 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_MOS_CAL318.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648            29.956800 FORS2     MOS       FORS2.1999-11-14T18:07:08.553
 FORS2_MOS_CAL318.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            30.000600 FORS2     MOS       FORS2.1999-11-14T18:09:46.326
 FORS2_MOS_CAL318.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            98.994900 FORS2     MOS       FORS2.1999-11-14T18:13:23.804
 FORS2_MOS_CAL318.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            24.004000 FORS2     MOS       FORS2.1999-11-14T18:17:31.974
 FORS2_MOS_CAL318.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            23.994300 FORS2     MOS       FORS2.1999-11-14T18:20:05.334
 FORS2_MOS_CAL318.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            74.999100 FORS2     MOS       FORS2.1999-11-14T18:23:39.816
 FORS2_MOS_CAL318.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.999100 FORS2     MOS       FORS2.1999-11-14T18:28:04.129
 FORS2_MOS_CAL318.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           100.002500 FORS2     MOS       FORS2.1999-11-14T18:31:54.932
 FORS2_MOS_CAL318.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           249.985600 FORS2     MOS       FORS2.1999-11-14T18:36:09.694
 FORS2_MOS_CAL318.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            74.990800 FORS2     MOS       FORS2.1999-11-14T18:45:44.334
 FORS2_MOS_CAL318.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            74.998700 FORS2     MOS       FORS2.1999-11-14T18:51:10.722
 FORS2_MOS_CAL318.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.000300 FORS2     MOS       FORS2.1999-11-14T18:54:57.624
 FORS2_MOS_CAL318.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.998500 FORS2     MOS       FORS2.1999-11-14T18:57:39.931
 FORS2_MOS_CAL318.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.992300 FORS2     MOS       FORS2.1999-11-14T19:01:15.344
 FORS2_MOS_CAL318.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.992000 FORS2     MOS       FORS2.1999-11-14T19:05:56.742
 FORS2_MOS_CAL318.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984500 FORS2     MOS       FORS2.1999-11-14T19:12:38.475
 FORS2_MOS_CAL318.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984600 FORS2     MOS       FORS2.1999-11-14T19:31:16.123
 FORS2_MOS_CAL318.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.994700 FORS2     MOS       FORS2.1999-11-14T19:37:09.456
 FORS2_MOS_CAL318.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           299.988000 FORS2     MOS       FORS2.1999-11-14T19:43:57.664
 FORS2_IMG_CAL318.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996100 FORS2     IMG       FORS2.1999-11-14T19:54:10.637
 FORS2_IMG_CAL318.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.999000 FORS2     IMG       FORS2.1999-11-14T19:55:30.096
 FORS2_IMG_CAL318.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996000 FORS2     IMG       FORS2.1999-11-14T19:57:12.397
 FORS2_IMG_CAL318.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.994500 FORS2     IMG       FORS2.1999-11-14T19:58:39.689
 FORS2_IMG_CAL318.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.993700 FORS2     IMG       FORS2.1999-11-14T20:00:28.378
 FORS2_IMG_CAL318.25.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.007000 FORS2     IMG       FORS2.1999-11-14T20:01:52.927
 FORS2_IMG_CAL318.26.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.009500 FORS2     IMG       FORS2.1999-11-14T20:03:41.954
 FORS2_IMG_CAL318.27.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.001700 FORS2     IMG       FORS2.1999-11-14T20:05:22.456
 FORS2_MOS_CAL318.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.982600 FORS2     MOS       FORS2.1999-11-14T20:08:15.760
 FORS2_MOS_CAL318.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.995500 FORS2     MOS       FORS2.1999-11-14T20:14:01.912
 FORS2_MOS_CAL318.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           299.990600 FORS2     MOS       FORS2.1999-11-14T20:20:48.717
 FORSFieldAcq319.6.fits                     NULL            TEST         50752681  -260875872             5.002900 FORS2     MOS       FORS2.1999-11-15T02:07:44.579
 FORSFieldAcq319.7.fits                     NULL            TEST         50753307  -260877960             4.994100 FORS2     MOS       FORS2.1999-11-15T02:11:59.553
