 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_MOS_CAL319.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.006600 FORS2     MOS       FORS2.1999-11-15T17:42:02.356
 FORS2_MOS_CAL319.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             5.991100 FORS2     MOS       FORS2.1999-11-15T17:43:23.247
 FORS2_MOS_CAL319.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             6.004200 FORS2     MOS       FORS2.1999-11-15T17:44:47.365
 FORS2_MOS_CAL319.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            75.002700 FORS2     MOS       FORS2.1999-11-15T17:52:34.486
 FORS2_MOS_CAL319.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            75.001800 FORS2     MOS       FORS2.1999-11-15T17:55:58.908
 FORS2_MOS_CAL319.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.011100 FORS2     MOS       FORS2.1999-11-15T17:58:42.712
 FORS2_MOS_CAL319.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.000800 FORS2     MOS       FORS2.1999-11-15T18:00:01.740
 FORS2_MOS_CAL319.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           100.004000 FORS2     MOS       FORS2.1999-11-15T18:02:23.343
 FORS2_MOS_CAL319.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.996000 FORS2     MOS       FORS2.1999-11-15T18:06:10.090
 FORS2_MOS_CAL319.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984300 FORS2     MOS       FORS2.1999-11-15T18:11:55.623
 FORSFieldAcq319.fits                       60.A-9203(C)    TEST      -2147483648 -2147483648             5.004700 FORS2     MOS       FORS2.1999-11-15T19:52:13.555
 FORS2_MOS_CAL319.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           199.993800 FORS2     MOS       FORS2.1999-11-15T19:56:17.449
 FORS2_MOS_CAL319.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           299.989900 FORS2     MOS       FORS2.1999-11-15T20:00:45.236
 FORS2_MOS_CAL319.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.991500 FORS2     MOS       FORS2.1999-11-15T20:07:18.081
 FORS2_LSS_CAL319.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648           239.984400 FORS2     LSS       FORS2.1999-11-15T20:15:11.131
 FORS2_LSS_CAL319.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           239.994900 FORS2     LSS       FORS2.1999-11-15T20:20:35.744
 FORS2_LSS_CAL319.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.990900 FORS2     LSS       FORS2.1999-11-15T20:26:16.855
 FORS2_LSS_CAL319.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            89.995000 FORS2     LSS       FORS2.1999-11-15T20:29:12.312
 FORS2_LSS_CAL319.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            69.997700 FORS2     LSS       FORS2.1999-11-15T20:32:05.414
 FORS2_MOS_CAL319.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.998100 FORS2     MOS       FORS2.1999-11-15T20:41:05.441
 FORS2_MOS_CAL319.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             8.999700 FORS2     MOS       FORS2.1999-11-15T20:43:17.146
 FORS2_MOS_CAL319.25.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.992800 FORS2     MOS       FORS2.1999-11-15T20:46:19.638
 FORS2_MOS_CAL319.26.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             6.001200 FORS2     MOS       FORS2.1999-11-15T20:47:42.477
 FORS2_MOS_CAL319.27.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             5.994700 FORS2     MOS       FORS2.1999-11-15T20:49:07.356
 FORS2_MOS_CAL319.28.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.997400 FORS2     MOS       FORS2.1999-11-15T20:50:42.488
 FORS2_MOS_CAL319.29.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            24.995300 FORS2     MOS       FORS2.1999-11-15T20:52:18.908
 FORS2_MOS_CAL319.30.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            18.000700 FORS2     MOS       FORS2.1999-11-15T20:54:10.511
 FORS2_MOS_CAL319.31.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            13.004500 FORS2     MOS       FORS2.1999-11-15T20:55:49.878
 FORS2_MOS_CAL319.32.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.996000 FORS2     MOS       FORS2.1999-11-15T20:57:54.215
 FORS2_MOS_CAL319.33.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.004800 FORS2     MOS       FORS2.1999-11-15T20:59:13.376
