 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 focus_V_SR.3.fits                          NULL            NULL      -2147483648 -2147483648            10.012100 FORS2     FREE      FORS2.1999-11-02T16:11:39.476
 focus_V_SR.4.fits                          NULL            NULL      -2147483648 -2147483648            10.000000 FORS2     FREE      FORS2.1999-11-02T16:12:25.721
 focus_V_SR.5.fits                          NULL            NULL      -2147483648 -2147483648            10.000200 FORS2     FREE      FORS2.1999-11-02T16:13:11.691
 focus_V_SR.6.fits                          NULL            NULL      -2147483648 -2147483648             9.998100 FORS2     FREE      FORS2.1999-11-02T16:13:57.504
 focus_V_SR.7.fits                          NULL            NULL      -2147483648 -2147483648            10.000000 FORS2     FREE      FORS2.1999-11-02T16:14:43.936
 focus_V_SR.8.fits                          NULL            NULL      -2147483648 -2147483648            10.000000 FORS2     FREE      FORS2.1999-11-02T16:15:29.765
 focus_V_SR.9.fits                          NULL            NULL      -2147483648 -2147483648            10.000200 FORS2     FREE      FORS2.1999-11-02T16:16:15.745
 focus_V_HR.fits                            NULL            NULL      -2147483648 -2147483648            39.999400 FORS2     FREE      FORS2.1999-11-02T16:23:49.935
 focus_V_HR.1.fits                          NULL            NULL      -2147483648 -2147483648            39.995800 FORS2     FREE      FORS2.1999-11-02T16:25:05.941
 focus_V_HR.2.fits                          NULL            NULL      -2147483648 -2147483648            39.997500 FORS2     FREE      FORS2.1999-11-02T16:26:22.089
 focus_V_HR.3.fits                          NULL            NULL      -2147483648 -2147483648            39.997900 FORS2     FREE      FORS2.1999-11-02T16:27:38.076
 focus_V_HR.4.fits                          NULL            NULL      -2147483648 -2147483648            40.000000 FORS2     FREE      FORS2.1999-11-02T16:28:54.731
 focus_V_HR.5.fits                          NULL            NULL      -2147483648 -2147483648            39.995700 FORS2     FREE      FORS2.1999-11-02T16:30:10.701
 focus_V_HR.6.fits                          NULL            NULL      -2147483648 -2147483648            40.006800 FORS2     FREE      FORS2.1999-11-02T16:31:26.782
 test.2.fits                                NULL            TEST      -2147483648 -2147483648            20.000000 FORS2     FREE      FORS2.1999-11-02T19:55:01.905
 focus_V_HR.7.fits                          NULL            NULL      -2147483648 -2147483648            40.000000 FORS2     FREE      FORS2.1999-11-02T19:58:06.549
 focus_V_HR.8.fits                          NULL            NULL      -2147483648 -2147483648            16.367500 FORS2     FREE      FORS2.1999-11-02T19:59:22.971
 test.3.fits                                NULL            TEST      -2147483648 -2147483648            39.999800 FORS2     FREE      FORS2.1999-11-02T20:00:26.983
 test.4.fits                                NULL            TEST      -2147483648 -2147483648            15.419600 FORS2     FREE      FORS2.1999-11-02T20:02:35.741
 test.5.fits                                NULL            TEST      -2147483648 -2147483648            20.000300 FORS2     FREE      FORS2.1999-11-02T20:45:07.895
 test.6.fits                                NULL            TEST      -2147483648 -2147483648            19.995400 FORS2     FREE      FORS2.1999-11-02T20:48:15.196
 scaleHR.fits                               NULL            TEST      -2147483648 -2147483648            19.999500 FORS2     FREE      FORS2.1999-11-02T20:51:24.624
 scaleHR.1.fits                             NULL            TEST      -2147483648 -2147483648             1.997400 FORS2     FREE      FORS2.1999-11-02T20:53:04.870
 scaleSR.fits                               NULL            TEST      -2147483648 -2147483648             1.002800 FORS2     FREE      FORS2.1999-11-02T20:58:22.127
 FORS2_MOS_CAL306.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            11.999200 FORS2     MOS       FORS2.1999-11-02T21:02:32.552
 FORS2_MOS_CAL306.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.995400 FORS2     MOS       FORS2.1999-11-02T21:06:25.114