 FORS2_MOS_SLIT319.1.fits                   NULL            TEST         50753350  -260878032             4.994800 FORS2     MOS       FORS2.1999-11-15T02:14:31.208
 FORS2_MOS319.fits                          NULL            SCIENCE      50753350  -260878032          1799.927500 FORS2     MOS       FORS2.1999-11-15T02:17:43.670
 FORS2_IMG319.fits                          NULL            SCIENCE      59454000   -92746008           179.997500 FORS2     IMG       FORS2.1999-11-15T02:53:59.145
 FORS2_IMG319.1.fits                        NULL            SCIENCE      59454000   -92746008           179.996500 FORS2     IMG       FORS2.1999-11-15T02:58:15.566
 FORS2_IMG319.2.fits                        NULL            SCIENCE      59454000   -92746008           407.552100 FORS2     IMG       FORS2.1999-11-15T03:02:18.487
 FORS2_IMG319.3.fits                        NULL            SCIENCE      59454000   -92746008          1799.929100 FORS2     IMG       FORS2.1999-11-15T03:17:23.302
 FORS2_IMG319.4.fits                        NULL            SCIENCE      59454000   -92746008           179.988400 FORS2     IMG       FORS2.1999-11-15T03:49:03.777
 FORS2_IMG319.5.fits                        NULL            SCIENCE      59454000   -92746008          1799.925300 FORS2     IMG       FORS2.1999-11-15T03:53:07.693
 FORS2_STD319.fits                          NULL            CALIB        47175001   -95949000           119.991100 FORS2     IMG       FORS2.1999-11-15T04:39:45.284
 FORS2_STD319.1.fits                        NULL            CALIB        47175001   -95949000           179.986400 FORS2     IMG       FORS2.1999-11-15T04:52:41.546
 FORS2_STD319.2.fits                        NULL            CALIB        47175001   -95949000           179.987000 FORS2     IMG       FORS2.1999-11-15T05:01:52.729
 FORS2_STD319.3.fits                        NULL            CALIB        47175001   -95949000           179.989400 FORS2     IMG       FORS2.1999-11-15T05:08:01.599
 FORS2_STD319.4.fits                        NULL            CALIB        47175001   -95949000           179.997100 FORS2     IMG       FORS2.1999-11-15T05:22:36.278
 FORS2_STD319.5.fits                        NULL            CALIB        47175001   -95949000           179.999800 FORS2     IMG       FORS2.1999-11-15T05:29:56.310
 FORS2_STD319.6.fits                        NULL            CALIB        47175001   -95949000           179.987400 FORS2     IMG       FORS2.1999-11-15T05:37:22.547
 FORS2_STD319.7.fits                        NULL            CALIB        47175001   -95949000           179.986400 FORS2     IMG       FORS2.1999-11-15T05:44:38.052
 FORS2_STD319.8.fits                        NULL            CALIB        47175001   -95949000           179.989700 FORS2     IMG       FORS2.1999-11-15T05:52:00.865
 FORS2_IMG319.6.fits                        NULL            SCIENCE     196297498  -127281707           899.963000 FORS2     IMG       FORS2.1999-11-15T06:04:55.823
 FORS2_IMG319.7.fits                        NULL            SCIENCE     196297498  -127281707          1199.944800 FORS2     IMG       FORS2.1999-11-15T06:21:00.500
 FORS2_IMG319.8.fits                        NULL            SCIENCE     196297498  -127281707          2399.900500 FORS2     MOS       FORS2.1999-11-15T06:42:17.532
 FORSFieldAcq319.8.fits                     NULL            TEST        376654950  -201443400           119.991600 FORS2     MXU       FORS2.1999-11-15T07:28:23.707
 FORSFocfAcq319.fits                        NULL            TEST        376654950  -201443400           119.994100 FORS2     MXU       FORS2.1999-11-15T07:31:42.101
 FORSFieldAcq319.9.fits                     NULL            TEST        376649334  -201442068           118.981700 FORS2     MXU       FORS2.1999-11-15T07:37:17.257
 FORSFocfAcq319.1.fits                      NULL            TEST        376649334  -201442068           118.992700 FORS2     MXU       FORS2.1999-11-15T07:40:32.367
 FORS2_MXU319.fits                          NULL            TEST        376654384  -201443112             4.798600 FORS2     LSS       FORS2.1999-11-15T07:44:49.975
 FORSFieldAcq319.10.fits                    NULL            TEST      -2147483648 -2147483648            78.037500 FORS2     MXU       FORS2.1999-11-15T07:46:49.175
 FORSFocfAcq319.2.fits                      NULL            TEST        376649334  -201442068           120.002400 FORS2     MXU       FORS2.1999-11-15T07:49:21.245

