 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_Sieb.fits                            NULL            TEST      -2147483648 -2147483648             0.968200 FORS2     FREE      FORS2.1999-11-16T19:02:38.107
 FORS2_Sieb.1.fits                          NULL            TEST      -2147483648 -2147483648             1.995000 FORS2     FREE      FORS2.1999-11-16T19:07:01.377
 FORS2_Sieb.2.fits                          NULL            TEST      -2147483648 -2147483648             0.992000 FORS2     FREE      FORS2.1999-11-16T19:08:23.373
 FORS2_Sieb.3.fits                          NULL            TEST      -2147483648 -2147483648             0.516800 FORS2     FREE      FORS2.1999-11-16T19:09:17.966
 FORS2_Sieb.4.fits                          NULL            TEST      -2147483648 -2147483648             0.282200 FORS2     FREE      FORS2.1999-11-16T19:10:46.277
 FORS2_LSS_CAL320.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648           124.984100 FORS2     LSS       FORS2.1999-11-16T19:19:51.092
 FORS2_LSS_CAL320.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           298.989300 FORS2     LSS       FORS2.1999-11-16T19:24:59.102
 FORS2_MOS_CAL320.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             6.002000 FORS2     MOS       FORS2.1999-11-16T19:35:46.064
 FORS2_MOS_CAL320.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             3.994200 FORS2     MOS       FORS2.1999-11-16T19:37:17.720
 FORS2_MOS_CAL320.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.989700 FORS2     MOS       FORS2.1999-11-16T19:39:46.326
 FORS2_MOS_CAL320.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           149.992300 FORS2     MOS       FORS2.1999-11-16T19:43:16.761
 FORS2_MOS_CAL320.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             3.004800 FORS2     MOS       FORS2.1999-11-16T19:52:37.309
 FORS2_MOS_CAL320.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             5.999300 FORS2     MOS       FORS2.1999-11-16T19:56:01.908
 FORS2_MOS_CAL320.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             4.001300 FORS2     MOS       FORS2.1999-11-16T19:58:33.354
 FORS2_MOS_CAL320.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.994500 FORS2     MOS       FORS2.1999-11-16T20:02:02.946
 FORS2_MOS_CAL320.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           298.989500 FORS2     MOS       FORS2.1999-11-16T20:07:18.973
 FORS2_MOS_CAL320.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            99.992500 FORS2     MOS       FORS2.1999-11-16T20:16:14.311
 FORS2_MOS_CAL320.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           150.001700 FORS2     MOS       FORS2.1999-11-16T20:20:45.590
 FORS2_MOS_CAL320.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             6.001800 FORS2     MOS       FORS2.1999-11-16T20:26:51.162
 FORS2_MOS_CAL320.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             4.008500 FORS2     MOS       FORS2.1999-11-16T20:29:23.400
 FORS2_MOS_CAL320.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           100.002800 FORS2     MOS       FORS2.1999-11-16T20:32:53.672
 FORS2_MOS_CAL320.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.990800 FORS2     MOS       FORS2.1999-11-16T20:48:00.245
 FORS2_MOS_CAL320.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648           149.991700 FORS2     MOS       FORS2.1999-11-16T20:52:28.150
 FORS2_LSS_CAL320.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            59.996800 FORS2     LSS       FORS2.1999-11-16T20:58:44.433
 FORS2_LSS_CAL320.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           249.994200 FORS2     LSS       FORS2.1999-11-16T21:03:19.771
 FORS2_IMG_CALSKY320.20.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.284100 FORS2     IMG       FORS2.1999-11-16T23:14:02.679
 FORS2_IMG_CALSKY320.21.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.287100 FORS2     IMG       FORS2.1999-11-16T23:16:33.556
 FORS2_IMG_CALSKY320.22.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.284700 FORS2     IMG       FORS2.1999-11-16T23:17:39.289