 FORS2_MOS_CAL306.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            12.012900 FORS2     MOS       FORS2.1999-11-02T21:08:29.326
 FORS2_MOS_CAL306.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.999100 FORS2     MOS       FORS2.1999-11-02T21:10:33.965
 FORS2_MOS_CAL306.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            75.012000 FORS2     MOS       FORS2.1999-11-02T21:13:20.929
 FORS2_MOS_CAL306.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.995000 FORS2     MOS       FORS2.1999-11-02T21:18:18.256
 mos_lighttight.fits                        NULL            TEST      -2147483648 -2147483648           299.987900 FORS2     FREE      FORS2.1999-11-02T21:24:52.902
 mos_lighttight.1.fits                      NULL            TEST      -2147483648 -2147483648           299.995100 FORS2     FREE      FORS2.1999-11-02T21:31:49.397
 FORS2_IMG_CAL306.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017000 FORS2     IMG       FORS2.1999-11-02T21:42:12.453
 FORS2_IMG_CAL306.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021600 FORS2     IMG       FORS2.1999-11-02T21:43:00.736
 FORS2_IMG_CAL306.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-02T21:43:49.712
 FORS2_IMG_CAL306.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021500 FORS2     IMG       FORS2.1999-11-02T21:44:37.543
 FORS2_IMG_CAL306.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018400 FORS2     IMG       FORS2.1999-11-02T21:45:26.464
 FORS2_IMG_CAL306.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-02T21:46:19.535
 FORS2_IMG_CAL306.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018700 FORS2     IMG       FORS2.1999-11-02T21:47:07.784
 FORS2_IMG_CAL306.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021100 FORS2     IMG       FORS2.1999-11-02T21:47:56.013
 FORS2_IMG_CAL306.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-02T21:48:44.567
 FORS2_IMG_CAL306.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022100 FORS2     IMG       FORS2.1999-11-02T21:49:32.750
 FORS2_IMG_CAL306.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021000 FORS2     IMG       FORS2.1999-11-02T21:50:35.402
 FORS2_IMG_CAL306.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-02T21:52:23.367
 FORS2_IMG_CAL306.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020800 FORS2     IMG       FORS2.1999-11-02T21:54:10.980
 FORS2_IMG_CAL306.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-02T21:55:59.011
 FORS2_IMG_CAL306.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022700 FORS2     IMG       FORS2.1999-11-02T21:57:46.741
 FORS2_IMG_CAL306.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-02T21:59:40.462
 FORS2_IMG_CAL306.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022300 FORS2     IMG       FORS2.1999-11-02T22:01:28.753
 FORS2_IMG_CAL306.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-02T22:03:16.684
 FORS2_IMG_CAL306.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020700 FORS2     IMG       FORS2.1999-11-02T22:05:04.615
 FORS2_IMG_CAL306.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-02T22:06:53.314
 focus_V_SR.fits                            NULL            NULL      -2147483648 -2147483648             9.001600 FORS2     FREE      FORS2.1999-11-02T22:54:04.946
 focus_V_SR.1.fits                          NULL            NULL      -2147483648 -2147483648             9.999800 FORS2     FREE      FORS2.1999-11-02T22:54:51.346
 focus_V_SR.2.fits                          NULL            NULL      -2147483648 -2147483648            10.000400 FORS2     FREE      FORS2.1999-11-02T22:55:37.812
 focus_V_SR.3.fits                          NULL            NULL      -2147483648 -2147483648             1.002100 FORS2     FREE      FORS2.1999-11-02T22:56:38.282
 focus_V_SR.4.fits                          NULL            NULL      -2147483648 -2147483648             0.999800 FORS2     FREE      FORS2.1999-11-02T22:57:16.083
 focus_V_SR.5.fits                          NULL            NULL      -2147483648 -2147483648             0.997600 FORS2     FREE      FORS2.1999-11-02T22:57:53.381
 FORS2_IMG_CALSKY306.fits                   60.A-9203(C)    TEST       1275525000  -142440012             1.994900 FORS2     IMG       FORS2.1999-11-02T23:21:23.010

