 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_LSS_CAL308.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            11.998100 FORS2     LSS       FORS2.1999-11-04T18:56:08.587
 FORS2_LSS_CAL308.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            75.001200 FORS2     LSS       FORS2.1999-11-04T18:58:04.882
 FORS2_MOS_CAL308.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            24.004900 FORS2     MOS       FORS2.1999-11-04T19:10:23.797
 FORS2_MOS_CAL308.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            24.001900 FORS2     MOS       FORS2.1999-11-04T19:12:48.634
 FORS2_MOS_CAL308.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            75.001100 FORS2     MOS       FORS2.1999-11-04T19:15:48.761
 FORS2_MOS_CAL308.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            29.996500 FORS2     MOS       FORS2.1999-11-04T19:20:03.390
 FORS2_MOS_CAL308.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            29.996200 FORS2     MOS       FORS2.1999-11-04T19:23:10.855
 FORS2_MOS_CAL308.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.995700 FORS2     MOS       FORS2.1999-11-04T19:26:30.792
 FORS2_ECH_CAL_MOSSCRF308.fits              60.A-9203(C)    CALIB     -2147483648 -2147483648           199.998500 FORS2     ECH       FORS2.1999-11-04T19:37:52.646
 FORS2_ECH_CAL_MOSWAV308.fits               60.A-9203(C)    CALIB     -2147483648 -2147483648           299.988700 FORS2     ECH       FORS2.1999-11-04T19:49:27.422
 FORS2_ECH_CAL_MOSSCRF308.1.fits            60.A-9203(C)    CALIB     -2147483648 -2147483648           599.972000 FORS2     ECH       FORS2.1999-11-04T19:57:15.568
 FORS2_ECH_CAL_MOSSCRF308.2.fits            60.A-9203(C)    CALIB     -2147483648 -2147483648           599.975700 FORS2     ECH       FORS2.1999-11-04T20:08:10.238
 FORS2_ECH_CAL_MOSSCRF308.3.fits            60.A-9203(C)    CALIB     -2147483648 -2147483648           599.970500 FORS2     ECH       FORS2.1999-11-04T20:19:02.165
 FORS2_MOS_CAL308.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             8.996000 FORS2     MOS       FORS2.1999-11-04T20:38:39.068
 LSS_SR.fits                                60.A-9203(C)    CALIB     -2147483648 -2147483648            59.737900 FORS2     IMG       FORS2.1999-11-04T20:46:11.535
 FORS2_IMG_CAL308.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-04T21:33:36.946
 FORS2_IMG_CAL308.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.250000 FORS2     IMG       FORS2.1999-11-04T21:41:56.674
 FORS2_IMG_CAL308.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.515900 FORS2     IMG       FORS2.1999-11-04T21:42:57.838
 FORS2_IMG_CAL308.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.996800 FORS2     IMG       FORS2.1999-11-04T21:43:58.895
 FORS2_IMG_CAL308.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996700 FORS2     IMG       FORS2.1999-11-04T21:45:01.518
 FORS2_IMG_CAL308.25.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.008500 FORS2     IMG       FORS2.1999-11-04T21:47:36.318
 FORS2_IMG_CAL308.26.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.997500 FORS2     IMG       FORS2.1999-11-04T21:48:30.235
 FORS2_IMG_CAL308.27.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.006600 FORS2     IMG       FORS2.1999-11-04T21:49:39.506
 FORS2_IMG_CAL308.28.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.994900 FORS2     IMG       FORS2.1999-11-04T21:50:33.084
 FORS2_IMG_CAL308.29.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.995700 FORS2     IMG       FORS2.1999-11-04T21:51:44.756
 FORS2_IMG_CAL308.30.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.004900 FORS2     IMG       FORS2.1999-11-04T21:52:40.077
 FORS2_IMG_CAL308.31.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999900 FORS2     IMG       FORS2.1999-11-04T21:53:50.034
 FORS2_IMG_CAL308.32.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.997300 FORS2     IMG       FORS2.1999-11-04T21:54:52.072