 FORS2_MOS_CAL319.34.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.992100 FORS2     MOS       FORS2.1999-11-15T21:01:37.923
 FORS2_MOS_CAL319.35.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           100.001800 FORS2     MOS       FORS2.1999-11-15T21:05:36.512
 FORS2_MOS_CAL319.36.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           150.000400 FORS2     MOS       FORS2.1999-11-15T21:09:07.474
 FORS2_MOS_CAL319.37.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           299.982400 FORS2     MOS       FORS2.1999-11-15T21:14:07.715
 FORS2_MOS_CAL319.38.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.992300 FORS2     MOS       FORS2.1999-11-15T21:20:57.955
 FORS2_MOS_CAL319.39.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984600 FORS2     MOS       FORS2.1999-11-15T21:24:22.677
 FORS2_MOS_CAL319.40.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            74.996000 FORS2     MOS       FORS2.1999-11-15T21:31:22.023
 FORS2_MOS_CAL319.41.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            74.999500 FORS2     MOS       FORS2.1999-11-15T21:34:49.161
 FORS2_MOS_CAL319.42.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.992800 FORS2     MOS       FORS2.1999-11-15T21:37:49.653
 FORS2_MOS_CAL319.43.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.994900 FORS2     MOS       FORS2.1999-11-15T21:41:39.707
 FORS2_MOS_CAL319.44.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           249.984200 FORS2     MOS       FORS2.1999-11-15T21:47:31.257
 FORS2_IMG_CAL319.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.007000 FORS2     IMG       FORS2.1999-11-15T21:57:23.218
 FORS2_IMG_CAL319.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996200 FORS2     IMG       FORS2.1999-11-15T21:58:22.666
 FORS2_IMG_CAL319.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996300 FORS2     IMG       FORS2.1999-11-15T21:59:37.914
 FORS2_IMG_CAL319.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.999800 FORS2     IMG       FORS2.1999-11-15T22:00:38.338
 FORS2_IMG_CAL319.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996100 FORS2     IMG       FORS2.1999-11-15T22:01:57.266
 FORS2_IMG_CAL319.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             3.006400 FORS2     IMG       FORS2.1999-11-15T22:02:56.433
 FORS2_IMG_CAL319.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.994200 FORS2     IMG       FORS2.1999-11-15T22:04:12.864
 FORS2_IMG_CAL319.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.998900 FORS2     IMG       FORS2.1999-11-15T22:05:20.352
 FORS2_IMG_CALSKY319.fits                   60.A-9203(C)    TEST       1275525000  -142440012             0.518100 FORS2     IMG       FORS2.1999-11-15T23:20:56.749
 FORS2_IMG_CALSKY319.1.fits                 60.A-9203(C)    CALIB      1275512029  -142440012             3.075500 FORS2     IMG       FORS2.1999-11-15T23:21:43.895
 FORS2_IMG_CALSKY319.2.fits                 60.A-9203(C)    CALIB      1275499058  -142440012             4.751100 FORS2     IMG       FORS2.1999-11-15T23:22:42.783
 FORS2_IMG_CALSKY319.3.fits                 60.A-9203(C)    CALIB      1275486087  -142440012             6.008600 FORS2     IMG       FORS2.1999-11-15T23:23:41.928
 FORS2_IMG_CALSKY319.4.fits                 60.A-9203(C)    TEST       1275525000  -142440012             0.517500 FORS2     IMG       FORS2.1999-11-15T23:24:58.020
 FORS2_IMG_CALSKY319.5.fits                 60.A-9203(C)    CALIB      1275537970  -142440012             5.349100 FORS2     IMG       FORS2.1999-11-15T23:25:43.325
 FORS2_IMG_CALSKY319.6.fits                 60.A-9203(C)    CALIB      1275550941  -142440012            11.189500 FORS2     IMG       FORS2.1999-11-15T23:26:45.574
 FORS2_IMG_CALSKY319.7.fits                 60.A-9203(C)    CALIB      1275563912  -142440012            12.006900 FORS2     IMG       FORS2.1999-11-15T23:27:53.820
 FORS2_IMG_CALSKY319.8.fits                 60.A-9203(C)    TEST       1275525000  -142440012             0.515500 FORS2     IMG       FORS2.1999-11-15T23:29:13.449
 FORS2_IMG_CALSKY319.9.fits                 60.A-9203(C)    CALIB      1275512029  -142440012             1.332900 FORS2     IMG       FORS2.1999-11-15T23:30:01.705

