 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CAL315.28.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.290000 FORS2     IMG       FORS2.1999-11-11T18:29:08.970
 FORS2_IMG_CAL315.29.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.518100 FORS2     IMG       FORS2.1999-11-11T18:32:01.139
 FORS2_IMG_CAL315.30.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.996800 FORS2     IMG       FORS2.1999-11-11T18:33:00.823
 FORS2_IMG_CAL315.31.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.005500 FORS2     IMG       FORS2.1999-11-11T18:34:01.921
 FORS2_IMG_CAL315.32.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.996000 FORS2     IMG       FORS2.1999-11-11T18:37:57.425
 FORS2_IMG_CAL315.33.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.288400 FORS2     IMG       FORS2.1999-11-11T18:41:50.463
 FORS2_IMG_CAL315.34.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.287100 FORS2     IMG       FORS2.1999-11-11T18:42:41.966
 FORS2_IMG_CAL315.35.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.284900 FORS2     IMG       FORS2.1999-11-11T18:43:34.063
 FORS2_IMG_CAL315.36.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.284700 FORS2     IMG       FORS2.1999-11-11T18:44:26.091
 FORS2_IMG_CAL315.37.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.286800 FORS2     IMG       FORS2.1999-11-11T18:45:18.185
 FORS2_IMG_CAL315.38.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.995100 FORS2     IMG       FORS2.1999-11-11T18:47:44.472
 FORS2_IMG_CAL315.39.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.997400 FORS2     IMG       FORS2.1999-11-11T18:48:37.336
 FORS2_IMG_CAL315.40.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.007000 FORS2     IMG       FORS2.1999-11-11T18:49:29.999
 FORS2_IMG_CAL315.41.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.995900 FORS2     IMG       FORS2.1999-11-11T18:50:23.323
 FORS2_IMG_CAL315.42.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.996600 FORS2     IMG       FORS2.1999-11-11T18:51:16.167
 FORS2_IMG_CAL315.43.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.005100 FORS2     IMG       FORS2.1999-11-11T18:52:56.876
 FORS2_IMG_CAL315.44.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.995600 FORS2     IMG       FORS2.1999-11-11T18:53:52.536
 FORS2_IMG_CAL315.45.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.006000 FORS2     IMG       FORS2.1999-11-11T18:54:47.676
 FORS2_IMG_CAL315.46.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.005500 FORS2     IMG       FORS2.1999-11-11T18:55:42.628
 FORS2_IMG_CAL315.47.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.006400 FORS2     IMG       FORS2.1999-11-11T18:56:37.316
 FORS2_IMG_CAL315.48.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000900 FORS2     IMG       FORS2.1999-11-11T18:58:10.953
 FORS2_IMG_CAL315.49.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000700 FORS2     IMG       FORS2.1999-11-11T18:59:13.081
 FORS2_IMG_CAL315.50.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.002300 FORS2     IMG       FORS2.1999-11-11T19:00:15.729
 FORS2_IMG_CAL315.51.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000700 FORS2     IMG       FORS2.1999-11-11T19:01:17.994
 FORS2_IMG_CAL315.52.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.998800 FORS2     IMG       FORS2.1999-11-11T19:02:20.874
 FORS2_IMG_CAL315.53.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020800 FORS2     IMG       FORS2.1999-11-11T19:04:11.486
 FORS2_IMG_CAL315.54.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-11T19:04:59.921
 FORS2_IMG_CAL315.55.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020700 FORS2     IMG       FORS2.1999-11-11T19:05:49.474
 FORS2_IMG_CAL315.56.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-11T19:06:38.502
 FORS2_IMG_CAL315.57.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-11T19:07:27.641
 FORS2_MXU_CAL315.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:09:52.516
