 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CAL310.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996300 FORS2     IMG       FORS2.1999-11-06T19:47:04.492
 FORS2_IMG_CAL310.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.994400 FORS2     IMG       FORS2.1999-11-06T19:49:12.897
 FORS2_IMG_CAL310.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.007100 FORS2     IMG       FORS2.1999-11-06T19:50:06.665
 FORS2_IMG_CAL310.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.997400 FORS2     IMG       FORS2.1999-11-06T19:51:15.906
 FORS2_IMG_CAL310.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996900 FORS2     IMG       FORS2.1999-11-06T19:52:09.354
 FORS2_IMG_CAL310.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.995400 FORS2     IMG       FORS2.1999-11-06T19:53:18.306
 FORS2_IMG_CAL310.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.997000 FORS2     IMG       FORS2.1999-11-06T19:54:13.566
 FORS2_IMG_CAL310.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999800 FORS2     IMG       FORS2.1999-11-06T19:55:24.002
 FORS2_IMG_CAL310.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999800 FORS2     IMG       FORS2.1999-11-06T19:56:25.781
 FORS2_LSS_CAL310.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            12.005800 FORS2     LSS       FORS2.1999-11-06T20:00:18.311
 FORS2_LSS_CAL310.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            74.990600 FORS2     LSS       FORS2.1999-11-06T20:03:07.283
 FORS2_LSS_CAL310.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.995100 FORS2     LSS       FORS2.1999-11-06T20:06:35.649
 FORS2_LSS_CAL310.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            74.999200 FORS2     LSS       FORS2.1999-11-06T20:08:25.237
 FORS2_MOS_CAL310.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            23.990600 FORS2     MOS       FORS2.1999-11-06T20:12:12.576
 FORS2_MOS_CAL310.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            24.001600 FORS2     MOS       FORS2.1999-11-06T20:15:28.271
 FORS2_MOS_CAL310.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            74.988700 FORS2     MOS       FORS2.1999-11-06T20:19:20.591
 FORS2_ECH_CAL_MOSSCRF310.fits              60.A-9203(C)    CALIB     -2147483648 -2147483648           199.996900 FORS2     ECH       FORS2.1999-11-06T20:23:44.510
 FORS2_ECH_CAL_MOSWAV310.fits               60.A-9203(C)    CALIB     -2147483648 -2147483648           299.979700 FORS2     ECH       FORS2.1999-11-06T20:39:26.789
 FORS2_ECH_CAL_MOSWAV310.1.fits             60.A-9203(C)    CALIB     -2147483648 -2147483648           298.981400 FORS2     ECH       FORS2.1999-11-06T20:51:37.271
 FORS2_IMG_CAL310.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021300 FORS2     IMG       FORS2.1999-11-06T20:59:33.547
 FORS2_IMG_CAL310.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-06T21:00:22.186
 FORS2_IMG_CAL310.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022800 FORS2     IMG       FORS2.1999-11-06T21:01:11.124
 FORS2_IMG_CAL310.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018300 FORS2     IMG       FORS2.1999-11-06T21:02:00.048
 FORS2_IMG_CAL310.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-06T21:02:49.027
 FORS2_IMG_CAL310.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016900 FORS2     IMG       FORS2.1999-11-06T21:03:43.017
 FORS2_IMG_CAL310.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-06T21:04:32.656
 FORS2_IMG_CAL310.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015600 FORS2     IMG       FORS2.1999-11-06T21:05:21.416
 FORS2_IMG_CAL310.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021000 FORS2     IMG       FORS2.1999-11-06T21:06:10.471
 FORS2_IMG_CAL310.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020200 FORS2     IMG       FORS2.1999-11-06T21:06:59.569
 FORS2_IMG_CAL310.20.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            19.999000 FORS2     IMG       FORS2.1999-11-06T22:13:07.197
 FORS2_IMG_CAL310.21.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            20.010500 FORS2     IMG       FORS2.1999-11-06T22:14:07.014
 FORS2_IMG_CAL310.22.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            19.999900 FORS2     IMG       FORS2.1999-11-06T22:15:06.284
