 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 GRIS_200I_28.fits                          NULL            NULL      -2147483648 -2147483648            60.000000 FORS2     FREE      FORS2.1999-11-03T17:13:30.895
 GRIS_1028z_29.fits                         NULL            NULL      -2147483648 -2147483648           119.964300 FORS2     FREE      FORS2.1999-11-03T17:27:21.765
 GRIS_600z_26.fits                          NULL            NULL      -2147483648 -2147483648           119.995500 FORS2     FREE      FORS2.1999-11-03T17:31:24.208
 GRIS_600z_26.1.fits                        NULL            NULL      -2147483648 -2147483648           119.990400 FORS2     FREE      FORS2.1999-11-03T17:58:49.664
 GRIS_600z_26.2.fits                        NULL            NULL      -2147483648 -2147483648           119.995200 FORS2     FREE      FORS2.1999-11-03T18:11:48.386
 FORS2_MOS_CAL307.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             2.996700 FORS2     MOS       FORS2.1999-11-03T20:35:44.626
 FORS2_MOS_CAL307.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             5.993600 FORS2     MOS       FORS2.1999-11-03T20:37:55.664
 FORS2_MOS_CAL307.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             6.003700 FORS2     MOS       FORS2.1999-11-03T20:48:25.093
 FORS2_MOS_CAL307.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             4.009700 FORS2     MOS       FORS2.1999-11-03T20:50:47.238
 FORS2_MOS_CAL307.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            24.993600 FORS2     MOS       FORS2.1999-11-03T20:53:08.213
 FORS2_MOS_CAL307.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            18.003100 FORS2     MOS       FORS2.1999-11-03T20:55:49.994
 FORS2_MOS_CAL307.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            12.996600 FORS2     MOS       FORS2.1999-11-03T20:58:23.178
 FORS2_MOS_CAL307.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.992500 FORS2     MOS       FORS2.1999-11-03T21:01:00.736
 FORS2_MOS_CAL307.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             3.004200 FORS2     MOS       FORS2.1999-11-03T21:03:19.581
 FORS2_MOS_CAL307.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.993800 FORS2     MOS       FORS2.1999-11-03T21:06:14.362
 FORS2_MOS_CAL307.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.993600 FORS2     MOS       FORS2.1999-11-03T21:10:47.717
 FORS2_MOS_CAL307.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           149.989100 FORS2     MOS       FORS2.1999-11-03T21:15:03.209
 FORS2_MOS_CAL307.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           299.990400 FORS2     MOS       FORS2.1999-11-03T21:20:19.181
 FORS2_MOS_CAL307.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.994800 FORS2     MOS       FORS2.1999-11-03T21:27:54.940
 FORS2_MOS_CAL307.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.997200 FORS2     MOS       FORS2.1999-11-03T21:32:10.944
 FORS2_MOS_CAL307.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            74.990000 FORS2     MOS       FORS2.1999-11-03T21:39:22.565
 FORS2_MOS_CAL307.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            74.998800 FORS2     MOS       FORS2.1999-11-03T21:43:24.178
 FORS2_MOS_CAL307.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.997900 FORS2     MOS       FORS2.1999-11-03T21:46:50.887
 FORS2_MOS_CAL307.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.996600 FORS2     MOS       FORS2.1999-11-03T21:56:24.018
 FORS2_MOS_CAL307.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984800 FORS2     MOS       FORS2.1999-11-03T22:00:44.732
 FORS2_MOS_CAL307.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           248.982500 FORS2     MOS       FORS2.1999-11-03T22:07:26.155
 test.fits                                  NULL            TEST      -2147483648 -2147483648             0.995900 FORS2     FREE      FORS2.1999-11-03T22:21:22.812
 test.1.fits                                NULL            TEST      -2147483648 -2147483648             0.996700 FORS2     FREE      FORS2.1999-11-03T22:22:12.513
 test.2.fits                                NULL            TEST      -2147483648 -2147483648             0.996800 FORS2     FREE      FORS2.1999-11-03T22:22:58.915
 test.3.fits                                NULL            TEST      -2147483648 -2147483648             0.995800 FORS2     FREE      FORS2.1999-11-03T22:23:58.429
 test.4.fits                                NULL            TEST      -2147483648 -2147483648             0.999000 FORS2     FREE      FORS2.1999-11-03T22:24:46.834
 FORS2_IMG_CAL307.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-03T22:28:23.178
 FORS2_IMG_CAL307.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019000 FORS2     IMG       FORS2.1999-11-03T22:29:11.303
 FORS2_IMG_CAL307.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-03T22:29:59.415
 FORS2_IMG_CAL307.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-03T22:30:47.428
 FORS2_IMG_CAL307.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-03T22:31:35.852
 FORS2_IMG_CAL307.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-03T22:32:29.121
 FORS2_IMG_CAL307.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-03T22:33:17.846
 FORS2_IMG_CAL307.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-03T22:34:06.362
 FORS2_IMG_CAL307.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-03T22:34:55.203
 FORS2_IMG_CAL307.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-03T22:35:43.653
 FORS2_IMG_CAL307.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-03T22:37:55.290
 FORS2_IMG_CAL307.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-03T22:39:43.137
 FORS2_IMG_CAL307.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015700 FORS2     IMG       FORS2.1999-11-03T22:41:30.249
 FORS2_IMG_CAL307.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-03T22:43:17.532
 FORS2_IMG_CAL307.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-03T22:45:05.056
 FORS2_IMG_CAL307.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-03T22:46:56.906
 FORS2_IMG_CAL307.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-03T22:48:44.771
 FORS2_IMG_CAL307.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-03T22:50:32.206
 FORS2_IMG_CAL307.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020800 FORS2     IMG       FORS2.1999-11-03T22:52:19.910
 FORS2_IMG_CAL307.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021500 FORS2     IMG       FORS2.1999-11-03T22:54:07.316
 FORSFieldAcq308.1.fits                     NULL            NULL       1130745661   -16658352           180.000000 NULL      NULL      FORS2.1999-11-04T01:41:56.376
 FORSFieldAcq308.2.fits                     NULL            NULL       1130747605   -16660583           180.000000 NULL      NULL      FORS2.1999-11-04T01:48:27.893
 FORS2_MOS308.fits                          60.A-9203(C)    TEST       1130747760   -16660440           299.989500 FORS2     MOS       FORS2.1999-11-04T01:57:47.665
 FORS2_MOS308.1.fits                        60.A-9203(C)    TEST       1130747572   -16660511           299.987200 FORS2     MOS       FORS2.1999-11-04T02:10:29.383
 FORS2_MOS308.2.fits                        60.A-9203(C)    SCIENCE    1130747572   -16660511          1799.928900 FORS2     MOS       FORS2.1999-11-04T02:20:53.664
 FORSFieldAcq308.3.fits                     NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-04T03:08:28.914
 FORSFieldAcq308.4.fits                     NULL            NULL         50488556  -260871300             5.000000 NULL      NULL      FORS2.1999-11-04T03:11:42.236
 FORSFieldAcq308.5.fits                     NULL            NULL         50489089  -260871444             5.000000 NULL      NULL      FORS2.1999-11-04T03:13:58.888