 FORS2_IMG_CAL308.33.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016500 FORS2     IMG       FORS2.1999-11-04T21:59:31.590
 FORS2_IMG_CAL308.34.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-04T22:00:20.599
 FORS2_IMG_CAL308.35.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017900 FORS2     IMG       FORS2.1999-11-04T22:01:09.047
 FORS2_IMG_CAL308.36.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016700 FORS2     IMG       FORS2.1999-11-04T22:01:57.751
 FORS2_IMG_CAL308.37.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-04T22:02:47.882
 FORS2_IMG_CAL308.38.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020900 FORS2     IMG       FORS2.1999-11-04T22:03:41.314
 FORS2_IMG_CAL308.39.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018800 FORS2     IMG       FORS2.1999-11-04T22:04:30.450
 FORS2_IMG_CAL308.40.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-04T22:05:19.820
 FORS2_IMG_CAL308.41.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-04T22:06:08.514
 FORS2_IMG_CAL308.42.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-04T22:06:57.164
 FORS2_IMG_CAL308.43.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017400 FORS2     IMG       FORS2.1999-11-04T22:09:29.370
 FORS2_IMG_CAL308.44.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019800 FORS2     IMG       FORS2.1999-11-04T22:11:17.405
 FORS2_IMG_CAL308.45.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019700 FORS2     IMG       FORS2.1999-11-04T22:13:05.655
 FORS2_IMG_CAL308.46.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019700 FORS2     IMG       FORS2.1999-11-04T22:14:53.335
 FORS2_IMG_CAL308.47.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-04T22:16:41.140
 FORS2_IMG_CAL308.48.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-04T22:18:33.591
 FORS2_IMG_CAL308.49.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018000 FORS2     IMG       FORS2.1999-11-04T22:20:21.681
 FORS2_IMG_CAL308.50.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019600 FORS2     IMG       FORS2.1999-11-04T22:22:09.387
 FORS2_IMG_CAL308.51.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-04T22:23:57.072
 FORS2_IMG_CAL308.52.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018700 FORS2     IMG       FORS2.1999-11-04T22:25:44.945
 FORS2_IMG_CALSKY308.13.fits                60.A-9203(C)    TEST      -2147483648 -2147483648             1.998900 FORS2     IMG       FORS2.1999-11-04T22:59:33.294
 FORS2_IMG_CALSKY308.14.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.997800 FORS2     IMG       FORS2.1999-11-04T23:02:20.380
 FORS2_IMG_CALSKY308.15.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.997400 FORS2     IMG       FORS2.1999-11-04T23:04:18.810
 FORS2_IMG_CALSKY308.16.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.986600 FORS2     IMG       FORS2.1999-11-04T23:06:10.785
 FORS2_IMG_CALSKY308.17.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.996300 FORS2     IMG       FORS2.1999-11-04T23:07:11.850
 FORS2_IMG_CALSKY308.18.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.994700 FORS2     IMG       FORS2.1999-11-04T23:08:32.848
 FORS2_IMG_CALSKY308.19.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.996300 FORS2     IMG       FORS2.1999-11-04T23:09:50.153
 FORS2_IMG_CALSKY308.20.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.998000 FORS2     IMG       FORS2.1999-11-04T23:10:49.204
 FORS2_IMG_CALSKY308.21.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.996800 FORS2     IMG       FORS2.1999-11-04T23:11:29.441
 FORS2_IMG_CALSKY308.22.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.997400 FORS2     IMG       FORS2.1999-11-04T23:12:12.052
 FORS2_IMG_CALSKY308.23.fits                60.A-9203(C)    CALIB      1275512029  -142440012             1.168300 FORS2     IMG       FORS2.1999-11-04T23:12:54.584