 FORS2_IMG_CAL310.23.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            19.997000 FORS2     IMG       FORS2.1999-11-06T22:16:05.535
 FORS2_IMG_CAL310.24.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            20.000000 FORS2     IMG       FORS2.1999-11-06T22:17:04.947
 FORS2_IMG_CAL310.25.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            19.996600 FORS2     IMG       FORS2.1999-11-06T22:18:04.432
 FORS2_IMG_CAL310.26.fits                   60.A-9203(C)    TEST      -2147483648 -2147483648            19.998100 FORS2     IMG       FORS2.1999-11-06T22:19:03.874
 FORS2_IMG_CALSKY310.16.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.997800 FORS2     IMG       FORS2.1999-11-06T23:08:36.159
 FORS2_IMG_CALSKY310.17.fits                60.A-9203(C)    TEST       1275525000  -142440012             1.995400 FORS2     IMG       FORS2.1999-11-06T23:11:37.411
 FORS2_IMG_CALSKY310.18.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.998800 FORS2     IMG       FORS2.1999-11-06T23:12:25.072
 FORS2_IMG_CALSKY310.19.fits                60.A-9203(C)    CALIB      1275512029  -142440012             1.893900 FORS2     IMG       FORS2.1999-11-06T23:13:05.585
 FORS2_IMG_CALSKY310.20.fits                60.A-9203(C)    CALIB      1275499058  -142440012             0.995500 FORS2     IMG       FORS2.1999-11-06T23:14:00.608
 FORS2_IMG_CALSKY310.21.fits                60.A-9203(C)    CALIB      1275486087  -142440012             2.268400 FORS2     IMG       FORS2.1999-11-06T23:14:56.298
 FORS2_IMG_CALSKY310.22.fits                60.A-9203(C)    TEST       1275525000  -142440012             2.001400 FORS2     IMG       FORS2.1999-11-06T23:16:08.289
 FORS2_IMG_CALSKY310.23.fits                60.A-9203(C)    CALIB      1275537970  -142440012             2.481300 FORS2     IMG       FORS2.1999-11-06T23:16:49.726
 FORS2_IMG_CALSKY310.24.fits                60.A-9203(C)    CALIB      1275550941  -142440012             7.162500 FORS2     IMG       FORS2.1999-11-06T23:17:46.270
 FORS2_IMG_CALSKY310.25.fits                60.A-9203(C)    CALIB      1275563912  -142440012             6.791200 FORS2     IMG       FORS2.1999-11-06T23:18:45.797
 FORS2_IMG_CALSKY310.26.fits                60.A-9203(C)    TEST       1275525000  -142440012             2.006900 FORS2     IMG       FORS2.1999-11-06T23:20:03.141
 FORS2_IMG_CALSKY310.27.fits                60.A-9203(C)    CALIB      1275512029  -142440012            11.705100 FORS2     IMG       FORS2.1999-11-06T23:20:44.375
 FORS2_IMG_CALSKY310.28.fits                60.A-9203(C)    CALIB      1275499058  -142440012            17.949300 FORS2     IMG       FORS2.1999-11-06T23:21:51.263
 FORS2_IMG_CALSKY310.29.fits                60.A-9203(C)    CALIB      1275486087  -142440012            26.746500 FORS2     IMG       FORS2.1999-11-06T23:23:01.405
 FORS2_IMG_CALSKY310.30.fits                60.A-9203(C)    TEST       1275525000  -142440012             2.007700 FORS2     IMG       FORS2.1999-11-06T23:24:32.339
 FORS2_IMG_CALSKY310.31.fits                60.A-9203(C)    CALIB      1275537970  -142440012             4.640400 FORS2     IMG       FORS2.1999-11-06T23:25:13.397
 FORS2_IMG_CALSKY310.32.fits                60.A-9203(C)    CALIB      1275550941  -142440012             6.949200 FORS2     IMG       FORS2.1999-11-06T23:26:11.562
 FORS2_IMG_CALSKY310.33.fits                60.A-9203(C)    CALIB      1275563912  -142440012             9.151300 FORS2     IMG       FORS2.1999-11-06T23:27:10.877
 FORS2_IMG_CALSKY310.34.fits                60.A-9203(C)    TEST       1275525000  -142440012             2.005300 FORS2     IMG       FORS2.1999-11-06T23:28:26.020
 FORS2_IMG_CALSKY310.35.fits                60.A-9203(C)    CALIB      1275512029  -142440012            28.684500 FORS2     IMG       FORS2.1999-11-06T23:29:07.365
 FORS2_IMG_CALSKY310.36.fits                60.A-9203(C)    CALIB      1275499058  -142440012            47.302100 FORS2     IMG       FORS2.1999-11-06T23:30:28.840
 FORS2_IMG_CALSKY310.37.fits                60.A-9203(C)    CALIB      1275486087  -142440012            72.830100 FORS2     IMG       FORS2.1999-11-06T23:32:08.281
 FORS2_STD310.24.fits                       60.A-9203(C)    CALIB      1119577500   -38788992            59.997000 FORS2     IMG       FORS2.1999-11-06T23:42:36.014