 FORS2_MXU_CAL315.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:13:54.351
 FORS2_MXU_CAL315.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:18:00.254
 FORS2_MXU_CAL315.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:22:01.209
 FORS2_MXU_CAL315.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:26:06.703
 FORS2_MXU_CAL315.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           180.000000 FORS2     MXU       FORS2.1999-11-11T19:30:07.901
 FORS2_MXU_CAL315.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            80.000000 FORS2     MXU       FORS2.1999-11-11T19:34:39.488
 FORS2_MXU_CAL315.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            80.000000 FORS2     MXU       FORS2.1999-11-11T19:37:32.023
 FORS2_MXU_CAL315.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            80.000000 FORS2     MXU       FORS2.1999-11-11T19:40:23.680
 FORS2_Skyconc.fits                         NULL            TEST      -2147483648 -2147483648             0.999900 FORS2     FREE      FORS2.1999-11-11T19:50:14.119
 FORS2_Skyconc.1.fits                       NULL            TEST      -2147483648 -2147483648             2.995900 FORS2     FREE      FORS2.1999-11-11T19:51:53.341
 FORS2_Skyconc.5.fits                       NULL            TEST      -2147483648 -2147483648             1.500900 FORS2     FREE      FORS2.1999-11-11T20:02:53.238
 FORS2_Skyconc.6.fits                       NULL            TEST      -2147483648 -2147483648             1.000700 FORS2     FREE      FORS2.1999-11-11T20:08:43.575
 FORS2_Skyconc.7.fits                       NULL            TEST      -2147483648 -2147483648             0.999400 FORS2     FREE      FORS2.1999-11-11T20:13:09.087
 FORS2_Focus.fits                           NULL            TEST      -2147483648 -2147483648             0.998300 FORS2     FREE      FORS2.1999-11-11T20:18:44.359
 FORS2_Focus.1.fits                         NULL            TEST      -2147483648 -2147483648             0.997100 FORS2     FREE      FORS2.1999-11-11T20:21:12.565
 FORS2_Focus.2.fits                         NULL            TEST      -2147483648 -2147483648             1.000300 FORS2     FREE      FORS2.1999-11-11T20:22:38.419
 FORS2_Focus.3.fits                         NULL            TEST      -2147483648 -2147483648             0.996700 FORS2     FREE      FORS2.1999-11-11T20:25:26.505
 FORS2_Focus.4.fits                         NULL            TEST      -2147483648 -2147483648             0.998900 FORS2     FREE      FORS2.1999-11-11T20:26:53.038
 FORS2_Focus.5.fits                         NULL            TEST      -2147483648 -2147483648             0.997600 FORS2     FREE      FORS2.1999-11-11T20:30:44.056
 FORS2_Focus.6.fits                         NULL            TEST      -2147483648 -2147483648             0.997800 FORS2     FREE      FORS2.1999-11-11T20:32:39.281
 FORS2_LSS_CAL315.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            12.000400 FORS2     LSS       FORS2.1999-11-11T20:36:04.719
 FORS2_LSS_CAL315.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.996700 FORS2     LSS       FORS2.1999-11-11T20:37:19.019
 FORS2_LSS_CAL315.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.998000 FORS2     LSS       FORS2.1999-11-11T20:40:41.088
 FORS2_LSS_CAL315.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            11.997000 FORS2     LSS       FORS2.1999-11-11T20:41:53.817
 FORS2_LSS_CAL315.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            30.000000 FORS2     LSS       FORS2.1999-11-11T20:45:12.275
 FORS2_LSS_CAL315.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            29.000600 FORS2     LSS       FORS2.1999-11-11T20:46:44.794
 FORS2_LSS_CAL315.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            29.996400 FORS2     LSS       FORS2.1999-11-11T20:49:33.795
 FORS2_LSS_CAL315.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            29.997200 FORS2     LSS       FORS2.1999-11-11T20:51:05.149