Nov 15, 99 17:01 Page 1/4

CD.1999-11-04

Printed by Eckhard Sutorius

FORS 2 1/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY308.24.fits                60.A-9203(C)    CALIB      1275499058  -142440012             1.694000 FORS2     IMG       FORS2.1999-11-04T23:13:50.790
 FORS2_IMG_CALSKY308.25.fits                60.A-9203(C)    CALIB      1275486087  -142440012             2.147000 FORS2     IMG       FORS2.1999-11-04T23:14:47.096
 FORS2_IMG_CALSKY308.26.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.995900 FORS2     IMG       FORS2.1999-11-04T23:15:58.989
 FORS2_IMG_CALSKY308.27.fits                60.A-9203(C)    CALIB      1275537970  -142440012             4.591500 FORS2     IMG       FORS2.1999-11-04T23:16:41.915
 FORS2_IMG_CALSKY308.28.fits                60.A-9203(C)    CALIB      1275550941  -142440012             6.855900 FORS2     IMG       FORS2.1999-11-04T23:17:43.354
 FORS2_IMG_CALSKY308.29.fits                60.A-9203(C)    CALIB      1275563912  -142440012             9.383000 FORS2     IMG       FORS2.1999-11-04T23:18:44.548
 FORS2_IMG_CALSKY308.30.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.996800 FORS2     IMG       FORS2.1999-11-04T23:20:05.310
 FORS2_IMG_CALSKY308.31.fits                60.A-9203(C)    CALIB      1275512029  -142440012            18.738000 FORS2     IMG       FORS2.1999-11-04T23:20:48.984
 FORS2_IMG_CALSKY308.32.fits                60.A-9203(C)    CALIB      1275499058  -142440012            29.876600 FORS2     IMG       FORS2.1999-11-04T23:22:02.048
 FORS2_IMG_CALSKY308.33.fits                60.A-9203(C)    CALIB      1275486087  -142440012            47.061800 FORS2     IMG       FORS2.1999-11-04T23:23:28.415
 FORS2_IMG_CALSKY308.34.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.996700 FORS2     IMG       FORS2.1999-11-04T23:25:20.870
 FORS2_IMG_CALSKY308.35.fits                60.A-9203(C)    CALIB      1275537970  -142440012             7.918700 FORS2     IMG       FORS2.1999-11-04T23:26:04.105
 FORS2_IMG_CALSKY308.36.fits                60.A-9203(C)    CALIB      1275550941  -142440012            12.066800 FORS2     IMG       FORS2.1999-11-04T23:27:07.854
 FORS2_IMG_CALSKY308.37.fits                60.A-9203(C)    CALIB      1275563912  -142440012            16.355800 FORS2     IMG       FORS2.1999-11-04T23:28:14.377
 FORS2_IMG_CALSKY308.38.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.998300 FORS2     IMG       FORS2.1999-11-04T23:29:37.119
 FORS2_IMG_CALSKY308.39.fits                60.A-9203(C)    CALIB      1275512029  -142440012            53.760100 FORS2     IMG       FORS2.1999-11-04T23:30:21.875
 FORS2_IMG_CALSKY308.40.fits                60.A-9203(C)    CALIB      1275499058  -142440012            97.111900 FORS2     IMG       FORS2.1999-11-04T23:32:09.985
 FORS2_IMG_CALSKY308.41.fits                60.A-9203(C)    CALIB      1275486087  -142440012           175.641200 FORS2     IMG       FORS2.1999-11-04T23:34:41.400
 FORS2_STD308.8.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             6.992300 FORS2     IMG       FORS2.1999-11-04T23:49:30.772