Nov 15, 99 17:07 Page 1/3

CD.1999-11-06

Printed by Eckhard Sutorius

FORS 2 1/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_STD310.25.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             7.000000 FORS2     IMG       FORS2.1999-11-06T23:46:24.843
 FORS2_STD310.26.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.998500 FORS2     IMG       FORS2.1999-11-06T23:47:32.484
 FORS2_STD310.27.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.001800 FORS2     IMG       FORS2.1999-11-06T23:48:44.454
 FORS2_STD310.28.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.999200 FORS2     IMG       FORS2.1999-11-06T23:49:56.043
 FORS2_STD310.29.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             6.993100 FORS2     IMG       FORS2.1999-11-06T23:52:07.675
 FORS2_STD310.30.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.997500 FORS2     IMG       FORS2.1999-11-06T23:53:15.324
 FORS2_STD310.31.fits                       60.A-9203(C)    CALIB      1119577500   -38788992            10.000500 FORS2     IMG       FORS2.1999-11-06T23:54:26.417
 FORS2_STD310.32.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.998900 FORS2     IMG       FORS2.1999-11-06T23:55:38.573
 FORS2_STD311.fits                          60.A-9203(C)    CALIB      1202730001    -1308996             6.003000 FORS2     IMG       FORS2.1999-11-07T00:02:18.892
 FORS2_STD311.1.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             2.010000 FORS2     IMG       FORS2.1999-11-07T00:03:25.907
 FORS2_STD311.2.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             0.999400 FORS2     IMG       FORS2.1999-11-07T00:04:28.952
 FORS2_STD311.3.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             2.997300 FORS2     IMG       FORS2.1999-11-07T00:05:32.439
 FORS2_STD311.4.fits                        60.A-9203(C)    CALIB      1272435001    20809008             7.000000 FORS2     IMG       FORS2.1999-11-07T00:13:33.790
 FORS2_STD311.5.fits                        60.A-9203(C)    CALIB      1272435001    20809008             9.002200 FORS2     IMG       FORS2.1999-11-07T00:17:47.285
 FORS2_STD311.6.fits                        60.A-9203(C)    CALIB      1272435001    20809008             9.996600 FORS2     IMG       FORS2.1999-11-07T00:19:00.293
 FORS2_STD311.7.fits                        60.A-9203(C)    CALIB      1272435001    20809008             9.997000 FORS2     IMG       FORS2.1999-11-07T00:20:13.387
 FORSFieldAcq311.fits                       NULL            NULL       1130690610   -16702884           180.000000 NULL      NULL      FORS2.1999-11-07T00:26:11.782
 FORS2_MOS311.fits                          60.A-9203(C)    TEST       1130691261   -16703172           299.989300 FORS2     MOS       FORS2.1999-11-07T00:32:37.575
 FORS2_MOS311.1.fits                        60.A-9203(C)    SCIENCE    1130691261   -16703172          1799.926700 FORS2     MOS       FORS2.1999-11-07T00:46:42.217
 FORSFieldAcq311.1.fits                     NULL            NULL         59442854   -92728008           120.000000 NULL      NULL      FORS2.1999-11-07T01:24:24.744