Nov 24, 99 17:06 Page 1/4

CD.1999-11-11

Printed by

FORS 2 1/4

CD.1999-11-11

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_LSS_CAL315.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            89.994100 FORS2     LSS       FORS2.1999-11-11T20:54:15.907
 FORS2_LSS_CAL315.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            89.994200 FORS2     LSS       FORS2.1999-11-11T20:56:47.499
 FORS2_LSS_CAL315.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           120.000000 FORS2     LSS       FORS2.1999-11-11T21:01:10.326
 FORS2_LSS_CAL315.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           119.993000 FORS2     LSS       FORS2.1999-11-11T21:04:13.520
 FORS2_Focus.7.fits                         NULL            TEST        598360586   -97229268             0.995700 FORS2     FREE      FORS2.1999-11-11T22:55:31.514
 FORS2_IMG_CALSKY315.fits                   60.A-9203(C)    TEST        598360579   -97229268             0.278700 FORS2     IMG       FORS2.1999-11-11T23:15:58.169
 FORS2_IMG_CALSKY315.1.fits                 60.A-9203(C)    CALIB       598360579   -97229268             1.411800 FORS2     IMG       FORS2.1999-11-11T23:16:37.154
 FORS2_IMG_CALSKY315.2.fits                 60.A-9203(C)    CALIB       598360579   -97229268             2.259500 FORS2     IMG       FORS2.1999-11-11T23:17:31.091
 FORS2_IMG_CALSKY315.3.fits                 60.A-9203(C)    CALIB       598360579   -97229268             2.813000 FORS2     IMG       FORS2.1999-11-11T23:18:25.640
 FORS2_IMG_CALSKY315.4.fits                 60.A-9203(C)    TEST        598360579   -97229268             0.279300 FORS2     IMG       FORS2.1999-11-11T23:19:33.278
 FORS2_IMG_CALSKY315.5.fits                 60.A-9203(C)    TEST        598360579   -97229268             0.282600 FORS2     IMG       FORS2.1999-11-11T23:21:04.078
 FORS2_IMG_CALSKY315.6.fits                 60.A-9203(C)    CALIB       598360579   -97229268             1.289200 FORS2     IMG       FORS2.1999-11-11T23:21:43.074
 FORS2_IMG_CALSKY315.7.fits                 60.A-9203(C)    CALIB       598360575   -97229268             2.118100 FORS2     IMG       FORS2.1999-11-11T23:22:37.154
 FORS2_IMG_CALSKY315.8.fits                 60.A-9203(C)    CALIB       598360575   -97229268             2.693800 FORS2     IMG       FORS2.1999-11-11T23:23:31.894
 FORS2_IMG_CALSKY315.9.fits                 60.A-9203(C)    TEST        598360575   -97229268             0.278800 FORS2     IMG       FORS2.1999-11-11T23:25:29.328
 FORS2_IMG_CALSKY315.10.fits                60.A-9203(C)    CALIB       598360575   -97229268             0.278800 FORS2     IMG       FORS2.1999-11-11T23:26:12.954
 FORS2_IMG_CALSKY315.11.fits                60.A-9203(C)    CALIB       598360575   -97229268            24.538200 FORS2     IMG       FORS2.1999-11-11T23:27:07.119
 FORS2_IMG_CALSKY315.15.fits                60.A-9203(C)    TEST        598360575   -97229268             0.278800 FORS2     IMG       FORS2.1999-11-11T23:31:53.472
 FORS2_IMG_CALSKY315.16.fits                60.A-9203(C)    CALIB       598360572   -97229268             0.278800 FORS2     IMG       FORS2.1999-11-11T23:32:38.323
 FORS2_IMG_CALSKY315.17.fits                60.A-9203(C)    TEST        598360572   -97229268             0.279000 FORS2     IMG       FORS2.1999-11-11T23:34:57.838
 FORS2_IMG_CALSKY315.18.fits                60.A-9203(C)    CALIB       598360572   -97229268            14.893600 FORS2     IMG       FORS2.1999-11-11T23:35:35.885
 FORS2_IMG_CALSKY315.19.fits                60.A-9203(C)    CALIB       598360572   -97229268            27.295600 FORS2     IMG       FORS2.1999-11-11T23:36:42.896
 FORS2_IMG_CALSKY315.20.fits                60.A-9203(C)    CALIB       598360572   -97229268            35.814000 FORS2     IMG       FORS2.1999-11-11T23:38:02.269
 FORS2_IMG_CALSKY315.21.fits                60.A-9203(C)    TEST        598360572   -97229268             0.278500 FORS2     IMG       FORS2.1999-11-11T23:39:51.718
 FORS2_IMG_CALSKY315.22.fits                60.A-9203(C)    CALIB       598360572   -97229268            17.622000 FORS2     IMG       FORS2.1999-11-11T23:40:30.696
 FORS2_IMG_CALSKY315.23.fits                60.A-9203(C)    CALIB       598360572   -97229268            31.472200 FORS2     IMG       FORS2.1999-11-11T23:41:40.772
 FORS2_IMG_CALSKY315.24.fits                60.A-9203(C)    CALIB       598360568   -97229268            39.945900 FORS2     IMG       FORS2.1999-11-11T23:43:05.902
 FORS2_STD315.24.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.997600 FORS2     IMG       FORS2.1999-11-11T23:49:28.101
 FORS2_STD315.25.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             7.003000 FORS2     IMG       FORS2.1999-11-11T23:52:42.623