Nov 24, 99 17:12 Page 1/2

CD.1999-11-14

Printed by

FORS 2 1/2

CD.1999-11-14

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_MXU319.1.fits                        NULL            TEST        376653945  -201443184           299.991800 FORS2     LSS       FORS2.1999-11-15T07:55:10.580
 FORSFieldAcq319.11.fits                    NULL            TEST        273719984  -239040000           100.005900 FORS2     MOS       FORS2.1999-11-15T08:12:46.596
 FORS2_IMG319.9.fits                        NULL            SCIENCE     273720423  -239042664            98.994700 FORS2     IMG       FORS2.1999-11-15T08:17:17.449
 FORS2_MOS319.1.fits                        NULL            SCIENCE     273720423  -239042664           100.004100 FORS2     MOS       FORS2.1999-11-15T08:20:16.609
 mos_flexure_B.fits                         NULL            TEST      -2147483648 -2147483648             0.998200 FORS2     FREE      FORS2.1999-11-15T08:27:09.936
 mos_flexure_B.1.fits                       NULL            TEST      -2147483648 -2147483648             0.998200 FORS2     FREE      FORS2.1999-11-15T08:30:00.025
 mos_flexure_V.fits                         NULL            TEST      -2147483648 -2147483648             0.996100 FORS2     FREE      FORS2.1999-11-15T08:34:07.574
 mos_flexure_B.2.fits                       NULL            TEST      -2147483648 -2147483648             0.999100 FORS2     FREE      FORS2.1999-11-15T08:38:34.535
 FORS2_IMG_CALSKY319.fits                   NULL            TEST        598335001   -97209000             2.006900 FORS2     IMG       FORS2.1999-11-15T08:49:50.199
 FORS2_IMG_CALSKY319.1.fits                 NULL            TEST        598335001   -97209000             1.998300 FORS2     IMG       FORS2.1999-11-15T08:53:26.605
 FORS2_IMG_CALSKY319.2.fits                 NULL            TEST        598335001   -97209000             1.996300 FORS2     IMG       FORS2.1999-11-15T08:58:22.956
 FORS2_IMG_CALSKY319.3.fits                 NULL            TEST        598335001   -97209000             1.994600 FORS2     IMG       FORS2.1999-11-15T09:00:56.503
 FORS2_IMG_CALSKY319.4.fits                 NULL            TEST        598335001   -97209000             1.995900 FORS2     IMG       FORS2.1999-11-15T09:03:59.880
 FORS2_IMG_CALSKY319.5.fits                 NULL            TEST        598335001   -97209000             1.995500 FORS2     IMG       FORS2.1999-11-15T09:06:58.697
 FORS2_IMG_CALSKY319.6.fits                 NULL            CALIB       598335001   -97198992            68.189600 FORS2     IMG       FORS2.1999-11-15T09:07:44.145
 FORS2_IMG_CALSKY319.7.fits                 NULL            CALIB       598335001   -97188984            56.495000 FORS2     IMG       FORS2.1999-11-15T09:09:46.431
 FORS2_IMG_CALSKY319.8.fits                 NULL            CALIB       598335001   -97179012            40.721900 FORS2     IMG       FORS2.1999-11-15T09:11:37.467
 FORS2_IMG_CALSKY319.9.fits                 NULL            TEST        598335001   -97209000             1.997200 FORS2     IMG       FORS2.1999-11-15T09:13:21.649
 FORS2_IMG_CALSKY319.10.fits                NULL            TEST        598335001   -97209000             1.996000 FORS2     IMG       FORS2.1999-11-15T09:14:43.658
 FORS2_IMG_CALSKY319.11.fits                NULL            TEST        598335001   -97209000             1.995700 FORS2     IMG       FORS2.1999-11-15T09:15:47.244
 FORS2_IMG_CALSKY319.12.fits                NULL            CALIB       598335001   -97219008            68.412600 FORS2     IMG       FORS2.1999-11-15T09:16:35.305
 FORS2_IMG_CALSKY319.13.fits                NULL            CALIB       598334997   -97229016            50.057600 FORS2     IMG       FORS2.1999-11-15T09:18:37.901
 FORS2_IMG_CALSKY319.14.fits                NULL            CALIB       598334997   -97238988            32.359400 FORS2     IMG       FORS2.1999-11-15T09:20:21.778
 FORS2_IMG_CALSKY319.15.fits                NULL            TEST        598335001   -97209000             1.995800 FORS2     IMG       FORS2.1999-11-15T09:22:04.239