Nov 24, 99 17:13 Page 1/4

CD.1999-11-15

Printed by

FORS 2 1/4

CD.1999-11-15

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY319.10.fits                60.A-9203(C)    CALIB      1275499058  -142440012             1.764800 FORS2     IMG       FORS2.1999-11-15T23:31:00.238
 FORS2_IMG_CALSKY319.11.fits                60.A-9203(C)    CALIB      1275486087  -142440012             1.824400 FORS2     IMG       FORS2.1999-11-15T23:31:59.282
 FORS2_IMG_CALSKY319.12.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.515000 FORS2     IMG       FORS2.1999-11-15T23:33:06.718
 FORS2_IMG_CALSKY319.13.fits                60.A-9203(C)    CALIB      1275537970  -142440012             4.266800 FORS2     IMG       FORS2.1999-11-15T23:33:52.364
 FORS2_IMG_CALSKY319.14.fits                60.A-9203(C)    CALIB      1275550941  -142440012             6.012100 FORS2     IMG       FORS2.1999-11-15T23:34:55.334
 FORS2_IMG_CALSKY319.15.fits                60.A-9203(C)    CALIB      1275563912  -142440012             6.657000 FORS2     IMG       FORS2.1999-11-15T23:35:57.865
 FORS2_IMG_CALSKY319.16.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.520700 FORS2     IMG       FORS2.1999-11-15T23:37:13.839
 FORS2_IMG_CALSKY319.17.fits                60.A-9203(C)    CALIB      1275512029  -142440012           122.189100 FORS2     IMG       FORS2.1999-11-15T23:38:00.005
 FORSFieldAcq319.1.fits                     60.A-9203(C)    TEST       1259624880   -61530012            10.000400 FORS2     MOS       FORS2.1999-11-15T23:48:24.697
 FORS2_MOS_SLIT319.fits                     60.A-9203(C)    TEST       1259625362   -61530444            10.000200 FORS2     MOS       FORS2.1999-11-15T23:51:26.427
 FORS2_MOS319.fits                          60.A-9203(C)    SCIENCE    1259625362   -61530444            59.997300 FORS2     MOS       FORS2.1999-11-15T23:54:02.917
 FORS2_MOS319.1.fits                        60.A-9203(C)    SCIENCE    1259625362   -61530444            60.007600 FORS2     MOS       FORS2.1999-11-15T23:57:22.131
 FORSFieldAcq320.fits                       60.A-9203(C)    TEST       1259618281   -61547940             9.000700 FORS2     LSS       FORS2.1999-11-16T00:06:29.407
 FORS2_LSS_STD320.fits                      60.A-9203(C)    CALIB      1259618349   -61548408           179.989600 FORS2     LSS       FORS2.1999-11-16T00:09:11.632
 FORSFieldAcq320.1.fits                     60.A-9203(C)    TEST       1126815058  -205467912            30.008900 FORS2     LSS       FORS2.1999-11-16T00:18:31.296
 FORSFieldAcq320.2.fits                     60.A-9203(C)    TEST       1126814234  -205470036            29.996800 FORS2     LSS       FORS2.1999-11-16T00:21:35.047
 FORS2_LSS320.fits                          60.A-9203(C)    SCIENCE    1126814306  -205470036           599.973000 FORS2     LSS       FORS2.1999-11-16T00:26:03.811
 FORS2_LSS320.1.fits                        60.A-9203(C)    SCIENCE    1126814306  -205470036          1799.926700 FORS2     LSS       FORS2.1999-11-16T00:40:15.078
 FORSFieldAcq320.3.fits                     60.A-9203(C)    TEST       1202728514    -1306584             1.997100 FORS2     MOS       FORS2.1999-11-16T01:16:53.928
 FORS2_IMG320.fits                          60.A-9203(C)    SCIENCE    1202728161    -1306548             5.991600 FORS2     IMG       FORS2.1999-11-16T01:18:50.147
 FORS2_IMG320.1.fits                        60.A-9203(C)    SCIENCE    1202728161    -1306548             1.996300 FORS2     IMG       FORS2.1999-11-16T01:20:00.349
 FORS2_IMG320.2.fits                        60.A-9203(C)    SCIENCE    1202728161    -1306548             2.006800 FORS2     IMG       FORS2.1999-11-16T01:21:07.558
 FORS2_IMG320.3.fits                        60.A-9203(C)    SCIENCE    1202728161    -1306548             2.997500 FORS2     IMG       FORS2.1999-11-16T01:22:15.093
 FORSFieldAcq320.4.fits                     60.A-9203(C)    TEST        211825515    35238996             9.006200 FORS2     MOS       FORS2.1999-11-16T01:28:06.070
 FORS2_MOS_SLIT320.fits                     60.A-9203(C)    TEST        211825656    35238492             9.998500 FORS2     MOS       FORS2.1999-11-16T01:30:36.043
 FORS2_MOS320.fits                          60.A-9203(C)    SCIENCE     211825656    35238492            59.997100 FORS2     MOS       FORS2.1999-11-16T01:32:25.252
 FORS2_MOS320.1.fits                        60.A-9203(C)    SCIENCE     211825656    35238492            59.997800 FORS2     MOS       FORS2.1999-11-16T01:34:47.233
 FORSFieldAcq320.5.fits                     60.A-9203(C)    TEST       1259624880   -61530012            10.009700 FORS2     MOS       FORS2.1999-11-16T01:43:19.757
 FORS2_MOS_SLIT320.1.fits                   60.A-9203(C)    TEST       1259625250   -61530444            10.003000 FORS2     MOS       FORS2.1999-11-16T01:45:45.143