 FORS2_MOS311.2.fits                        60.A-9203(C)    TEST         59443790   -92728368           299.991200 FORS2     MOS       FORS2.1999-11-07T01:29:06.123
 FORS2_MOS311.3.fits                        60.A-9203(C)    SCIENCE      59443790   -92728368          1799.927500 FORS2     MOS       FORS2.1999-11-07T01:36:49.543
 FORSFieldAcq311.2.fits                     NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-07T02:13:55.455
 FORSFocfAcq311.fits                        NULL            NULL        143854304    -5659740           240.000000 NULL      NULL      FORS2.1999-11-07T02:19:29.013
 FORS2_LSS311.fits                          60.A-9203(C)    SCIENCE     143854293    -5660496          1799.926900 FORS2     LSS       FORS2.1999-11-07T02:39:50.875
 test_without_slit.fits                     NULL            TEST        143854293    -5660496           298.989500 FORS2     FREE      FORS2.1999-11-07T03:21:23.874
 FORSFieldAcq311.3.fits                     NULL            NULL         59426236   -92766312           180.000000 NULL      NULL      FORS2.1999-11-07T03:35:50.275
 FORS2_MOS311.4.fits                        60.A-9203(C)    TEST         59427226   -92767356           299.993300 FORS2     MOS       FORS2.1999-11-07T03:42:35.171
 FORS2_MOS311.5.fits                        60.A-9203(C)    SCIENCE      59427226   -92767356          1799.927800 FORS2     MOS       FORS2.1999-11-07T03:55:14.403
 FORSFieldAcq311.4.fits                     NULL            NULL        196624454     1315692           180.000000 NULL      NULL      FORS2.1999-11-07T04:31:37.286
 FORS2_MOS311.6.fits                        60.A-9203(C)    TEST        196624526     1315728           299.990600 FORS2     MOS       FORS2.1999-11-07T04:41:09.996
 FORS2_MOS311.7.fits                        60.A-9203(C)    SCIENCE     196624526     1315728          1799.926700 FORS2     MOS       FORS2.1999-11-07T04:49:59.692
 FORSFieldAcq311.5.fits                     NULL            NULL        196624454     1315692           180.000000 NULL      NULL      FORS2.1999-11-07T05:25:05.049
 FORS2_MOS311.8.fits                        60.A-9203(C)    TEST        196624512     1315548           300.000200 FORS2     MOS       FORS2.1999-11-07T05:31:54.447
 FORS2_MOS311.9.fits                        60.A-9203(C)    SCIENCE     196624512     1315548          1799.915800 FORS2     MOS       FORS2.1999-11-07T05:39:56.514
 FORS2_MOS311.10.fits                       60.A-9203(C)    SCIENCE     196624512     1315548          1798.933000 FORS2     MOS       FORS2.1999-11-07T06:15:36.821
 FORS2_STD311.8.fits                        60.A-9203(C)    CALIB       273719998  -239040000            59.987700 FORS2     IMG       FORS2.1999-11-07T06:53:47.178
 FORS2_STD311.9.fits                        60.A-9203(C)    CALIB       273719998  -239040000            59.998600 FORS2     IMG       FORS2.1999-11-07T06:55:37.644
 FORS2_STD311.10.fits                       60.A-9203(C)    CALIB       273719998  -239040000            59.992500 FORS2     IMG       FORS2.1999-11-07T06:57:27.601
 FORS2_STD311.11.fits                       60.A-9203(C)    CALIB       273719998  -239040000            59.994300 FORS2     IMG       FORS2.1999-11-07T06:59:17.352