 FORS2_STD315.26.fits                       60.A-9203(C)    CALIB      1119577500   -38788992            10.001300 FORS2     IMG       FORS2.1999-11-11T23:53:51.043
 FORS2_STD315.27.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.001400 FORS2     IMG       FORS2.1999-11-11T23:55:02.813
 FORS2_STD315.28.fits                       60.A-9203(C)    CALIB      1119577500   -38788992             9.999200 FORS2     IMG       FORS2.1999-11-11T23:56:14.526
 FORS2_STD316.fits                          60.A-9203(C)    CALIB      1202730001    -1308996             6.004300 FORS2     IMG       FORS2.1999-11-11T23:59:39.216
 FORS2_STD316.1.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             1.997400 FORS2     IMG       FORS2.1999-11-12T00:01:20.546
 FORS2_STD316.2.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             1.996700 FORS2     IMG       FORS2.1999-11-12T00:02:23.320
 FORS2_STD316.3.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             2.995600 FORS2     IMG       FORS2.1999-11-12T00:03:26.772
 FORS2_STD316.4.fits                        60.A-9203(C)    CALIB      1272435001    20809008             6.999700 FORS2     IMG       FORS2.1999-11-12T00:21:52.461
 FORS2_STD316.5.fits                        60.A-9203(C)    CALIB      1272435001    20809008            10.001300 FORS2     IMG       FORS2.1999-11-12T00:22:59.383
 FORS2_STD316.6.fits                        60.A-9203(C)    CALIB      1272435001    20809008             9.993900 FORS2     IMG       FORS2.1999-11-12T00:24:10.474
 FORS2_STD316.7.fits                        60.A-9203(C)    CALIB      1272435001    20809008             8.989400 FORS2     IMG       FORS2.1999-11-12T00:25:22.219
 FORSFieldAcq316.fits                       60.A-9203(C)    TEST       1259624880   -61530012             9.997200 FORS2     MOS       FORS2.1999-11-12T00:30:33.132
 FORS2_MOS_SLIT316.fits                     60.A-9203(C)    TEST       1259626082   -61529148            10.010900 FORS2     MOS       FORS2.1999-11-12T00:33:09.134
 FORS2_MOS316.fits                          60.A-9203(C)    SCIENCE    1259626082   -61529148            60.003000 FORS2     MOS       FORS2.1999-11-12T00:34:56.983
 FORS2_MOS316.1.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            59.996500 FORS2     MOS       FORS2.1999-11-12T00:38:12.982
 FORS2_MOS316.2.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            59.995100 FORS2     MOS       FORS2.1999-11-12T00:41:32.675
 FORS2_MOS316.3.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            59.993700 FORS2     MOS       FORS2.1999-11-12T00:44:46.895
 FORS2_MOS316.4.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            59.997400 FORS2     MOS       FORS2.1999-11-12T00:47:55.528
 FORS2_MOS316.5.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            60.006000 FORS2     MOS       FORS2.1999-11-12T00:51:02.594
 FORS2_MOS316.6.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            60.005800 FORS2     MOS       FORS2.1999-11-12T00:54:35.636
 FORS2_MOS316.7.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            60.006400 FORS2     MOS       FORS2.1999-11-12T00:57:37.171
 FORS2_MOS316.8.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            60.004700 FORS2     MOS       FORS2.1999-11-12T01:03:29.313
 FORS2_ECH316.fits                          60.A-9203(C)    SCIENCE    1259626082   -61529148           119.989900 FORS2     ECH       FORS2.1999-11-12T01:07:08.445
 test.1.fits                                NULL            TEST       1259626082   -61529148             0.997200 FORS2     FREE      FORS2.1999-11-12T01:16:13.208
 FORS2_MOS316.9.fits                        60.A-9203(C)    SCIENCE    1259626082   -61529148            59.995500 FORS2     MOS       FORS2.1999-11-12T01:18:35.963
 FORSFieldAcq316.1.fits                     60.A-9203(C)    TEST       1259624880   -61530012             9.999600 FORS2     MOS       FORS2.1999-11-12T01:52:29.747
 FORS2_ECH316.1.fits                        60.A-9203(C)    SCIENCE    1259625981   -61529256           119.996900 FORS2     ECH       FORS2.1999-11-12T02:04:56.074
 FORS2_ECH316.2.fits                        60.A-9203(C)    SCIENCE    1259625981   -61529256           299.981500 FORS2     ECH       FORS2.1999-11-12T02:10:24.057
 FORSFieldAcq316.2.fits                     60.A-9203(C)    TEST         53578004  -259646580             2.001300 FORS2     MXU       FORS2.1999-11-12T02:24:59.229
 FORSFieldAcq316.3.fits                     60.A-9203(C)    TEST         53578004  -259646580             5.005100 FORS2     MXU       FORS2.1999-11-12T02:35:58.477