 FORS2_MOS320.2.fits                        60.A-9203(C)    SCIENCE    1259625250   -61530444            59.997400 FORS2     MOS       FORS2.1999-11-16T01:47:21.814
 FORS2_MOS320.3.fits                        60.A-9203(C)    SCIENCE    1259625250   -61530444            59.997600 FORS2     MOS       FORS2.1999-11-16T01:50:39.329
 FORS2_STD320.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             5.992000 FORS2     IMG       FORS2.1999-11-16T02:00:00.646
 FORS2_STD320.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.999800 FORS2     IMG       FORS2.1999-11-16T02:01:11.308
 FORS2_STD320.2.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.998700 FORS2     IMG       FORS2.1999-11-16T02:02:26.054
 FORS2_STD320.3.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.999000 FORS2     IMG       FORS2.1999-11-16T02:03:41.023
 FORS2_STD320.4.fits                        60.A-9203(C)    CALIB       138314998    19122984             7.001500 FORS2     IMG       FORS2.1999-11-16T02:11:28.976
 FORS2_STD320.5.fits                        60.A-9203(C)    CALIB       138314998    19122984            10.009200 FORS2     IMG       FORS2.1999-11-16T02:12:39.235
 FORS2_STD320.6.fits                        60.A-9203(C)    CALIB       138314998    19122984            10.009900 FORS2     IMG       FORS2.1999-11-16T02:13:54.336
 FORS2_STD320.7.fits                        60.A-9203(C)    CALIB       138314998    19122984             9.998300 FORS2     IMG       FORS2.1999-11-16T02:15:09.241
 FORS2_STD320.8.fits                        60.A-9203(C)    CALIB        24165000  -259290000            29.997200 FORS2     IMG       FORS2.1999-11-16T02:25:35.551
 FORS2_STD320.9.fits                        60.A-9203(C)    CALIB        24165000  -259290000            30.009500 FORS2     IMG       FORS2.1999-11-16T02:27:12.371
 FORS2_STD320.10.fits                       60.A-9203(C)    CALIB        24165000  -259290000            30.006600 FORS2     IMG       FORS2.1999-11-16T02:28:46.306
 FORS2_STD320.11.fits                       60.A-9203(C)    CALIB        24165000  -259290000            29.999900 FORS2     IMG       FORS2.1999-11-16T02:30:21.964
 FORS2_IMG320.4.fits                        60.A-9203(C)    SCIENCE      24488582  -259190028            29.997800 FORS2     IMG       FORS2.1999-11-16T02:38:28.975
 FORS2_IMG320.5.fits                        60.A-9203(C)    SCIENCE      23841496  -259189992            29.996900 FORS2     IMG       FORS2.1999-11-16T02:44:28.279
 FORS2_IMG320.6.fits                        60.A-9203(C)    SCIENCE      23840449  -259389971            29.997300 FORS2     IMG       FORS2.1999-11-16T02:52:00.064
 FORS2_IMG320.7.fits                        60.A-9203(C)    SCIENCE      24489471  -259390008            29.997000 FORS2     IMG       FORS2.1999-11-16T02:56:48.811
 FORS2_IMG320.8.fits                        60.A-9203(C)    SCIENCE      24165000  -259290000            30.007100 FORS2     IMG       FORS2.1999-11-16T03:01:21.150
 FORS2_IMG320.9.fits                        60.A-9203(C)    SCIENCE      24165000  -259290000            29.997500 FORS2     IMG       FORS2.1999-11-16T03:03:35.601
 FORS2_IMG320.10.fits                       60.A-9203(C)    SCIENCE      59454000   -92746008          1799.928100 FORS2     IMG       FORS2.1999-11-16T03:13:16.595
 FORS2_IMG320.11.fits                       60.A-9203(C)    SCIENCE      59454000   -92746008          1799.917200 FORS2     IMG       FORS2.1999-11-16T03:44:19.470
 FORS2_IMG320.12.fits                       60.A-9203(C)    SCIENCE      59454000   -92746008           701.540500 FORS2     IMG       FORS2.1999-11-16T04:15:20.134
 FORS2_IMG320.13.fits                       60.A-9203(C)    SCIENCE      59454000   -92746008          1099.951800 FORS2     IMG       FORS2.1999-11-16T04:30:48.113
 FORSFieldAcq320.6.fits                     60.A-9203(C)    TEST        211825515    35238996             9.997100 FORS2     MOS       FORS2.1999-11-16T04:55:05.116
 FORS2_MOS_SLIT320.2.fits                   60.A-9203(C)    TEST        211825742    35238564            10.010400 FORS2     MOS       FORS2.1999-11-16T04:57:39.752
 FORS2_MOS320.4.fits                        60.A-9203(C)    SCIENCE     211825742    35238564            59.996800 FORS2     MOS       FORS2.1999-11-16T04:59:29.313
 FORS2_MOS320.5.fits                        60.A-9203(C)    SCIENCE     211825742    35238564            59.999000 FORS2     MOS       FORS2.1999-11-16T05:02:48.384
 FORS2_STD320.12.fits                       60.A-9203(C)    CALIB       138314998    19122984            29.997400 FORS2     IMG       FORS2.1999-11-16T05:09:46.125
 FORS2_STD320.13.fits                       60.A-9203(C)    CALIB       138314998    19122984            29.998700 FORS2     IMG       FORS2.1999-11-16T05:11:19.462