 FORS2_STD308.9.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             7.001800 FORS2     IMG       FORS2.1999-11-04T23:50:38.325
 FORS2_STD308.10.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             4.994300 FORS2     IMG       FORS2.1999-11-04T23:51:46.624
 FORS2_STD308.11.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             8.999100 FORS2     IMG       FORS2.1999-11-04T23:52:54.704
 FORS2_STD308.12.fits                       60.A-9203(C)    CALIB      1119577500   -38788992            10.000300 FORS2     IMG       FORS2.1999-11-05T00:02:37.603
 FORS2_STD309.fits                          60.A-9203(C)    CALIB      1119577500   -38788992           100.006700 FORS2     IMG       FORS2.1999-11-05T00:04:27.423
 focus_test.fits                            NULL            TEST      -2147483648 -2147483648             9.999300 FORS2     FREE      FORS2.1999-11-05T00:09:41.514
 focus_test_min0.2.fits                     NULL            TEST      -2147483648 -2147483648             9.996100 FORS2     FREE      FORS2.1999-11-05T00:11:28.142
 focus_test_min0.3.fits                     NULL            TEST      -2147483648 -2147483648             9.000800 FORS2     FREE      FORS2.1999-11-05T00:13:08.569
 FORS2_STD309.1.fits                        60.A-9203(C)    CALIB     -2147483648 -2147483648            29.999600 FORS2     IMG       FORS2.1999-11-05T00:16:44.632
 FORS2_STD309.2.fits                        60.A-9203(C)    CALIB     -2147483648 -2147483648            29.995800 FORS2     IMG       FORS2.1999-11-05T00:19:53.708
 FORS2_STD309.3.fits                        60.A-9203(C)    CALIB     -2147483648 -2147483648            29.998500 FORS2     IMG       FORS2.1999-11-05T00:24:09.686
 FORS2_STD309.4.fits                        60.A-9203(C)    CALIB     -2147483648 -2147483648            29.997600 FORS2     IMG       FORS2.1999-11-05T00:28:26.641
 FORS2_STD309.5.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            59.997400 FORS2     IMG       FORS2.1999-11-05T00:34:24.571
 FORS2_STD309.6.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            58.996900 FORS2     IMG       FORS2.1999-11-05T00:36:25.119
 FORS2_STD309.7.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            59.994400 FORS2     IMG       FORS2.1999-11-05T00:38:28.136
 FORS2_STD309.8.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            59.996100 FORS2     IMG       FORS2.1999-11-05T00:40:29.947
 FORS2_STD309.9.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            59.996600 FORS2     IMG       FORS2.1999-11-05T00:43:47.248
 FORS2_IMG309.fits                          60.A-9203(C)    SCIENCE    1126831500  -205448004           239.995000 FORS2     IMG       FORS2.1999-11-05T00:50:36.106
 FORSFieldAcq309.fits                       NULL            NULL       1130745661   -16658352           300.000000 NULL      NULL      FORS2.1999-11-05T00:59:40.916
 FORSFieldAcq309.1.fits                     NULL            NULL       1130745661   -16658352           300.000000 NULL      NULL      FORS2.1999-11-05T01:15:30.341