Nov 24, 99 17:06 Page 2/4

CD.1999-11-11

Printed by

FORS 2 2/4

CD.1999-11-11

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORSFocfAcq316.fits                        60.A-9203(C)    TEST         53578004  -259646580             4.994500 FORS2     MXU       FORS2.1999-11-12T02:37:18.981
 FORSFieldAcq316.4.fits                     60.A-9203(C)    TEST         53578004  -259646580             4.990400 FORS2     MXU       FORS2.1999-11-12T02:40:20.444
 FORSFocfAcq316.1.fits                      60.A-9203(C)    TEST         53578004  -259646580             5.006600 FORS2     MXU       FORS2.1999-11-12T02:41:40.244
 FORS2_MXU316.fits                          60.A-9203(C)    SCIENCE      53578004  -259646580            56.553400 FORS2     MXU       FORS2.1999-11-12T02:43:52.439
 FORS2_MXU316.1.fits                        60.A-9203(C)    TEST      -2147483648 -2147483648             4.993400 FORS2     LSS       FORS2.1999-11-12T02:46:23.525
 FORSFieldAcq316.5.fits                     60.A-9203(C)    TEST      -2147483648 -2147483648             4.991100 FORS2     MXU       FORS2.1999-11-12T02:49:42.656
 FORSFocfAcq316.2.fits                      60.A-9203(C)    TEST         53578011  -259636571             5.002600 FORS2     MXU       FORS2.1999-11-12T02:51:02.227
 FORS2_MXU316.2.fits                        60.A-9203(C)    TEST         53578098  -259646580             5.003800 FORS2     LSS       FORS2.1999-11-12T02:53:57.401
 FORS2_MXU316.3.fits                        60.A-9203(C)    TEST         53578098  -259646580             5.001900 FORS2     LSS       FORS2.1999-11-12T03:11:31.467
 FORS2_MXU316.4.fits                        60.A-9203(C)    TEST         53586241  -259646580             4.993800 FORS2     LSS       FORS2.1999-11-12T03:13:57.220
 FORS2_MXU316.5.fits                        60.A-9203(C)    TEST         53578098  -259646580             4.993700 FORS2     LSS       FORS2.1999-11-12T03:15:14.429
 FORSFieldAcq316.6.fits                     60.A-9203(C)    TEST                0        1007             0.285500 FORS2     ECH       FORS2.1999-11-12T03:21:41.780
 FORSFieldAcq316.7.fits                     60.A-9203(C)    TEST         50694361  -260880876             4.993500 FORS2     MXU       FORS2.1999-11-12T03:30:39.233
 FORSFocfAcq316.3.fits                      60.A-9203(C)    TEST         50694361  -260880876             5.006900 FORS2     MXU       FORS2.1999-11-12T03:31:58.553
 FORS2_MXU316.6.fits                        60.A-9203(C)    SCIENCE      50694361  -260880876           899.963800 FORS2     MXU       FORS2.1999-11-12T03:38:01.400
 FORS2_MXU316.7.fits                        60.A-9203(C)    SCIENCE      50694361  -260880876           899.964400 FORS2     MXU       FORS2.1999-11-12T03:53:54.100
 FORS2_IMG316.fits                          60.A-9203(C)    SCIENCE      50694361  -260880876           179.990300 FORS2     IMG       FORS2.1999-11-12T04:10:13.936
 FORS2_IMG316.1.fits                        60.A-9203(C)    SCIENCE      50694361  -260880876           179.995500 FORS2     IMG       FORS2.1999-11-12T04:14:17.515