Nov 15, 99 16:48 Page 1/4

CD.1999-11-02

Printed by Eckhard Sutorius

FORS 2 1/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY306.1.fits                 60.A-9203(C)    CALIB      1275512029  -142440012             2.807300 FORS2     IMG       FORS2.1999-11-02T23:22:04.021
 FORS2_IMG_CALSKY306.2.fits                 60.A-9203(C)    CALIB      1275499058  -142440012             4.088300 FORS2     IMG       FORS2.1999-11-02T23:22:59.532
 FORS2_IMG_CALSKY306.3.fits                 60.A-9203(C)    CALIB      1275486087  -142440012             5.308000 FORS2     IMG       FORS2.1999-11-02T23:23:56.326
 FORS2_IMG_CALSKY306.4.fits                 60.A-9203(C)    TEST       1275525000  -142440012             1.999700 FORS2     IMG       FORS2.1999-11-02T23:25:26.208
 FORS2_IMG_CALSKY306.5.fits                 60.A-9203(C)    CALIB      1275537970  -142440012             4.497900 FORS2     IMG       FORS2.1999-11-02T23:26:07.095
 FORS2_IMG_CALSKY306.6.fits                 60.A-9203(C)    CALIB      1275550941  -142440012             6.358100 FORS2     IMG       FORS2.1999-11-02T23:27:04.721
 FORS2_IMG_CALSKY306.7.fits                 60.A-9203(C)    CALIB      1275563912  -142440012             8.175200 FORS2     IMG       FORS2.1999-11-02T23:28:03.340
 FORS2_IMG_CALSKY306.8.fits                 60.A-9203(C)    TEST       1275525000  -142440012             1.995600 FORS2     IMG       FORS2.1999-11-02T23:29:27.950
 FORS2_IMG_CALSKY306.9.fits                 60.A-9203(C)    CALIB      1275512029  -142440012            17.731000 FORS2     IMG       FORS2.1999-11-02T23:30:08.884
 FORS2_IMG_CALSKY306.10.fits                60.A-9203(C)    CALIB      1275499058  -142440012            26.732100 FORS2     IMG       FORS2.1999-11-02T23:31:18.823
 FORS2_IMG_CALSKY306.11.fits                60.A-9203(C)    CALIB      1275486087  -142440012            36.043100 FORS2     IMG       FORS2.1999-11-02T23:32:39.134
 FORS2_IMG_CALSKY306.12.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.997500 FORS2     IMG       FORS2.1999-11-02T23:34:24.650
 FORS2_IMG_CALSKY306.13.fits                60.A-9203(C)    CALIB      1275537970  -142440012            27.535400 FORS2     IMG       FORS2.1999-11-02T23:35:07.056
 FORS2_IMG_CALSKY306.14.fits                60.A-9203(C)    CALIB      1275550941  -142440012            41.375700 FORS2     IMG       FORS2.1999-11-02T23:36:27.726
 FORS2_IMG_CALSKY306.15.fits                60.A-9203(C)    CALIB      1275563912  -142440012            56.893000 FORS2     IMG       FORS2.1999-11-02T23:38:01.996
 FORS2_STD306.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             7.000000 FORS2     IMG       FORS2.1999-11-02T23:44:36.374
 FORS2_STD306.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             6.992800 FORS2     IMG       FORS2.1999-11-02T23:45:45.085
 FORS2_STD306.2.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             5.005200 FORS2     IMG       FORS2.1999-11-02T23:46:54.143
 FORS2_STD306.3.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.998000 FORS2     IMG       FORS2.1999-11-02T23:48:01.225
 FORS2_STD306.4.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            14.000000 FORS2     IMG       FORS2.1999-11-02T23:54:25.090
 FORS2_STD306.5.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            14.000000 FORS2     IMG       FORS2.1999-11-02T23:55:51.888
 FORS2_STD306.6.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.997800 FORS2     IMG       FORS2.1999-11-02T23:57:07.775
 FORS2_STD306.7.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            19.998400 FORS2     IMG       FORS2.1999-11-02T23:58:19.973
 FORS2_STD307.fits                          60.A-9203(C)    CALIB      1163036998      914004             7.012400 FORS2     IMG       FORS2.1999-11-03T00:03:38.719
 FORS2_STD307.1.fits                        60.A-9203(C)    CALIB      1163036998      914004            20.999800 FORS2     IMG       FORS2.1999-11-03T00:06:32.227
 FORS2_STD307.2.fits                        60.A-9203(C)    CALIB      1163036998      914004            14.993800 FORS2     IMG       FORS2.1999-11-03T00:07:54.833
 FORS2_STD307.3.fits                        60.A-9203(C)    CALIB      1163036998      914004            29.998000 FORS2     IMG       FORS2.1999-11-03T00:09:11.735
 FORS2_STD307.4.fits                        60.A-9203(C)    CALIB      1163036998      914004            20.000400 FORS2     IMG       FORS2.1999-11-03T00:11:28.967
 FORS2_STD307.5.fits                        60.A-9203(C)    CALIB      1265500501    57620988            12.992900 FORS2     IMG       FORS2.1999-11-03T00:16:42.762
 FORS2_STD307.6.fits                        60.A-9203(C)    CALIB      1265500501    57620988            13.995600 FORS2     IMG       FORS2.1999-11-03T00:18:09.281