 FORSFieldAcq309.2.fits                     NULL            NULL       1130747072   -16660116           300.000000 NULL      NULL      FORS2.1999-11-05T01:23:26.394
 FORSFieldAcq309.3.fits                     NULL            NULL       1130747083   -16660116           300.000000 NULL      NULL      FORS2.1999-11-05T01:32:48.282
 FORS2_MOS309.fits                          60.A-9203(C)    TEST       1130747083   -16660116           299.995700 FORS2     MOS       FORS2.1999-11-05T01:42:49.821
 FORS2_MOS309.1.fits                        60.A-9203(C)    SCIENCE    1130747083   -16660116          1799.928600 FORS2     MOS       FORS2.1999-11-05T01:55:17.981
 FORSFieldAcq309.4.fits                     NULL            NULL         50692021  -260880912             5.000000 NULL      NULL      FORS2.1999-11-05T02:40:06.730
 FORSFieldAcq309.5.fits                     NULL            NULL         50683827  -260879867             3.000000 NULL      NULL      FORS2.1999-11-05T02:43:53.509
 FORSFieldAcq309.6.fits                     NULL            NULL         50683957  -260879724             3.000000 NULL      NULL      FORS2.1999-11-05T02:47:31.695
 FORS2_IMG309.1.fits                        60.A-9203(C)    SCIENCE      50683827  -260879940             4.992600 FORS2     IMG       FORS2.1999-11-05T02:49:46.241
 FORS2_MOS309.2.fits                        60.A-9203(C)    SCIENCE      50683827  -260879940             4.994000 FORS2     MOS       FORS2.1999-11-05T02:56:37.846
 FORSFieldAcq309.7.fits                     NULL            NULL         50692021  -260880912             5.000000 NULL      NULL      FORS2.1999-11-05T03:01:35.784
 FORSFieldAcq309.8.fits                     NULL            NULL         50692021  -260880912             5.000000 NULL      NULL      FORS2.1999-11-05T03:09:07.670
 FORSFieldAcq309.9.fits                     NULL            NULL         50683802  -260879867             5.000000 NULL      NULL      FORS2.1999-11-05T03:11:36.366
 FORSFieldAcq309.10.fits                    NULL            NULL         50683694  -260879832             5.000000 NULL      NULL      FORS2.1999-11-05T03:13:56.081
 FORS2_IMG309.2.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008           179.988000 FORS2     IMG       FORS2.1999-11-05T03:23:26.837
 FORS2_IMG309.3.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008           179.997400 FORS2     IMG       FORS2.1999-11-05T03:27:39.086
 FORS2_IMG309.4.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.928800 FORS2     IMG       FORS2.1999-11-05T03:31:35.717
 FORS2_IMG309.5.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008           178.991700 FORS2     IMG       FORS2.1999-11-05T04:02:33.724
 FORS2_IMG309.6.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.927800 FORS2     IMG       FORS2.1999-11-05T04:06:29.732
 FORS2_IMG309.7.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008           179.990600 FORS2     IMG       FORS2.1999-11-05T04:37:28.151
 FORS2_IMG309.8.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.919400 FORS2     IMG       FORS2.1999-11-05T04:41:24.768