Nov 15, 99 16:54 Page 1/3

CD.1999-11-03

Printed by Eckhard Sutorius

FORS 2 1/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORSFieldAcq308.6.fits                     NULL            NULL         50489175  -260871084             5.000000 NULL      NULL      FORS2.1999-11-04T03:16:05.804
 FORS2_MOS308.3.fits                        60.A-9203(C)    SCIENCE      50488783  -260871120             2.997700 FORS2     MOS       FORS2.1999-11-04T03:18:59.950
 FORSFieldAcq308.7.fits                     NULL            NULL         50496555  -260871732             5.000000 NULL      NULL      FORS2.1999-11-04T03:36:31.311
 FORSFieldAcq308.8.fits                     NULL            NULL         50503903  -260870076             5.000000 NULL      NULL      FORS2.1999-11-04T03:45:57.293
 FORSFieldAcq308.9.fits                     NULL            NULL         50488135  -260871479             5.000000 NULL      NULL      FORS2.1999-11-04T03:48:36.513
 FORS2_MOS308.4.fits                        60.A-9203(C)    SCIENCE      50488531  -260871155             2.999200 FORS2     MOS       FORS2.1999-11-04T03:51:20.661
 FORSFieldAcq308.10.fits                    NULL            NULL         59442854   -92728008           120.000000 NULL      NULL      FORS2.1999-11-04T04:02:23.182
 FORSFieldAcq308.11.fits                    NULL            NULL         59443210   -92728872           120.000000 NULL      NULL      FORS2.1999-11-04T04:06:40.459
 FORS2_MOS308.5.fits                        60.A-9203(C)    TEST         59443178   -92728800           299.996000 FORS2     MOS       FORS2.1999-11-04T04:11:31.075
 FORS2_MOS308.6.fits                        60.A-9203(C)    SCIENCE      59443178   -92728800          1798.931100 FORS2     MOS       FORS2.1999-11-04T04:21:37.180
 FORS2_LSS308.fits                          60.A-9203(C)    SCIENCE     143854304    -5659740            36.508900 FORS2     LSS       FORS2.1999-11-04T05:17:38.384
 FORSFieldAcq308.12.fits                    NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-04T05:21:43.508
 FORSFieldAcq308.13.fits                    NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-04T05:26:33.535
 FORS2_STD308.fits                          60.A-9203(C)    CALIB       138314998    19122984            14.002900 FORS2     IMG       FORS2.1999-11-04T05:44:35.217
 FORS2_STD308.1.fits                        60.A-9203(C)    CALIB       138314998    19122984            13.993400 FORS2     IMG       FORS2.1999-11-04T05:45:51.224
 FORS2_STD308.2.fits                        60.A-9203(C)    CALIB       138314998    19122984            10.002600 FORS2     IMG       FORS2.1999-11-04T05:47:08.654
 FORS2_STD308.3.fits                        60.A-9203(C)    CALIB       138314998    19122984            19.996900 FORS2     IMG       FORS2.1999-11-04T05:48:23.048
 FORS2_STD308.4.fits                        60.A-9203(C)    CALIB       138314998    19122984            14.005600 FORS2     IMG       FORS2.1999-11-04T05:52:52.406
 FORS2_STD308.5.fits                        60.A-9203(C)    CALIB       138314998    19122984            13.994900 FORS2     IMG       FORS2.1999-11-04T05:54:08.525
 FORS2_STD308.6.fits                        60.A-9203(C)    CALIB       138314998    19122984             9.999000 FORS2     IMG       FORS2.1999-11-04T05:55:24.196
 FORS2_STD308.7.fits                        60.A-9203(C)    CALIB       138314998    19122984            18.999100 FORS2     IMG       FORS2.1999-11-04T05:56:39.652
 FORSFieldAcq308.15.fits                    NULL            NULL        301053315    79284852            10.000000 NULL      NULL      FORS2.1999-11-04T06:05:43.996
 FORSFieldAcq308.16.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:07:56.054
 FORSFieldAcq308.17.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:21:51.399
 FORSFieldAcq308.18.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:26:43.238
 FORSFocfAcq308.fits                        NULL            NULL        301053315    79284852            10.000000 NULL      NULL      FORS2.1999-11-04T06:28:27.535
 FORSFieldAcq308.19.fits                    NULL            NULL      -2147483648 -2147483648             0.018300 NULL      NULL      FORS2.1999-11-04T06:35:59.692
 FORSFieldAcq308.20.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:37:09.225
 FORSFieldAcq308.21.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:40:21.308