 FORS2_STD307.7.fits                        60.A-9203(C)    CALIB      1265500501    57620988            10.000500 FORS2     IMG       FORS2.1999-11-03T00:19:25.084
 FORS2_STD307.8.fits                        60.A-9203(C)    CALIB      1265500501    57620988            20.001900 FORS2     IMG       FORS2.1999-11-03T00:20:37.363
 FORS2_STD307.9.fits                        60.A-9203(C)    CALIB      1259624998   -61530012            14.005800 FORS2     IMG       FORS2.1999-11-03T00:25:47.078
 FORS2_STD307.10.fits                       60.A-9203(C)    CALIB      1259624998   -61530012            13.993100 FORS2     IMG       FORS2.1999-11-03T00:27:13.791
 FORS2_STD307.11.fits                       60.A-9203(C)    CALIB      1259624998   -61530012             9.998200 FORS2     IMG       FORS2.1999-11-03T00:28:29.884
 FORS2_STD307.12.fits                       60.A-9203(C)    CALIB      1259624998   -61530012            20.000000 FORS2     IMG       FORS2.1999-11-03T00:29:42.018
 FORSFieldAcq307.fits                       NULL            NULL       1259624880   -61530012            10.000000 NULL      NULL      FORS2.1999-11-03T00:35:14.582
 FORSFieldAcq307.1.fits                     NULL            NULL       1259626708   -61531128            10.000000 NULL      NULL      FORS2.1999-11-03T00:39:39.922
 FORS2_MOS307.fits                          60.A-9203(C)    SCIENCE    1259626615   -61531128            59.995300 FORS2     MOS       FORS2.1999-11-03T00:48:56.921
 FORS2_MOS307.1.fits                        60.A-9203(C)    SCIENCE    1259626615   -61531128            59.998000 FORS2     MOS       FORS2.1999-11-03T00:51:58.802
 FORSFieldAcq307.2.fits                     NULL            NULL       1259624880   -61530012            10.000000 NULL      NULL      FORS2.1999-11-03T01:11:22.559
 FORS2_MOS307.4.fits                        60.A-9203(C)    TEST       1259626582   -61531128            10.002700 FORS2     MOS       FORS2.1999-11-03T01:15:54.115
 FORS2_MOS307.5.fits                        60.A-9203(C)    TEST       1259625535   -61531128             9.998200 FORS2     MOS       FORS2.1999-11-03T01:21:24.019
 FORS2_MOS307.6.fits                        60.A-9203(C)    SCIENCE    1259626057   -61531128            60.000300 FORS2     MOS       FORS2.1999-11-03T01:24:00.547
 FORS2_MOS307.7.fits                        60.A-9203(C)    SCIENCE    1259626057   -61531128            59.998200 FORS2     MOS       FORS2.1999-11-03T01:27:02.571
 FORS2_MOS307.8.fits                        60.A-9203(C)    SCIENCE    1259626057   -61531128            59.995800 FORS2     MOS       FORS2.1999-11-03T01:30:06.098
 FORS2_MOS307.9.fits                        60.A-9203(C)    SCIENCE    1259626057   -61531128            59.995400 FORS2     MOS       FORS2.1999-11-03T01:33:08.809
 FORS2_MOS307.10.fits                       60.A-9203(C)    SCIENCE    1259626057   -61531128            59.997700 FORS2     MOS       FORS2.1999-11-03T01:36:11.246
 FORS2_MOS307.11.fits                       60.A-9203(C)    SCIENCE    1259626057   -61531128            59.995500 FORS2     MOS       FORS2.1999-11-03T01:50:04.414
 FORSFieldAcq307.3.fits                     NULL            NULL       1259624880   -61530012            10.000000 NULL      NULL      FORS2.1999-11-03T01:58:11.451
 FORSFieldAcq307.4.fits                     NULL            NULL       1259631259   -61525151            10.000000 NULL      NULL      FORS2.1999-11-03T02:02:48.583
 FORSFieldAcq307.5.fits                     NULL            NULL       1259625099   -61530732            10.000000 NULL      NULL      FORS2.1999-11-03T02:06:26.750
 FORS2_MOS307.12.fits                       60.A-9203(C)    TEST       1259625315   -61530551             9.997900 FORS2     MOS       FORS2.1999-11-03T02:09:52.062
 FORS2_MOS307.13.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            59.990800 FORS2     MOS       FORS2.1999-11-03T02:13:36.208
 FORS2_MOS307.14.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            59.997800 FORS2     MOS       FORS2.1999-11-03T02:16:42.702
 FORS2_MOS307.15.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            60.000200 FORS2     MOS       FORS2.1999-11-03T02:19:55.636
 FORS2_MOS307.16.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            59.995800 FORS2     MOS       FORS2.1999-11-03T02:23:00.804
 FORS2_MOS307.17.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            60.000000 FORS2     MOS       FORS2.1999-11-03T02:26:10.719
 FORS2_MOS307.18.fits                       60.A-9203(C)    SCIENCE    1259625315   -61530551            59.997500 FORS2     MOS       FORS2.1999-11-03T02:29:40.116