 FORS2_IMG_CALSKY319.16.fits                NULL            CALIB       598335001   -97198992             9.513800 FORS2     IMG       FORS2.1999-11-15T09:22:51.705
 FORS2_IMG_CALSKY319.17.fits                NULL            CALIB       598335001   -97188984             7.142600 FORS2     IMG       FORS2.1999-11-15T09:23:57.311
 FORS2_IMG_CALSKY319.18.fits                NULL            CALIB       598335001   -97179012             5.508800 FORS2     IMG       FORS2.1999-11-15T09:25:02.268
 FORS2_IMG_CAL319.fits                      60.A-9203(C)    CALIB       598335001   -97179012             0.020600 FORS2     IMG       FORS2.1999-11-15T09:26:35.232
 FORS2_IMG_CAL319.1.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.021100 FORS2     IMG       FORS2.1999-11-15T09:28:26.471
 FORS2_IMG_CAL319.2.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.021200 FORS2     IMG       FORS2.1999-11-15T09:30:15.144
 FORS2_IMG_CAL319.3.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.020500 FORS2     IMG       FORS2.1999-11-15T09:32:03.420
 FORS2_IMG_CAL319.4.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.020600 FORS2     IMG       FORS2.1999-11-15T09:33:52.502
 FORS2_IMG_CAL319.5.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.020200 FORS2     IMG       FORS2.1999-11-15T09:35:47.075
 FORS2_IMG_CAL319.6.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.019100 FORS2     IMG       FORS2.1999-11-15T09:37:35.846
 FORS2_IMG_CAL319.7.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.019700 FORS2     IMG       FORS2.1999-11-15T09:39:24.321
 FORS2_IMG_CAL319.8.fits                    60.A-9203(C)    CALIB       598335001   -97188984             0.020800 FORS2     IMG       FORS2.1999-11-15T09:41:12.761
 FORS2_IMG_CAL319.9.fits                    60.A-9203(C)    CALIB       598335001   -97179012             0.019500 FORS2     IMG       FORS2.1999-11-15T09:43:01.833
 FORS2_IMG_CAL319.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021100 FORS2     IMG       FORS2.1999-11-15T09:54:59.898
 FORS2_IMG_CAL319.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-15T09:55:51.516
 FORS2_IMG_CAL319.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021200 FORS2     IMG       FORS2.1999-11-15T09:56:44.201
 FORS2_IMG_CAL319.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019900 FORS2     IMG       FORS2.1999-11-15T09:57:33.506
 FORS2_IMG_CAL319.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-15T09:58:28.137
 FORS2_IMG_CAL319.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018800 FORS2     IMG       FORS2.1999-11-15T09:59:18.535
 FORS2_IMG_CAL319.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-15T10:00:08.014
 FORS2_IMG_CAL319.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018900 FORS2     IMG       FORS2.1999-11-15T10:00:56.889
 FORS2_IMG_CAL319.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018700 FORS2     IMG       FORS2.1999-11-15T10:01:46.974
 FORS2_IMG_CAL319.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-15T10:07:08.872
 FORS2_IMG_CAL319.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-15T10:08:03.595
 FORS2_IMG_CAL319.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-15T10:09:16.517
 FORS2_IMG_CAL319.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.000000 FORS2     IMG       FORS2.1999-11-15T10:10:11.551
 FORS2_IMG_CAL319.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.000000 FORS2     IMG       FORS2.1999-11-15T10:11:21.263
 FORS2_IMG_CAL319.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.000000 FORS2     IMG       FORS2.1999-11-15T10:12:15.743
 FORS2_IMG_CAL319.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000000 FORS2     IMG       FORS2.1999-11-15T10:13:26.606
 FORS2_IMG_CAL319.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.000000 FORS2     IMG       FORS2.1999-11-15T10:14:29.002

Nov 24, 99 17:12 Page 2/2

CD.1999-11-14

Printed by

FORS 2 2/2

CD.1999-11-14