 FORSFocfAcq308.1.fits                      NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:42:04.953
 FORSFieldAcq308.22.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:48:35.057
 FORSFocfAcq308.2.fits                      NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:50:19.011
 FORSFieldAcq308.23.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:55:49.553
 FORSFocfAcq308.3.fits                      NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T06:57:32.754
 FORSFieldAcq308.25.fits                    NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T07:06:06.894
 FORSFocfAcq308.4.fits                      NULL            NULL      -2147483648 -2147483648            10.000000 NULL      NULL      FORS2.1999-11-04T07:07:50.291
 FORS2_LSS308.1.fits                        60.A-9203(C)    SCIENCE     301052674    79284168           299.989100 FORS2     LSS       FORS2.1999-11-04T07:10:09.907
 mos_slitflanks.fits                        NULL            TEST        301052674    79284168             0.990400 FORS2     FREE      FORS2.1999-11-04T07:17:44.805
 FORSFieldAcq308.26.fits                    NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-04T07:22:04.868
 FORSFocfAcq308.5.fits                      NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-04T07:27:37.822
 FORS2_LSS308.2.fits                        60.A-9203(C)    SCIENCE     143854617    -5660676          1799.930600 FORS2     LSS       FORS2.1999-11-04T07:37:29.516
 FORSFieldAcq308.27.fits                    NULL            NULL        171492375   -35107056            40.000000 NULL      NULL      FORS2.1999-11-04T08:13:38.516
 FORS2_ECH308.fits                          60.A-9203(C)    SCIENCE     171492156   -35105040           300.000000 FORS2     ECH       FORS2.1999-11-04T08:23:03.665
 FORSFieldAcq308.28.fits                    NULL            NULL        171492375   -35107056            40.000000 NULL      NULL      FORS2.1999-11-04T08:38:47.503
 FORS2_MOS308.7.fits                        60.A-9203(C)    TEST        171492393   -35105112            59.981400 FORS2     MOS       FORS2.1999-11-04T08:47:45.598
 FORS2_IMG_CALSKY308.fits                   60.A-9203(C)    TEST        598335001   -97209000             2.000000 FORS2     IMG       FORS2.1999-11-04T09:14:05.719
 FORS2_IMG_CALSKY308.1.fits                 60.A-9203(C)    CALIB       598335001   -97198992            27.953100 FORS2     IMG       FORS2.1999-11-04T09:14:51.206
 FORS2_IMG_CALSKY308.2.fits                 60.A-9203(C)    CALIB       598335001   -97188984            51.482000 FORS2     IMG       FORS2.1999-11-04T09:16:15.354
 FORS2_IMG_CALSKY308.3.fits                 60.A-9203(C)    CALIB       598335001   -97179012            38.104400 FORS2     IMG       FORS2.1999-11-04T09:18:00.888
 FORS2_IMG_CALSKY308.4.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.000000 FORS2     IMG       FORS2.1999-11-04T09:20:45.819
 FORS2_IMG_CALSKY308.5.fits                 60.A-9203(C)    CALIB       598335001   -97219008             7.081700 FORS2     IMG       FORS2.1999-11-04T09:21:30.905
 FORS2_IMG_CALSKY308.6.fits                 60.A-9203(C)    CALIB       598335001   -97229016            15.077700 FORS2     IMG       FORS2.1999-11-04T09:22:33.835
 FORS2_IMG_CALSKY308.7.fits                 60.A-9203(C)    CALIB       598335001   -97238988            10.826500 FORS2     IMG       FORS2.1999-11-04T09:23:43.240
 FORS2_IMG_CALSKY308.8.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.000000 FORS2     IMG       FORS2.1999-11-04T09:26:00.959
 FORS2_IMG_CALSKY308.9.fits                 60.A-9203(C)    CALIB       598335001   -97198992             2.367000 FORS2     IMG       FORS2.1999-11-04T09:26:46.895
 FORS2_IMG_CALSKY308.10.fits                60.A-9203(C)    CALIB       598335001   -97188984             1.936000 FORS2     IMG       FORS2.1999-11-04T09:27:44.465
 FORS2_IMG_CALSKY308.11.fits                60.A-9203(C)    CALIB       598335001   -97179012             1.180000 FORS2     IMG       FORS2.1999-11-04T09:28:42.011
 FORS2_IMG_CALSKY308.12.fits                60.A-9203(C)    TEST        598335001   -97209000             2.000000 FORS2     IMG       FORS2.1999-11-04T09:30:51.519
 FORS2_IMG_CAL308.fits                      60.A-9203(C)    CALIB       598335001   -97209000             0.015700 FORS2     IMG       FORS2.1999-11-04T09:38:04.584