Nov 15, 99 16:48 Page 2/4

CD.1999-11-02

Printed by Eckhard Sutorius

FORS 2 2/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG307.fits                          60.A-9203(C)    SCIENCE      59454000   -92746008           299.979900 FORS2     IMG       FORS2.1999-11-03T02:38:03.403
 FORS2_IMG307.1.fits                        60.A-9203(C)    SCIENCE     143857501    -5708016           600.000000 FORS2     IMG       FORS2.1999-11-03T02:49:58.850
 FORS2_IMG307.2.fits                        60.A-9203(C)    SCIENCE      19231498  -175107384            29.997700 FORS2     IMG       FORS2.1999-11-03T03:10:36.365
 FORS2_IMG307.3.fits                        60.A-9203(C)    SCIENCE      19231498  -175107384           120.002900 FORS2     IMG       FORS2.1999-11-03T03:12:00.046
 FORS2_IMG307.4.fits                        60.A-9203(C)    SCIENCE      19231498  -175107384           100.003300 FORS2     IMG       FORS2.1999-11-03T03:15:01.447
 FORS2_IMG307.5.fits                        60.A-9203(C)    SCIENCE      19231498  -175107384           120.002800 FORS2     IMG       FORS2.1999-11-03T03:17:43.319
 FORS2_IMG307.6.fits                        60.A-9203(C)    SCIENCE      19231498  -175107384           239.982700 FORS2     IMG       FORS2.1999-11-03T03:20:45.070
 FORS2_IMG307.7.fits                        60.A-9203(C)    SCIENCE      59467500   -92733984           299.979800 FORS2     IMG       FORS2.1999-11-03T03:37:36.884
 FORS2_IMG307.8.fits                        60.A-9203(C)    SCIENCE      59440856   -92710008           300.000000 FORS2     IMG       FORS2.1999-11-03T03:43:36.894
 FORS2_IMG307.9.fits                        60.A-9203(C)    SCIENCE      59440852   -92733984           299.978700 FORS2     IMG       FORS2.1999-11-03T03:49:38.965
 FORS2_IMG307.10.fits                       60.A-9203(C)    SCIENCE      59467500   -92710008           299.993000 FORS2     IMG       FORS2.1999-11-03T03:55:38.739
 FORSFieldAcq307.6.fits                     NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-03T04:17:43.904
 FORS2_MOS307.19.fits                       60.A-9203(C)    SCIENCE      50486742  -260870616             4.991000 FORS2     MOS       FORS2.1999-11-03T04:20:52.484
 FORS2_IMG307.11.fits                       60.A-9203(C)    SCIENCE      50486742  -260870616             5.003300 FORS2     IMG       FORS2.1999-11-03T04:22:04.651
 FORSFieldAcq307.7.fits                     NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-03T04:36:30.697
 FORS2_MOS307.20.fits                       60.A-9203(C)    SCIENCE      50496379  -260868996             4.993100 FORS2     MOS       FORS2.1999-11-03T04:39:10.261
 FORS2_IMG307.12.fits                       60.A-9203(C)    SCIENCE      50496379  -260868996             5.007300 FORS2     IMG       FORS2.1999-11-03T04:40:35.094
 FORS2_STD307.13.fits                       60.A-9203(C)    CALIB       138314998    19122984             2.997500 FORS2     IMG       FORS2.1999-11-03T04:53:17.369
 FORS2_STD307.14.fits                       60.A-9203(C)    CALIB       138314998    19122984             1.007900 FORS2     IMG       FORS2.1999-11-03T04:54:24.213
 FORS2_STD307.15.fits                       60.A-9203(C)    CALIB       138314998    19122984             0.518600 FORS2     IMG       FORS2.1999-11-03T04:55:28.989
 FORS2_STD307.16.fits                       60.A-9203(C)    CALIB       138314998    19122984             1.000800 FORS2     IMG       FORS2.1999-11-03T04:56:33.295
 FORS2_STD307.17.fits                       60.A-9203(C)    CALIB       138314998    19122984             7.990200 FORS2     IMG       FORS2.1999-11-03T05:03:44.346
 FORS2_STD307.18.fits                       60.A-9203(C)    CALIB       138314998    19122984             4.005600 FORS2     IMG       FORS2.1999-11-03T05:05:18.004
 FORS2_STD307.19.fits                       60.A-9203(C)    CALIB       138314998    19122984             2.010700 FORS2     IMG       FORS2.1999-11-03T05:06:47.887
 FORS2_STD307.20.fits                       60.A-9203(C)    CALIB       138314998    19122984             3.995300 FORS2     IMG       FORS2.1999-11-03T05:08:16.280
 pupil_HR.fits                              NULL            TEST         66300001   -72047016             0.250000 FORS2     FREE      FORS2.1999-11-03T05:13:34.329
 pupil_HR.1.fits                            NULL            TEST         66300001   -72047016             0.274900 FORS2     FREE      FORS2.1999-11-03T05:18:03.949
 pupil_HR.2.fits                            NULL            TEST         66300001   -72047016            10.002200 FORS2     FREE      FORS2.1999-11-03T05:19:29.534
 pupil_HR.3.fits                            NULL            TEST         66300001   -72047016             2.005600 FORS2     FREE      FORS2.1999-11-03T05:21:17.598