Nov 24, 99 17:13 Page 2/4

CD.1999-11-15

Printed by

FORS 2 2/4

CD.1999-11-15

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_STD320.14.fits                       60.A-9203(C)    CALIB       138314998    19122984            29.996600 FORS2     IMG       FORS2.1999-11-16T05:12:52.767
 FORS2_STD320.15.fits                       60.A-9203(C)    CALIB       138314998    19122984            29.997800 FORS2     IMG       FORS2.1999-11-16T05:14:26.108
 FORS2_STD320.16.fits                       60.A-9203(C)    CALIB       399840001    -1958004            29.998900 FORS2     IMG       FORS2.1999-11-16T05:23:51.955
 FORS2_STD320.17.fits                       60.A-9203(C)    CALIB       399840001    -1958004            30.009000 FORS2     IMG       FORS2.1999-11-16T05:25:25.885
 FORS2_STD320.18.fits                       60.A-9203(C)    CALIB       399840001    -1958004            29.996100 FORS2     IMG       FORS2.1999-11-16T05:26:59.387
 FORS2_STD320.19.fits                       60.A-9203(C)    CALIB       399840001    -1958004            29.995700 FORS2     IMG       FORS2.1999-11-16T05:28:32.916
 FORS2_IMG320.14.fits                       60.A-9203(C)    SCIENCE     196297498  -127281707           899.965700 FORS2     IMG       FORS2.1999-11-16T05:34:55.644
 FORS2_IMG320.15.fits                       60.A-9203(C)    SCIENCE     196297498  -127281707          1198.946300 FORS2     IMG       FORS2.1999-11-16T05:51:01.585
 FORS2_IMG320.16.fits                       60.A-9203(C)    SCIENCE     196297498  -127281707          2399.900000 FORS2     MOS       FORS2.1999-11-16T06:12:17.171
 FORS2_STD320.20.fits                       60.A-9203(C)    CALIB       282359998  -144351000            29.999000 FORS2     IMG       FORS2.1999-11-16T06:59:59.794
 FORS2_STD320.21.fits                       60.A-9203(C)    CALIB       282359998  -144351000            29.996800 FORS2     IMG       FORS2.1999-11-16T07:01:34.067
 FORS2_STD320.22.fits                       60.A-9203(C)    CALIB       282359998  -144351000            29.999500 FORS2     IMG       FORS2.1999-11-16T07:03:09.666
 FORS2_STD320.23.fits                       60.A-9203(C)    CALIB       282359998  -144351000            29.996400 FORS2     IMG       FORS2.1999-11-16T07:04:43.374
 FORS2_STD320.24.fits                       60.A-9203(C)    CALIB       282359998  -144351000           118.995200 FORS2     IMG       FORS2.1999-11-16T07:06:51.357
 FORS2_STD320.25.fits                       60.A-9203(C)    CALIB       282359998  -144351000           119.992000 FORS2     IMG       FORS2.1999-11-16T07:09:56.336
 FORS2_STD320.26.fits                       60.A-9203(C)    CALIB     -2147483648 -2147483648           119.993200 FORS2     IMG       FORS2.1999-11-16T07:13:05.286
 FORS2_STD320.27.fits                       60.A-9203(C)    CALIB     -2147483648 -2147483648           120.002700 FORS2     IMG       FORS2.1999-11-16T07:16:11.566
 FORS2_Defocus.fits                         NULL            TEST      -2147483648 -2147483648           119.992800 FORS2     FREE      FORS2.1999-11-16T07:20:26.276
 FORS2_Defocus.1.fits                       NULL            TEST      -2147483648 -2147483648           120.003300 FORS2     FREE      FORS2.1999-11-16T07:24:41.162
 FORS2_Defocus.2.fits                       NULL            TEST      -2147483648 -2147483648           119.993800 FORS2     FREE      FORS2.1999-11-16T07:28:40.234