 FORS2_IMG316.2.fits                        60.A-9203(C)    SCIENCE      50694361  -260880876           180.002800 FORS2     IMG       FORS2.1999-11-12T04:18:18.219
 FORS2_IMG316.3.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708           899.962700 FORS2     IMG       FORS2.1999-11-12T04:35:47.925
 FORS2_IMG316.4.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708          1198.944900 FORS2     IMG       FORS2.1999-11-12T04:51:51.257
 FORS2_IMG316.5.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708          2399.901200 FORS2     MOS       FORS2.1999-11-12T05:13:01.411
 FORSFieldAcq316.8.fits                     60.A-9203(C)    TEST        273719984  -239040000           100.001800 FORS2     MOS       FORS2.1999-11-12T05:58:43.615
 FORS2_IMG316.6.fits                        60.A-9203(C)    SCIENCE     273720783  -239042771           100.000000 FORS2     IMG       FORS2.1999-11-12T06:03:11.322
 FORS2_MOS316.10.fits                       60.A-9203(C)    SCIENCE     273720783  -239042771            99.993800 FORS2     MOS       FORS2.1999-11-12T06:06:07.944
 FORSFieldAcq316.9.fits                     60.A-9203(C)    TEST         56897744  -259763832             4.996800 FORS2     MXU       FORS2.1999-11-12T06:17:14.040
 FORSFocfAcq316.4.fits                      60.A-9203(C)    TEST         56897744  -259763832             5.008500 FORS2     MXU       FORS2.1999-11-12T06:18:34.610
 FORSFieldAcq316.10.fits                    60.A-9203(C)    TEST         56907536  -259763868             4.993500 FORS2     MXU       FORS2.1999-11-12T06:33:28.511
 FORSFocfAcq316.5.fits                      60.A-9203(C)    TEST         56907536  -259763868            49.997400 FORS2     MXU       FORS2.1999-11-12T06:34:45.761
 FORSFieldAcq316.11.fits                    60.A-9203(C)    TEST         56897463  -259767576             4.994200 FORS2     MXU       FORS2.1999-11-12T06:38:40.001
 FORSFocfAcq316.6.fits                      60.A-9203(C)    TEST         56897463  -259767576            49.994200 FORS2     MXU       FORS2.1999-11-12T06:39:58.717
 FORS2_ECH316.3.fits                        60.A-9203(C)    TEST         56897463  -259767576             5.002600 FORS2     ECH       FORS2.1999-11-12T06:52:21.535
 FORS2_ECH316.4.fits                        60.A-9203(C)    SCIENCE      56897463  -259767576           299.986800 FORS2     ECH       FORS2.1999-11-12T06:54:50.614
 FORSFieldAcq316.13.fits                    60.A-9203(C)    TEST        300745364   -19502424             9.933600 FORS2     LSS       FORS2.1999-11-12T07:51:55.303
 FORSFocfAcq316.7.fits                      60.A-9203(C)    TEST        300745364   -19502424             9.999600 FORS2     LSS       FORS2.1999-11-12T07:53:49.485
 FORS2_LSS316.fits                          60.A-9203(C)    SCIENCE     300745702   -19501920            59.993500 FORS2     LSS       FORS2.1999-11-12T07:56:49.443
 FORS2_LSS316.1.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920            59.995100 FORS2     LSS       FORS2.1999-11-12T07:59:21.262
 FORS2_LSS316.2.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920            59.994600 FORS2     LSS       FORS2.1999-11-12T08:02:01.927