 pupil_HR.4.fits                            NULL            TEST         66300001   -72047016             0.998200 FORS2     FREE      FORS2.1999-11-03T05:22:34.696
 pupil_HR.5.fits                            NULL            TEST         66300001   -72047016             2.000200 FORS2     FREE      FORS2.1999-11-03T05:24:26.377
 pupil_HR.6.fits                            NULL            TEST         66390447   -71962020             1.997900 FORS2     FREE      FORS2.1999-11-03T05:31:35.646
 pupil_HR.7.fits                            NULL            TEST         66209558   -71962020             1.996000 FORS2     FREE      FORS2.1999-11-03T05:34:17.034
 pupil_HR.8.fits                            NULL            TEST         66209526   -72132012             1.999300 FORS2     FREE      FORS2.1999-11-03T05:36:56.418
 pupil_HR.9.fits                            NULL            TEST         66752355   -72132012             1.997700 FORS2     FREE      FORS2.1999-11-03T05:42:36.934
 pupil_HR.10.fits                           NULL            TEST         66390469   -72132012             2.000200 FORS2     FREE      FORS2.1999-11-03T05:47:15.793
 pupil_SR.fits                              NULL            TEST         66300001   -72047016             2.000000 FORS2     FREE      FORS2.1999-11-03T05:53:39.783
 pupil_SR.1.fits                            NULL            TEST         66300001   -72047016             1.997300 FORS2     FREE      FORS2.1999-11-03T05:56:04.995
 pupil_SR.2.fits                            NULL            TEST         66300001   -72047016             1.997200 FORS2     FREE      FORS2.1999-11-03T05:57:37.523
 pupil_SR.3.fits                            NULL            TEST         66480865   -71877024             1.995200 FORS2     FREE      FORS2.1999-11-03T06:00:58.686
 pupil_SR.4.fits                            NULL            TEST         66661520   -71537040             1.998000 FORS2     FREE      FORS2.1999-11-03T06:13:21.239
 pupil_SR.5.fits                            NULL            TEST         66300008   -71707032             1.995900 FORS2     FREE      FORS2.1999-11-03T06:17:13.036
 pupil_SR.6.fits                            NULL            TEST         66300008   -71707032             1.997600 FORS2     FREE      FORS2.1999-11-03T06:18:43.735
 pupil_SR.7.fits                            NULL            TEST         66300008   -71707032             1.997900 FORS2     FREE      FORS2.1999-11-03T06:21:03.482
 FORS2_IMG307.13.fits                       60.A-9203(C)    SCIENCE     420765001   -69462000           599.972700 FORS2     IMG       FORS2.1999-11-03T06:45:27.558
 FORS2_IMG307.14.fits                       60.A-9203(C)    SCIENCE     420765001   -69462000           598.975200 FORS2     IMG       FORS2.1999-11-03T06:56:29.801
 FORS2_IMG307.15.fits                       60.A-9203(C)    SCIENCE     287845498  -164804184          1199.952600 FORS2     IMG       FORS2.1999-11-03T07:12:21.315
 FORS2_IMG307.16.fits                       60.A-9203(C)    SCIENCE     287845498  -164804184          1199.955000 FORS2     IMG       FORS2.1999-11-03T07:33:23.335
 FORS2_IMG307.17.fits                       60.A-9203(C)    SCIENCE     356195998  -270976788           599.972000 FORS2     IMG       FORS2.1999-11-03T08:00:36.733
 FORS2_IMG307.18.fits                       60.A-9203(C)    SCIENCE     356195998  -270976788           599.972700 FORS2     IMG       FORS2.1999-11-03T08:12:01.521
 FORS2_STD307.21.fits                       60.A-9203(C)    CALIB       505394999    10011996            14.004800 FORS2     IMG       FORS2.1999-11-03T08:28:12.066
 FORS2_STD307.22.fits                       60.A-9203(C)    CALIB       505394999    10011996            13.997300 FORS2     IMG       FORS2.1999-11-03T08:29:28.958
 FORS2_STD307.23.fits                       60.A-9203(C)    CALIB       505394999    10011996            10.001800 FORS2     IMG       FORS2.1999-11-03T08:30:45.437
 FORS2_STD307.24.fits                       60.A-9203(C)    CALIB       505394999    10011996            19.998000 FORS2     IMG       FORS2.1999-11-03T08:31:57.420
 FORS2_STD307.25.fits                       60.A-9203(C)    CALIB       505394999    10011996             7.000800 FORS2     IMG       FORS2.1999-11-03T08:41:49.648
 FORS2_STD307.26.fits                       60.A-9203(C)    CALIB       505394999    10011996             7.003700 FORS2     IMG       FORS2.1999-11-03T08:42:59.460
 FORS2_STD307.27.fits                       60.A-9203(C)    CALIB       505394999    10011996             4.993200 FORS2     IMG       FORS2.1999-11-03T08:44:09.045
 FORS2_STD307.28.fits                       60.A-9203(C)    CALIB       505394999    10011996             9.998900 FORS2     IMG       FORS2.1999-11-03T08:45:16.911
 FORS2_STD307.29.fits                       60.A-9203(C)    CALIB       505394999    10011996            13.993400 FORS2     IMG       FORS2.1999-11-03T08:51:51.144