 FORS2_Defocus.3.fits                       NULL            TEST      -2147483648 -2147483648           120.005000 FORS2     FREE      FORS2.1999-11-16T07:37:25.051
 FORS2_Defocus.4.fits                       NULL            TEST      -2147483648 -2147483648           119.990700 FORS2     FREE      FORS2.1999-11-16T07:41:10.712
 FORS2_Defocus.5.fits                       NULL            TEST      -2147483648 -2147483648           119.990500 FORS2     FREE      FORS2.1999-11-16T07:44:35.517
 FORSFieldAcq320.7.fits                     60.A-9203(C)    TEST        437729371    55668276            19.999700 FORS2     LSS       FORS2.1999-11-16T07:52:37.380
 FORSFocfAcq320.fits                        60.A-9203(C)    TEST        437729371    55668276            19.996700 FORS2     LSS       FORS2.1999-11-16T07:54:39.603
 FORS2_LSS_SLIT320.fits                     60.A-9203(C)    TEST        437731952    55668420            28.996700 FORS2     LSS       FORS2.1999-11-16T07:57:32.096
 FORS2_LSS320.3.fits                        60.A-9203(C)    SCIENCE     437731952    55668420          2399.902200 FORS2     LSS       FORS2.1999-11-16T08:04:32.066
 FORS2_IMG_CALSKY320.fits                   60.A-9203(C)    TEST        598335001   -97209000             1.994800 FORS2     IMG       FORS2.1999-11-16T08:55:21.759
 FORS2_IMG_CALSKY320.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             2.006700 FORS2     IMG       FORS2.1999-11-16T08:58:14.881
 FORS2_IMG_CALSKY320.2.fits                 60.A-9203(C)    TEST        598335001   -97209000             0.998700 FORS2     IMG       FORS2.1999-11-16T09:01:34.610
 FORS2_IMG_CALSKY320.3.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.997400 FORS2     IMG       FORS2.1999-11-16T09:04:04.306
 FORS2_IMG_CALSKY320.4.fits                 NULL            NULL      -2147483648 -2147483648             2.000000 NULL      NULL      FORS2.1999-11-16T09:05:42.703
 FORS2_IMG_CALSKY320.5.fits                 60.A-9203(C)    CALIB       598335001   -97198992            64.658800 FORS2     IMG       FORS2.1999-11-16T09:06:28.375
 FORS2_IMG_CALSKY320.6.fits                 60.A-9203(C)    CALIB       598335001   -97188984            52.577900 FORS2     IMG       FORS2.1999-11-16T09:08:28.897
 FORS2_IMG_CALSKY320.7.fits                 60.A-9203(C)    CALIB       598335001   -97179012            37.659100 FORS2     IMG       FORS2.1999-11-16T09:10:17.706
 FORS2_IMG_CALSKY320.8.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.995200 FORS2     IMG       FORS2.1999-11-16T09:12:02.789
 FORS2_IMG_CALSKY320.9.fits                 60.A-9203(C)    CALIB       598335001   -97219008            28.103000 FORS2     IMG       FORS2.1999-11-16T09:12:50.645
 FORS2_IMG_CALSKY320.10.fits                60.A-9203(C)    CALIB       598334997   -97229016            21.379200 FORS2     IMG       FORS2.1999-11-16T09:14:13.930
 FORS2_IMG_CALSKY320.11.fits                60.A-9203(C)    CALIB       598334997   -97238988            15.712200 FORS2     IMG       FORS2.1999-11-16T09:15:34.247
 FORS2_IMG_CALSKY320.12.fits                60.A-9203(C)    TEST        598335001   -97209000             1.997600 FORS2     IMG       FORS2.1999-11-16T09:17:02.839
 FORS2_IMG_CALSKY320.13.fits                60.A-9203(C)    CALIB       598335001   -97198992            11.058800 FORS2     IMG       FORS2.1999-11-16T09:17:51.575
 FORS2_IMG_CALSKY320.14.fits                60.A-9203(C)    CALIB       598335001   -97188984             8.131400 FORS2     IMG       FORS2.1999-11-16T09:18:59.276