 FORS2_STD311.12.fits                       60.A-9203(C)    CALIB       273719998  -239040000            59.997500 FORS2     IMG       FORS2.1999-11-07T07:01:07.728
 FORS2_STD311.13.fits                       60.A-9203(C)    CALIB       273719998  -239040000            60.000000 FORS2     IMG       FORS2.1999-11-07T07:02:57.847
 FORS2_STD311.14.fits                       60.A-9203(C)    CALIB       273719998  -239040000            58.996500 FORS2     IMG       FORS2.1999-11-07T07:04:48.231
 FORS2_STD311.15.fits                       60.A-9203(C)    CALIB       273719998  -239040000            60.006300 FORS2     IMG       FORS2.1999-11-07T07:06:38.346
 FORS2_STD311.16.fits                       60.A-9203(C)    CALIB       273719998  -239040000            58.997800 FORS2     IMG       FORS2.1999-11-07T07:08:28.752
 FORS2_STD311.17.fits                       60.A-9203(C)    CALIB       273719998  -239040000            59.995400 FORS2     IMG       FORS2.1999-11-07T07:10:18.951
 FORSFieldAcq311.6.fits                     NULL            NULL        273719984  -239040000           300.000000 NULL      NULL      FORS2.1999-11-07T07:17:02.416
 FORS2_IMG311.fits                          60.A-9203(C)    SCIENCE     273720675  -239037732           299.990500 FORS2     IMG       FORS2.1999-11-07T07:24:51.748
 FORS2_MOS311.11.fits                       60.A-9203(C)    SCIENCE     273720675  -239037732           299.985100 FORS2     MOS       FORS2.1999-11-07T07:31:11.772
 skyImage.fits                              NULL            NULL        301102711    79447176            10.002100 FORS2     FREE      FORS2.1999-11-07T07:43:19.071
 slitImage.fits                             NULL            NULL        301102711    79447176             9.991600 FORS2     FREE      FORS2.1999-11-07T07:46:17.047
 slitImage.fits                             NULL            NULL      -2147483648 -2147483648            10.000000 NULL      FREE      FORS2.1999-11-07T07:50:40.618
 FORS2_HTR311_07B1.fits                     NULL            NULL      -2147483648 -2147483648             2.500200 NULL      NULL      FORS2.1999-11-07T08:07:05.616
 FORS2_HTR311_07B1.1.fits                   NULL            NULL      -2147483648 -2147483648             2.494600 NULL      NULL      FORS2.1999-11-07T08:08:59.436
 FORS2_HTR311_07B1.2.fits                   NULL            NULL      -2147483648 -2147483648             2.499500 NULL      NULL      FORS2.1999-11-07T08:10:49.351
 FORS2_HTR311_07B1.3.fits                   NULL            NULL      -2147483648 -2147483648             2.500500 NULL      NULL      FORS2.1999-11-07T08:12:38.490
 FORS2_HTR311_07B1.4.fits                   NULL            NULL      -2147483648 -2147483648             2.497200 NULL      NULL      FORS2.1999-11-07T08:14:27.922
 FORS2_HTR311_07B1.5.fits                   NULL            NULL      -2147483648 -2147483648             2.495200 NULL      NULL      FORS2.1999-11-07T08:16:17.651
 FORS2_HTR311_07B1.6.fits                   NULL            NULL      -2147483648 -2147483648             2.497000 NULL      NULL      FORS2.1999-11-07T08:18:15.823