Nov 15, 99 16:48 Page 3/4

CD.1999-11-02

Printed by Eckhard Sutorius

FORS 2 3/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_STD307.30.fits                       60.A-9203(C)    CALIB       505394999    10011996            13.995200 FORS2     IMG       FORS2.1999-11-03T08:53:31.037
 FORS2_STD307.31.fits                       60.A-9203(C)    CALIB       505394999    10011996             9.998400 FORS2     IMG       FORS2.1999-11-03T08:55:10.438
 FORS2_STD307.32.fits                       60.A-9203(C)    CALIB       505394999    10011996            20.000200 FORS2     IMG       FORS2.1999-11-03T08:56:45.975
 FORS2_IMG_CALSKY307.fits                   60.A-9203(C)    TEST        598335001   -97209000             1.996800 FORS2     IMG       FORS2.1999-11-03T09:08:47.759
 FORS2_IMG_CALSKY307.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.007000 FORS2     IMG       FORS2.1999-11-03T09:10:53.576
 FORS2_IMG_CALSKY307.2.fits                 60.A-9203(C)    CALIB       598335001   -97198992            68.813900 FORS2     IMG       FORS2.1999-11-03T09:11:34.994
 FORS2_IMG_CALSKY307.3.fits                 60.A-9203(C)    CALIB       598335001   -97188984            56.011600 FORS2     IMG       FORS2.1999-11-03T09:13:36.745
 FORS2_IMG_CALSKY307.4.fits                 60.A-9203(C)    CALIB       598335001   -97179012            42.341000 FORS2     IMG       FORS2.1999-11-03T09:15:26.280
 FORS2_IMG_CALSKY307.5.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.000600 FORS2     IMG       FORS2.1999-11-03T09:18:12.709
 FORS2_IMG_CALSKY307.6.fits                 60.A-9203(C)    CALIB       598335001   -97219008            31.420200 FORS2     IMG       FORS2.1999-11-03T09:18:54.356
 FORS2_IMG_CALSKY307.7.fits                 60.A-9203(C)    CALIB       598335001   -97229016            24.195300 FORS2     IMG       FORS2.1999-11-03T09:20:18.637
 FORS2_IMG_CALSKY307.8.fits                 60.A-9203(C)    CALIB       598335001   -97238988            17.851000 FORS2     IMG       FORS2.1999-11-03T09:21:35.340
 FORS2_IMG_CALSKY307.9.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.997000 FORS2     IMG       FORS2.1999-11-03T09:23:56.829
 FORS2_IMG_CALSKY307.10.fits                60.A-9203(C)    CALIB       598335001   -97198992             7.044100 FORS2     IMG       FORS2.1999-11-03T09:24:39.584
 FORS2_IMG_CALSKY307.11.fits                60.A-9203(C)    CALIB       598335001   -97188984             5.237400 FORS2     IMG       FORS2.1999-11-03T09:25:40.506
 FORS2_IMG_CALSKY307.12.fits                60.A-9203(C)    CALIB       598335001   -97179012             3.116700 FORS2     IMG       FORS2.1999-11-03T09:26:39.235
 FORS2_IMG_CALSKY307.13.fits                60.A-9203(C)    TEST        598335001   -97209000             1.998300 FORS2     IMG       FORS2.1999-11-03T09:28:48.039
 FORS2_IMG_CALSKY307.14.fits                60.A-9203(C)    CALIB       598335001   -97219008             3.210800 FORS2     IMG       FORS2.1999-11-03T09:29:30.966