Nov 15, 99 17:01 Page 2/4

CD.1999-11-04

Printed by Eckhard Sutorius

FORS 2 2/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORSFieldAcq309.11.fits                    NULL            NULL         59442854   -92728008           120.000000 NULL      NULL      FORS2.1999-11-05T05:21:47.556
 FORS2_MOS309.3.fits                        60.A-9203(C)    TEST         59443772   -92728476           299.991100 FORS2     MOS       FORS2.1999-11-05T05:26:43.002
 FORS2_MOS309.4.fits                        60.A-9203(C)    SCIENCE      59443772   -92728476          1799.917800 FORS2     MOS       FORS2.1999-11-05T05:40:47.290
 FORS2_IMG309.9.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.926600 FORS2     IMG       FORS2.1999-11-05T06:19:07.173
 FORS2_STD309.10.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000200 FORS2     IMG       FORS2.1999-11-05T06:56:36.962
 FORS2_STD309.11.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.997100 FORS2     IMG       FORS2.1999-11-05T06:57:48.576
 FORS2_STD309.12.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000300 FORS2     IMG       FORS2.1999-11-05T06:59:00.142
 FORS2_STD309.13.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000500 FORS2     IMG       FORS2.1999-11-05T07:00:11.434
 FORS2_STD309.14.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.999600 FORS2     IMG       FORS2.1999-11-05T07:03:40.687
 FORS2_STD309.15.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000200 FORS2     IMG       FORS2.1999-11-05T07:04:52.681
 FORS2_STD309.16.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.997500 FORS2     IMG       FORS2.1999-11-05T07:06:04.409
 FORS2_STD309.17.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.001200 FORS2     IMG       FORS2.1999-11-05T07:07:16.368
 FORS2_STD309.18.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.997000 FORS2     IMG       FORS2.1999-11-05T07:09:04.603
 FORS2_STD309.19.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.006200 FORS2     IMG       FORS2.1999-11-05T07:10:16.299
 FORS2_STD309.20.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.996900 FORS2     IMG       FORS2.1999-11-05T07:11:28.022
 FORS2_STD309.21.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000000 FORS2     IMG       FORS2.1999-11-05T07:12:41.035
 FORS2_STD309.22.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.001200 FORS2     IMG       FORS2.1999-11-05T07:14:47.072
 FORS2_STD309.23.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000100 FORS2     IMG       FORS2.1999-11-05T07:15:58.194
 FORS2_STD309.24.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.999500 FORS2     IMG       FORS2.1999-11-05T07:17:09.164
 FORS2_STD309.25.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.000300 FORS2     IMG       FORS2.1999-11-05T07:18:20.308
 FORS2_STD309.26.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.996500 FORS2     IMG       FORS2.1999-11-05T07:19:55.135
 FORS2_STD309.27.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.998900 FORS2     IMG       FORS2.1999-11-05T07:21:07.138
 FORS2_STD309.28.fits                       60.A-9203(C)    CALIB       273719998  -239040000             9.996200 FORS2     IMG       FORS2.1999-11-05T07:22:18.876
 FORS2_STD309.29.fits                       60.A-9203(C)    CALIB       273719998  -239040000            10.002000 FORS2     IMG       FORS2.1999-11-05T07:23:30.523
 FORS2_STD309.30.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.001300 FORS2     IMG       FORS2.1999-11-05T07:30:58.086
 FORS2_STD309.31.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.996700 FORS2     IMG       FORS2.1999-11-05T07:32:19.781
 FORS2_STD309.32.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.000400 FORS2     IMG       FORS2.1999-11-05T07:33:40.981
 FORS2_STD309.33.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.999600 FORS2     IMG       FORS2.1999-11-05T07:35:02.145
 FORS2_STD309.34.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.999800 FORS2     IMG       FORS2.1999-11-05T07:37:08.502
 FORS2_STD309.35.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.000300 FORS2     IMG       FORS2.1999-11-05T07:38:29.244