 FORS2_LSS316.3.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920            60.007300 FORS2     LSS       FORS2.1999-11-12T08:04:11.003
 FORSFocfAcq316.8.fits                      60.A-9203(C)    TEST        300745702   -19501920             9.997400 FORS2     LSS       FORS2.1999-11-12T08:06:40.386
 FORS2_LSS316.4.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920           299.989600 FORS2     LSS       FORS2.1999-11-12T08:11:58.286
 FORS2_LSS316.5.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920           299.979800 FORS2     LSS       FORS2.1999-11-12T08:18:20.718
 FORS2_LSS316.6.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920           299.989800 FORS2     LSS       FORS2.1999-11-12T08:25:19.235
 FORS2_LSS316.7.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920           299.992500 FORS2     LSS       FORS2.1999-11-12T08:31:29.418
 FORS2_LSS316.8.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920            59.993800 FORS2     LSS       FORS2.1999-11-12T08:47:27.866
 FORS2_LSS316.9.fits                        60.A-9203(C)    SCIENCE     300745702   -19501920            59.993700 FORS2     LSS       FORS2.1999-11-12T08:50:19.739
 FORS2_LSS316.10.fits                       60.A-9203(C)    SCIENCE     300745702   -19501920            60.000000 FORS2     LSS       FORS2.1999-11-12T08:52:58.287
 FORS2_LSS316.11.fits                       60.A-9203(C)    SCIENCE     300745702   -19501920            59.994700 FORS2     LSS       FORS2.1999-11-12T08:55:05.362
 FORS2_IMG_CALSKY316.fits                   60.A-9203(C)    TEST        598335001   -97209000             2.003900 FORS2     IMG       FORS2.1999-11-12T09:01:36.188
 FORS2_IMG_CALSKY316.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.005400 FORS2     IMG       FORS2.1999-11-12T09:03:03.165
 FORS2_IMG_CALSKY316.2.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.995600 FORS2     IMG       FORS2.1999-11-12T09:04:47.373
 FORS2_IMG_CALSKY316.3.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.996900 FORS2     IMG       FORS2.1999-11-12T09:07:16.046
 FORS2_IMG_CALSKY316.4.fits                 60.A-9203(C)    CALIB       598335001   -97198992            54.809400 FORS2     IMG       FORS2.1999-11-12T09:07:58.294
 FORS2_IMG_CALSKY316.5.fits                 60.A-9203(C)    CALIB       598335001   -97188984            44.003900 FORS2     IMG       FORS2.1999-11-12T09:09:46.603
 FORS2_IMG_CALSKY316.6.fits                 60.A-9203(C)    CALIB       598335001   -97179012            32.096900 FORS2     IMG       FORS2.1999-11-12T09:11:24.564
 FORS2_IMG_CALSKY316.7.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.995300 FORS2     IMG       FORS2.1999-11-12T09:13:00.759
 FORS2_IMG_CALSKY316.8.fits                 60.A-9203(C)    CALIB       598335001   -97219008            32.031900 FORS2     IMG       FORS2.1999-11-12T09:13:44.665
 FORS2_IMG_CALSKY316.9.fits                 60.A-9203(C)    CALIB       598334997   -97229016            24.679900 FORS2     IMG       FORS2.1999-11-12T09:15:11.339
 FORS2_IMG_CALSKY316.10.fits                60.A-9203(C)    CALIB       598334997   -97238988            17.910000 FORS2     IMG       FORS2.1999-11-12T09:16:30.586