 FORS2_IMG_CALSKY307.15.fits                60.A-9203(C)    CALIB       598335001   -97229016             2.471500 FORS2     IMG       FORS2.1999-11-03T09:30:28.147
 FORS2_IMG_CALSKY307.16.fits                60.A-9203(C)    CALIB       598335001   -97238988             1.989200 FORS2     IMG       FORS2.1999-11-03T09:31:24.177
 FORS2_IMG_CAL307.fits                      60.A-9203(C)    CALIB       598335001   -97238988             0.023100 FORS2     IMG       FORS2.1999-11-03T09:32:51.252
 FORS2_IMG_CAL307.1.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.021000 FORS2     IMG       FORS2.1999-11-03T09:33:39.819
 FORS2_IMG_CAL307.2.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019800 FORS2     IMG       FORS2.1999-11-03T09:34:29.191
 FORS2_IMG_CAL307.3.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.022900 FORS2     IMG       FORS2.1999-11-03T09:35:17.427
 FORS2_IMG_CAL307.4.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.020700 FORS2     IMG       FORS2.1999-11-03T09:36:06.163
 FORS2_IMG_CAL307.5.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019000 FORS2     IMG       FORS2.1999-11-03T09:37:00.483
 FORS2_IMG_CAL307.6.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020000 FORS2     IMG       FORS2.1999-11-03T09:37:49.051
 FORS2_IMG_CAL307.7.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019100 FORS2     IMG       FORS2.1999-11-03T09:38:37.727
 FORS2_IMG_CAL307.8.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020300 FORS2     IMG       FORS2.1999-11-03T09:39:26.189
 FORS2_IMG_CAL307.9.fits                    60.A-9203(C)    CALIB       598335001   -97238988             0.019100 FORS2     IMG       FORS2.1999-11-03T09:40:14.396
 FORS2_IMG_CAL307.10.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.020300 FORS2     IMG       FORS2.1999-11-03T09:46:01.791
 FORS2_IMG_CAL307.11.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.019800 FORS2     IMG       FORS2.1999-11-03T09:47:49.644
 FORS2_IMG_CAL307.12.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.020000 FORS2     IMG       FORS2.1999-11-03T09:49:37.815
 FORS2_IMG_CAL307.13.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.021100 FORS2     IMG       FORS2.1999-11-03T09:51:25.801
 FORS2_IMG_CAL307.14.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.020800 FORS2     IMG       FORS2.1999-11-03T09:53:13.898
 FORS2_IMG_CAL307.15.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.019800 FORS2     IMG       FORS2.1999-11-03T09:55:06.646
 FORS2_IMG_CAL307.16.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.019900 FORS2     IMG       FORS2.1999-11-03T09:56:54.640
 FORS2_IMG_CAL307.17.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.016400 FORS2     IMG       FORS2.1999-11-03T09:58:42.499
 FORS2_IMG_CAL307.18.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.019800 FORS2     IMG       FORS2.1999-11-03T10:00:30.041
 FORS2_IMG_CAL307.19.fits                   60.A-9203(C)    CALIB       598335001   -97238988             0.016600 FORS2     IMG       FORS2.1999-11-03T10:02:17.591

Nov 15, 99 16:48 Page 4/4

CD.1999-11-02

Printed by Eckhard Sutorius

FORS 2 4/4