 FORS2_STD309.36.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.996500 FORS2     IMG       FORS2.1999-11-05T07:39:50.759
 FORS2_STD309.37.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.999600 FORS2     IMG       FORS2.1999-11-05T07:41:11.666
 FORS2_STD309.38.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.997000 FORS2     IMG       FORS2.1999-11-05T07:43:13.505
 FORS2_STD309.39.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.006900 FORS2     IMG       FORS2.1999-11-05T07:44:33.977
 FORS2_STD309.40.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.002200 FORS2     IMG       FORS2.1999-11-05T07:45:54.353
 FORS2_STD309.41.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.000400 FORS2     IMG       FORS2.1999-11-05T07:47:15.716
 FORS2_STD309.42.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.001100 FORS2     IMG       FORS2.1999-11-05T07:48:55.509
 FORS2_STD309.43.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.999600 FORS2     IMG       FORS2.1999-11-05T07:50:16.626
 FORS2_STD309.44.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.997100 FORS2     IMG       FORS2.1999-11-05T07:51:37.718
 FORS2_STD309.45.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.996900 FORS2     IMG       FORS2.1999-11-05T07:52:58.680
 FORS2_STD309.46.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.999300 FORS2     IMG       FORS2.1999-11-05T07:54:53.946
 FORS2_STD309.47.fits                       60.A-9203(C)    CALIB       273719998  -239040000            20.000300 FORS2     IMG       FORS2.1999-11-05T07:56:15.074
 FORS2_STD309.48.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.988200 FORS2     IMG       FORS2.1999-11-05T07:57:36.006
 FORS2_STD309.49.fits                       60.A-9203(C)    CALIB       273719998  -239040000            19.997800 FORS2     IMG       FORS2.1999-11-05T07:58:57.038
 FORS2_IMG309.10.fits                       60.A-9203(C)    SCIENCE     308519701  -244248227           179.986800 FORS2     IMG       FORS2.1999-11-05T08:05:46.836
 FORS2_IMG309.11.fits                       60.A-9203(C)    SCIENCE     309014398  -244247616           179.999700 FORS2     IMG       FORS2.1999-11-05T08:19:13.007
 FORS2_IMG309.12.fits                       60.A-9203(C)    SCIENCE     309014398  -244247616           179.999500 FORS2     IMG       FORS2.1999-11-05T08:24:10.512
 FORS2_IMG309.13.fits                       60.A-9203(C)    SCIENCE     309014398  -244247616           179.997400 FORS2     IMG       FORS2.1999-11-05T08:28:12.132
 FORS2_IMG309.14.fits                       60.A-9203(C)    SCIENCE     301952998   -23168016          1799.927300 FORS2     IMG       FORS2.1999-11-05T08:36:42.977
 FORS2_IMG_CALSKY309.fits                   60.A-9203(C)    TEST        598335001   -97209000             2.005000 FORS2     IMG       FORS2.1999-11-05T09:11:16.989
 FORS2_IMG_CALSKY309.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.007600 FORS2     IMG       FORS2.1999-11-05T09:12:36.092
 FORS2_IMG_CALSKY309.2.fits                 60.A-9203(C)    CALIB       598335001   -97198992            65.831900 FORS2     IMG       FORS2.1999-11-05T09:13:17.225
 FORS2_IMG_CALSKY309.3.fits                 60.A-9203(C)    CALIB       598335001   -97188984            54.082800 FORS2     IMG       FORS2.1999-11-05T09:15:16.481
 FORS2_IMG_CALSKY309.4.fits                 60.A-9203(C)    CALIB       598335001   -97179012            38.754500 FORS2     IMG       FORS2.1999-11-05T09:17:04.012
 FORS2_IMG_CALSKY309.5.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.996800 FORS2     IMG       FORS2.1999-11-05T09:18:47.819
 FORS2_IMG_CALSKY309.6.fits                 60.A-9203(C)    CALIB       598335001   -97219008            10.532500 FORS2     IMG       FORS2.1999-11-05T09:19:29.405
 FORS2_IMG_CALSKY309.7.fits                 60.A-9203(C)    CALIB       598335001   -97229016             8.061500 FORS2     IMG       FORS2.1999-11-05T09:20:33.030
 FORS2_IMG_CALSKY309.8.fits                 60.A-9203(C)    CALIB       598334997   -97238988             6.203900 FORS2     IMG       FORS2.1999-11-05T09:21:33.570
 FORS2_IMG_CALSKY309.9.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.996300 FORS2     IMG       FORS2.1999-11-05T09:22:45.129