Nov 15, 99 17:07 Page 2/3

CD.1999-11-06

Printed by Eckhard Sutorius

FORS 2 2/3

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_HTR311_07B1.7.fits                   NULL            NULL      -2147483648 -2147483648             2.497000 NULL      NULL      FORS2.1999-11-07T08:20:06.240
 FORS2_HTR311_07R1.fits                     NULL            NULL      -2147483648 -2147483648             2.504300 NULL      NULL      FORS2.1999-11-07T08:22:48.966
 FORS2_HTR311_07R1.1.fits                   NULL            NULL      -2147483648 -2147483648             2.502800 NULL      NULL      FORS2.1999-11-07T08:24:41.684
 FORS2_HTR311_07R1.2.fits                   NULL            NULL      -2147483648 -2147483648             2.502300 NULL      NULL      FORS2.1999-11-07T08:26:31.418
 FORS2_HTR311_07R1.3.fits                   NULL            NULL      -2147483648 -2147483648             2.498400 NULL      NULL      FORS2.1999-11-07T08:28:20.629
 FORS2_HTR311_07R1.4.fits                   NULL            NULL      -2147483648 -2147483648             2.502200 NULL      NULL      FORS2.1999-11-07T08:30:11.625
 FORS2_HTR311_07R1.5.fits                   NULL            NULL      -2147483648 -2147483648             2.494400 NULL      NULL      FORS2.1999-11-07T08:32:00.335
 FORS2_HTR311_07R1.6.fits                   NULL            NULL      -2147483648 -2147483648             2.503200 NULL      NULL      FORS2.1999-11-07T08:33:49.723
 FORS2_HTR311_07RX1.fits                    NULL            NULL      -2147483648 -2147483648             2.497400 NULL      NULL      FORS2.1999-11-07T08:36:34.512
 FORS2_HTR311_07RX1.1.fits                  NULL            NULL      -2147483648 -2147483648             2.503700 NULL      NULL      FORS2.1999-11-07T08:38:30.013
 FORS2_HTR311_07BX1.fits                    NULL            NULL      -2147483648 -2147483648             2.495100 NULL      NULL      FORS2.1999-11-07T08:40:42.975
 FORS2_HTR311_07BX1.1.fits                  NULL            NULL      -2147483648 -2147483648             2.496400 NULL      NULL      FORS2.1999-11-07T08:42:33.453
 FORS2_HTR311_07BC1.fits                    NULL            NULL      -2147483648 -2147483648             2.500800 NULL      NULL      FORS2.1999-11-07T08:44:57.058
 FORS2_HTR311_07BC1.1.fits                  NULL            NULL      -2147483648 -2147483648             2.498200 NULL      NULL      FORS2.1999-11-07T08:46:46.432
 FORS2_HTR311_07RC1.fits                    NULL            NULL      -2147483648 -2147483648             2.500000 NULL      NULL      FORS2.1999-11-07T08:48:58.510
 FORS2_HTR311_07RC1.1.fits                  NULL            NULL      -2147483648 -2147483648             2.495900 NULL      NULL      FORS2.1999-11-07T08:50:55.570
 FORS2_IMG_CALSKY311.fits                   60.A-9203(C)    TEST        598335001   -97209000          3863.409400 FORS2     IMG       FORS2.1999-11-07T09:01:44.420
 FORS2_IMG_CALSKY311.1.fits                 60.A-9203(C)    CALIB       598335001   -97198992            51.825200 FORS2     IMG       FORS2.1999-11-07T09:02:27.464
 FORS2_IMG_CALSKY311.2.fits                 60.A-9203(C)    CALIB       598335001   -97188984            53.345100 FORS2     IMG       FORS2.1999-11-07T09:04:12.568
 FORS2_IMG_CALSKY311.3.fits                 60.A-9203(C)    CALIB       598335001   -97179012            42.272700 FORS2     IMG       FORS2.1999-11-07T09:06:00.551
 FORS2_IMG_CALSKY311.4.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.994700 FORS2     IMG       FORS2.1999-11-07T09:07:53.911
 FORS2_IMG_CALSKY311.5.fits                 60.A-9203(C)    CALIB       598335001   -97219008            42.379900 FORS2     IMG       FORS2.1999-11-07T09:08:37.195
 FORS2_IMG_CALSKY311.6.fits                 60.A-9203(C)    CALIB       598335001   -97229016            34.093800 FORS2     IMG       FORS2.1999-11-07T09:10:14.314
 FORS2_IMG_CALSKY311.7.fits                 60.A-9203(C)    CALIB       598334997   -97238988            25.991500 FORS2     IMG       FORS2.1999-11-07T09:11:43.289
 FORS2_IMG_CALSKY311.8.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.997100 FORS2     IMG       FORS2.1999-11-07T09:13:24.059