Nov 15, 99 16:54 Page 2/3

CD.1999-11-03

Printed by Eckhard Sutorius

FORS 2 2/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CAL308.1.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.020400 FORS2     IMG       FORS2.1999-11-04T09:38:54.115
 FORS2_IMG_CAL308.2.fits                    60.A-9203(C)    CALIB       598335001   -97209000             0.015600 FORS2     IMG       FORS2.1999-11-04T09:39:43.174
 FORS2_IMG_CAL308.3.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.019600 FORS2     IMG       FORS2.1999-11-04T09:40:32.431
 FORS2_IMG_CAL308.4.fits                    60.A-9203(C)    CALIB       598335001   -97209000             0.020500 FORS2     IMG       FORS2.1999-11-04T09:41:22.319
 FORS2_IMG_CAL308.5.fits                    60.A-9203(C)    CALIB       598335001   -97209000             0.015600 FORS2     IMG       FORS2.1999-11-04T09:42:18.229
 FORS2_IMG_CAL308.6.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.017100 FORS2     IMG       FORS2.1999-11-04T09:43:08.513
 FORS2_IMG_CAL308.7.fits                    60.A-9203(C)    CALIB       598335001   -97209000             0.020500 FORS2     IMG       FORS2.1999-11-04T09:43:58.417
 FORS2_IMG_CAL308.8.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.015700 FORS2     IMG       FORS2.1999-11-04T09:44:48.326
 FORS2_IMG_CAL308.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017100 FORS2     IMG       FORS2.1999-11-04T09:45:38.273
 FORS2_IMG_CAL308.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017900 FORS2     IMG       FORS2.1999-11-04T09:52:20.710
 FORS2_IMG_CAL308.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-04T09:54:09.398
 FORS2_IMG_CAL308.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015000 FORS2     IMG       FORS2.1999-11-04T09:55:58.023
 FORS2_IMG_CAL308.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018100 FORS2     IMG       FORS2.1999-11-04T09:57:46.437
 FORS2_IMG_CAL308.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-04T09:59:34.861
 FORS2_IMG_CAL308.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-04T10:01:28.855
 FORS2_IMG_CAL308.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-04T10:03:17.999
 FORS2_IMG_CAL308.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022000 FORS2     IMG       FORS2.1999-11-04T10:05:06.703
 FORS2_IMG_CAL308.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021100 FORS2     IMG       FORS2.1999-11-04T10:06:55.332
 FORS2_IMG_CAL308.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-04T10:08:44.165

Nov 15, 99 16:54 Page 3/3

CD.1999-11-03

Printed by Eckhard Sutorius

FORS 2 3/3