Nov 15, 99 17:01 Page 3/4

CD.1999-11-04

Printed by Eckhard Sutorius

FORS 2 3/4

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY309.10.fits                60.A-9203(C)    CALIB       598335001   -97198992            37.738200 FORS2     IMG       FORS2.1999-11-05T09:23:26.525
 FORS2_IMG_CALSKY309.11.fits                60.A-9203(C)    CALIB       598335001   -97188984            27.544800 FORS2     IMG       FORS2.1999-11-05T09:24:57.126
 FORS2_IMG_CALSKY309.12.fits                60.A-9203(C)    CALIB       598335001   -97179012            19.715100 FORS2     IMG       FORS2.1999-11-05T09:26:17.451
 FORS2_IMG_CALSKY309.13.fits                60.A-9203(C)    TEST        598335001   -97209000             1.996800 FORS2     IMG       FORS2.1999-11-05T09:27:47.879
 FORS2_IMG_CALSKY309.14.fits                60.A-9203(C)    CALIB       598335001   -97219008             9.937000 FORS2     IMG       FORS2.1999-11-05T09:28:28.805
 FORS2_IMG_CALSKY309.15.fits                60.A-9203(C)    CALIB       598335001   -97229016             7.404200 FORS2     IMG       FORS2.1999-11-05T09:29:32.474
 FORS2_IMG_CALSKY309.16.fits                60.A-9203(C)    CALIB       598335001   -97238988             5.606800 FORS2     IMG       FORS2.1999-11-05T09:30:32.547
 FORS2_IMG_CALSKY309.17.fits                60.A-9203(C)    TEST        598335001   -97209000             2.006200 FORS2     IMG       FORS2.1999-11-05T09:31:46.759
 FORS2_IMG_CALSKY309.18.fits                60.A-9203(C)    CALIB       598335001   -97198992             2.442300 FORS2     IMG       FORS2.1999-11-05T09:32:28.129
 FORS2_IMG_CALSKY309.19.fits                60.A-9203(C)    CALIB       598335001   -97188984             1.847600 FORS2     IMG       FORS2.1999-11-05T09:33:23.725
 FORS2_IMG_CALSKY309.20.fits                60.A-9203(C)    CALIB       598335001   -97179012             1.417200 FORS2     IMG       FORS2.1999-11-05T09:34:19.023
 FORS2_IMG_CAL309.fits                      60.A-9203(C)    CALIB       598335001   -97179012             0.023800 FORS2     IMG       FORS2.1999-11-05T09:36:17.752
 FORS2_IMG_CAL309.1.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.018200 FORS2     IMG       FORS2.1999-11-05T09:37:06.541
 FORS2_IMG_CAL309.2.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.020100 FORS2     IMG       FORS2.1999-11-05T09:37:55.379
 FORS2_IMG_CAL309.3.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.019900 FORS2     IMG       FORS2.1999-11-05T09:38:44.450
 FORS2_IMG_CAL309.4.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.020600 FORS2     IMG       FORS2.1999-11-05T09:39:32.838
 FORS2_IMG_CAL309.5.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.018000 FORS2     IMG       FORS2.1999-11-05T09:40:26.536
 FORS2_IMG_CAL309.6.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.016700 FORS2     IMG       FORS2.1999-11-05T09:41:15.983
 FORS2_IMG_CAL309.7.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.018500 FORS2     IMG       FORS2.1999-11-05T09:42:04.634
 FORS2_IMG_CAL309.8.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.020300 FORS2     IMG       FORS2.1999-11-05T09:42:53.116
 FORS2_IMG_CAL309.9.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.019100 FORS2     IMG       FORS2.1999-11-05T09:43:42.351
 FORS2_IMG_CAL309.10.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.019100 FORS2     IMG       FORS2.1999-11-05T09:45:42.217
 FORS2_IMG_CAL309.11.fits                   60.A-9203(C)    CALIB       598335001   -97188984             0.019200 FORS2     IMG       FORS2.1999-11-05T09:47:30.038
 FORS2_IMG_CAL309.12.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.019100 FORS2     IMG       FORS2.1999-11-05T09:49:17.637
 FORS2_IMG_CAL309.13.fits                   60.A-9203(C)    CALIB       598335001   -97188984             0.020900 FORS2     IMG       FORS2.1999-11-05T09:51:05.233
 FORS2_IMG_CAL309.14.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.020800 FORS2     IMG       FORS2.1999-11-05T09:52:52.854
 FORS2_IMG_CAL309.15.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.020700 FORS2     IMG       FORS2.1999-11-05T09:54:45.183
 FORS2_IMG_CAL309.16.fits                   60.A-9203(C)    CALIB       598335001   -97188984             0.019900 FORS2     IMG       FORS2.1999-11-05T09:56:33.071
 FORS2_IMG_CAL309.17.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.018700 FORS2     IMG       FORS2.1999-11-05T09:58:20.633
 FORS2_IMG_CAL309.18.fits                   60.A-9203(C)    CALIB       598335001   -97188984             0.018400 FORS2     IMG       FORS2.1999-11-05T10:00:08.153
 FORS2_IMG_CAL309.19.fits                   60.A-9203(C)    CALIB       598335001   -97179012             0.020400 FORS2     IMG       FORS2.1999-11-05T10:01:55.693

Nov 15, 99 17:01 Page 4/4

CD.1999-11-04

Printed by Eckhard Sutorius

FORS 2 4/4