Nov 24, 99 17:06 Page 3/4

CD.1999-11-11

Printed by

FORS 2 3/4

CD.1999-11-11

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY316.11.fits                60.A-9203(C)    TEST        598335001   -97209000             1.998500 FORS2     IMG       FORS2.1999-11-12T09:17:59.678
 FORS2_IMG_CALSKY316.12.fits                60.A-9203(C)    CALIB       598335001   -97198992             8.360700 FORS2     IMG       FORS2.1999-11-12T09:18:44.545
 FORS2_IMG_CALSKY316.13.fits                60.A-9203(C)    CALIB       598335001   -97188984             6.164200 FORS2     IMG       FORS2.1999-11-12T09:19:48.935
 FORS2_IMG_CALSKY316.14.fits                60.A-9203(C)    CALIB       598335001   -97179012             4.782400 FORS2     IMG       FORS2.1999-11-12T09:20:50.585
 FORS2_IMG_CALSKY316.15.fits                60.A-9203(C)    TEST        598335001   -97209000             1.998400 FORS2     IMG       FORS2.1999-11-12T09:22:12.818
 FORS2_IMG_CALSKY316.16.fits                60.A-9203(C)    CALIB       598335001   -97219008             4.669900 FORS2     IMG       FORS2.1999-11-12T09:22:59.414
 FORS2_IMG_CALSKY316.17.fits                60.A-9203(C)    CALIB       598335001   -97229016             3.510000 FORS2     IMG       FORS2.1999-11-12T09:24:00.550
 FORS2_IMG_CALSKY316.18.fits                60.A-9203(C)    CALIB       598334997   -97238988             2.801700 FORS2     IMG       FORS2.1999-11-12T09:25:00.564
 FORS2_IMG_CAL316.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-12T09:27:07.300
 FORS2_IMG_CAL316.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-12T09:27:55.981
 FORS2_IMG_CAL316.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-12T09:28:44.473
 FORS2_IMG_CAL316.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020700 FORS2     IMG       FORS2.1999-11-12T09:29:34.095
 FORS2_IMG_CAL316.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015600 FORS2     IMG       FORS2.1999-11-12T09:30:23.100
 FORS2_IMG_CAL316.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015500 FORS2     IMG       FORS2.1999-11-12T09:31:16.883
 FORS2_IMG_CAL316.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021500 FORS2     IMG       FORS2.1999-11-12T09:32:06.588
 FORS2_IMG_CAL316.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020700 FORS2     IMG       FORS2.1999-11-12T09:32:55.446
 FORS2_IMG_CAL316.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021400 FORS2     IMG       FORS2.1999-11-12T09:33:45.244
 FORS2_IMG_CAL316.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019700 FORS2     IMG       FORS2.1999-11-12T09:34:34.552
 FORS2_IMG_CAL316.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-12T09:36:35.004
 FORS2_IMG_CAL316.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.014800 FORS2     IMG       FORS2.1999-11-12T09:38:23.262
 FORS2_IMG_CAL316.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.014800 FORS2     IMG       FORS2.1999-11-12T09:40:11.314
 FORS2_IMG_CAL316.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.014800 FORS2     IMG       FORS2.1999-11-12T09:41:59.284
 FORS2_IMG_CAL316.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015700 FORS2     IMG       FORS2.1999-11-12T09:43:47.357
 FORS2_IMG_CAL316.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-12T09:45:40.742
 FORS2_IMG_CAL316.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017800 FORS2     IMG       FORS2.1999-11-12T09:47:28.932
 FORS2_IMG_CAL316.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018400 FORS2     IMG       FORS2.1999-11-12T09:49:16.858
 FORS2_IMG_CAL316.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-12T09:51:05.153
 FORS2_IMG_CAL316.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015700 FORS2     IMG       FORS2.1999-11-12T09:52:53.210
 FORS2_IMG_CAL316.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-12T09:59:02.105
 FORS2_IMG_CAL316.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-12T09:59:56.073
 FORS2_IMG_CAL316.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-12T10:01:30.344
 FORS2_IMG_CAL316.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-12T10:02:23.663
 FORS2_IMG_CAL316.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.000000 FORS2     IMG       FORS2.1999-11-12T10:03:34.451
 FORS2_IMG_CAL316.25.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.000000 FORS2     IMG       FORS2.1999-11-12T10:04:28.584
 FORS2_IMG_CAL316.26.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000000 FORS2     IMG       FORS2.1999-11-12T10:05:39.734
 FORS2_IMG_CAL316.27.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000000 FORS2     IMG       FORS2.1999-11-12T10:06:41.964

Nov 24, 99 17:06 Page 4/4

CD.1999-11-11

Printed by

FORS 2 4/4

CD.1999-11-11