 FORS2_IMG_CALSKY311.9.fits                 60.A-9203(C)    CALIB       598335001   -97198992            12.146000 FORS2     IMG       FORS2.1999-11-07T09:14:05.795
 FORS2_IMG_CALSKY311.10.fits                60.A-9203(C)    CALIB       598335001   -97188984             9.122100 FORS2     IMG       FORS2.1999-11-07T09:15:11.116
 FORS2_IMG_CALSKY311.11.fits                60.A-9203(C)    CALIB       598335001   -97179012             7.237400 FORS2     IMG       FORS2.1999-11-07T09:16:12.818
 FORS2_IMG_CALSKY311.12.fits                60.A-9203(C)    TEST        598335001   -97209000             1.995000 FORS2     IMG       FORS2.1999-11-07T09:17:41.069
 FORS2_IMG_CALSKY311.13.fits                60.A-9203(C)    CALIB       598335001   -97219008             7.590300 FORS2     IMG       FORS2.1999-11-07T09:18:22.135
 FORS2_IMG_CALSKY311.14.fits                60.A-9203(C)    CALIB       598335001   -97229016             5.730500 FORS2     IMG       FORS2.1999-11-07T09:19:22.375
 FORS2_IMG_CALSKY311.15.fits                60.A-9203(C)    CALIB       598334997   -97238988             4.458900 FORS2     IMG       FORS2.1999-11-07T09:20:21.374
 FORS2_IMG_CAL311.fits                      60.A-9203(C)    CALIB       598335001   -97229016             0.020600 FORS2     IMG       FORS2.1999-11-07T09:21:42.490
 FORS2_IMG_CAL311.1.fits                    60.A-9203(C)    CALIB       598334997   -97238988             0.017800 FORS2     IMG       FORS2.1999-11-07T09:22:31.251
 FORS2_IMG_CAL311.2.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.017400 FORS2     IMG       FORS2.1999-11-07T09:23:19.802
 FORS2_IMG_CAL311.3.fits                    60.A-9203(C)    CALIB       598334997   -97238988             0.016400 FORS2     IMG       FORS2.1999-11-07T09:24:08.384
 FORS2_IMG_CAL311.4.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020300 FORS2     IMG       FORS2.1999-11-07T09:24:57.137
 FORS2_IMG_CAL311.5.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.019800 FORS2     IMG       FORS2.1999-11-07T09:25:52.764
 FORS2_IMG_CAL311.6.fits                    60.A-9203(C)    CALIB       598334997   -97238988             0.018800 FORS2     IMG       FORS2.1999-11-07T09:26:41.704
 FORS2_IMG_CAL311.7.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020900 FORS2     IMG       FORS2.1999-11-07T09:27:31.285
 FORS2_IMG_CAL311.8.fits                    60.A-9203(C)    CALIB       598334997   -97238988             0.020200 FORS2     IMG       FORS2.1999-11-07T09:28:20.213
 FORS2_IMG_CAL311.9.fits                    60.A-9203(C)    CALIB       598335001   -97229016             0.020400 FORS2     IMG       FORS2.1999-11-07T09:29:08.731
 FORS2_IMG_CAL311.10.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.020900 FORS2     IMG       FORS2.1999-11-07T09:31:25.201
 FORS2_IMG_CAL311.11.fits                   60.A-9203(C)    CALIB       598334997   -97238988             0.017700 FORS2     IMG       FORS2.1999-11-07T09:33:12.903
 FORS2_IMG_CAL311.12.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.020200 FORS2     IMG       FORS2.1999-11-07T09:35:00.588
 FORS2_IMG_CAL311.13.fits                   60.A-9203(C)    CALIB       598334997   -97238988             0.020900 FORS2     IMG       FORS2.1999-11-07T09:36:48.193
 FORS2_IMG_CAL311.14.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.020700 FORS2     IMG       FORS2.1999-11-07T09:38:36.069
 FORS2_IMG_CAL311.15.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.016700 FORS2     IMG       FORS2.1999-11-07T09:40:31.025
 FORS2_IMG_CAL311.16.fits                   60.A-9203(C)    CALIB       598334997   -97238988             0.019000 FORS2     IMG       FORS2.1999-11-07T09:42:18.854
 FORS2_IMG_CAL311.17.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.020700 FORS2     IMG       FORS2.1999-11-07T09:44:06.247
 FORS2_IMG_CAL311.18.fits                   60.A-9203(C)    CALIB       598334997   -97238988             0.017800 FORS2     IMG       FORS2.1999-11-07T09:45:53.800
 FORS2_IMG_CAL311.19.fits                   60.A-9203(C)    CALIB       598335001   -97229016             0.016400 FORS2     IMG       FORS2.1999-11-07T09:47:41.412

Nov 15, 99 17:07 Page 3/3

CD.1999-11-06

Printed by Eckhard Sutorius

FORS 2 3/3