 FORS2_IMG_CALSKY320.15.fits                60.A-9203(C)    CALIB       598335001   -97179012             6.395700 FORS2     IMG       FORS2.1999-11-16T09:20:03.772
 FORS2_IMG_CALSKY320.16.fits                60.A-9203(C)    TEST        598335001   -97209000             1.995800 FORS2     IMG       FORS2.1999-11-16T09:21:29.179
 FORS2_IMG_CALSKY320.17.fits                60.A-9203(C)    CALIB       598335001   -97219008             2.523400 FORS2     IMG       FORS2.1999-11-16T09:22:18.165
 FORS2_IMG_CALSKY320.18.fits                60.A-9203(C)    CALIB       598334997   -97229016             3.713200 FORS2     IMG       FORS2.1999-11-16T09:23:19.477
 FORS2_IMG_CALSKY320.19.fits                60.A-9203(C)    CALIB       598334997   -97238988             2.099700 FORS2     IMG       FORS2.1999-11-16T09:24:20.032
 FORS2_IMG_CAL320.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017000 FORS2     IMG       FORS2.1999-11-16T09:25:43.808
 FORS2_IMG_CAL320.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018600 FORS2     IMG       FORS2.1999-11-16T09:26:33.537
 FORS2_IMG_CAL320.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020800 FORS2     IMG       FORS2.1999-11-16T09:27:24.002
 FORS2_IMG_CAL320.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020100 FORS2     IMG       FORS2.1999-11-16T09:28:14.115
 FORS2_IMG_CAL320.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016800 FORS2     IMG       FORS2.1999-11-16T09:29:04.221
 FORS2_IMG_CAL320.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016800 FORS2     IMG       FORS2.1999-11-16T09:29:59.922
 FORS2_IMG_CAL320.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016800 FORS2     IMG       FORS2.1999-11-16T09:30:50.353
 FORS2_IMG_CAL320.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016700 FORS2     IMG       FORS2.1999-11-16T09:31:40.062
 FORS2_IMG_CAL320.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018600 FORS2     IMG       FORS2.1999-11-16T09:32:30.322
 FORS2_IMG_CAL320.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018100 FORS2     IMG       FORS2.1999-11-16T09:33:24.312
 FORS2_IMG_CAL320.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-16T09:34:28.821
 FORS2_IMG_CAL320.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-16T09:36:17.732

Nov 24, 99 17:13 Page 3/4

CD.1999-11-15

Printed by

FORS 2 3/4

CD.1999-11-15

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CAL320.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-16T09:38:06.643
 FORS2_IMG_CAL320.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021600 FORS2     IMG       FORS2.1999-11-16T09:39:55.373
 FORS2_IMG_CAL320.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-16T09:41:44.184
 FORS2_IMG_CAL320.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018000 FORS2     IMG       FORS2.1999-11-16T09:43:37.718
 FORS2_IMG_CAL320.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-16T09:45:26.990
 FORS2_IMG_CAL320.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017400 FORS2     IMG       FORS2.1999-11-16T09:47:15.692
 FORS2_IMG_CAL320.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020700 FORS2     IMG       FORS2.1999-11-16T09:49:04.458
 FORS2_IMG_CAL320.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017400 FORS2     IMG       FORS2.1999-11-16T09:50:53.489

Nov 24, 99 17:13 Page 4/4

CD.1999-11-15

Printed by

FORS 2 4/4

CD.1999-11-15