:24.166
 FORS2_IMG_CAL306.14.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.019200 FORS2     IMG       FORS2.1999-11-02T09:46:12.051
 FORS2_IMG_CAL306.15.fits                   60.A-9203(C)    CALIB       598364571   -97229664             0.015600 FORS2     IMG       FORS2.1999-11-02T09:48:05.191
 FORS2_IMG_CAL306.16.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.018200 FORS2     IMG       FORS2.1999-11-02T09:49:53.534
 FORS2_IMG_CAL306.17.fits                   60.A-9203(C)    CALIB       598364571   -97229664             0.020600 FORS2     IMG       FORS2.1999-11-02T09:51:41.413
 FORS2_IMG_CAL306.18.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.020300 FORS2     IMG       FORS2.1999-11-02T09:53:29.236
 FORS2_IMG_CAL306.19.fits                   60.A-9203(C)    CALIB       598364571   -97229664             0.020200 FORS2     IMG       FORS2.1999-11-02T09:55:17.060

Nov 15, 99 16:38 Page 3/3

CD.1999-11-01

Printed by Eckhard Sutorius

FORS 2 3/3