 FORS2_IMG_CALSKY320.23.fits                60.A-9203(C)    CALIB      1275512029  -142440012             1.178400 FORS2     IMG       FORS2.1999-11-16T23:18:22.815
 FORS2_IMG_CALSKY320.24.fits                60.A-9203(C)    CALIB      1275499058  -142440012             1.948800 FORS2     IMG       FORS2.1999-11-16T23:19:22.609
 FORS2_IMG_CALSKY320.25.fits                60.A-9203(C)    CALIB      1275486087  -142440012             2.462500 FORS2     IMG       FORS2.1999-11-16T23:20:20.027
 FORS2_IMG_CALSKY320.26.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.282600 FORS2     IMG       FORS2.1999-11-16T23:21:34.291
 FORS2_IMG_CALSKY320.27.fits                60.A-9203(C)    CALIB      1275537970  -142440012             2.367200 FORS2     IMG       FORS2.1999-11-16T23:22:17.565
 FORS2_IMG_CALSKY320.28.fits                60.A-9203(C)    CALIB      1275550941  -142440012             3.835300 FORS2     IMG       FORS2.1999-11-16T23:23:18.622
 FORS2_IMG_CALSKY320.29.fits                60.A-9203(C)    CALIB      1275563912  -142440012             5.033200 FORS2     IMG       FORS2.1999-11-16T23:24:18.533
 FORS2_IMG_CALSKY320.30.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.283500 FORS2     IMG       FORS2.1999-11-16T23:25:28.529
 FORS2_IMG_CALSKY320.31.fits                60.A-9203(C)    CALIB      1275512029  -142440012             2.047000 FORS2     IMG       FORS2.1999-11-16T23:26:12.465
 FORS2_IMG_CALSKY320.32.fits                60.A-9203(C)    CALIB      1275499058  -142440012             3.517800 FORS2     IMG       FORS2.1999-11-16T23:27:11.102
 FORS2_IMG_CALSKY320.33.fits                60.A-9203(C)    CALIB      1275486087  -142440012             4.617200 FORS2     IMG       FORS2.1999-11-16T23:28:10.790
 FORS2_IMG_CALSKY320.34.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.280900 FORS2     IMG       FORS2.1999-11-16T23:29:17.609
 FORS2_IMG_CALSKY320.35.fits                60.A-9203(C)    CALIB      1275537970  -142440012             2.662600 FORS2     IMG       FORS2.1999-11-16T23:30:02.975
 FORS2_IMG_CALSKY320.36.fits                60.A-9203(C)    CALIB      1275550941  -142440012             4.599600 FORS2     IMG       FORS2.1999-11-16T23:31:01.370
 FORS2_IMG_CALSKY320.37.fits                60.A-9203(C)    CALIB      1275563912  -142440012             6.010600 FORS2     IMG       FORS2.1999-11-16T23:32:01.674
 FORS2_Sieb.5.fits                          NULL            TEST      -2147483648 -2147483648             1.997400 FORS2     FREE      FORS2.1999-11-16T23:39:08.144
 FORS2_Sieb.6.fits                          NULL            TEST      -2147483648 -2147483648             1.997100 FORS2     FREE      FORS2.1999-11-16T23:45:40.818
 FORS2_Sieb.7.fits                          NULL            TEST      -2147483648 -2147483648             1.997100 FORS2     FREE      FORS2.1999-11-16T23:48:54.977
 FORS2_Sieb.8.fits                          NULL            TEST      -2147483648 -2147483648             1.997800 FORS2     FREE      FORS2.1999-11-16T23:51:48.455
 FORS2_Sieb.9.fits                          NULL            TEST      -2147483648 -2147483648             1.995400 FORS2     FREE      FORS2.1999-11-16T23:56:31.449
 FORS2_ECH_CAL_MOSSCRF321.fits              60.A-9203(C)    CALIB     -2147483648 -2147483648           120.004100 FORS2     ECH       FORS2.1999-11-17T00:01:05.044
 FORS2_ECH_CAL_MOSSCRF321.1.fits            60.A-9203(C)    CALIB     -2147483648 -2147483648           120.002100 FORS2     ECH       FORS2.1999-11-17T00:06:28.144
 FORS2_IMG321.fits                          60.A-9203(C)    SCIENCE      59454000   -92746008          1799.925800 FORS2     IMG       FORS2.1999-11-17T00:16:06.837
 FORSFieldAcq321.fits                       60.A-9203(C)    TEST       1287101160   -94982544             9.998300 FORS2     LSS       FORS2.1999-11-17T00:54:59.444
 FORS2_LSS_SLIT321.fits                     60.A-9203(C)    TEST       1287099766   -94978656             9.996300 FORS2     LSS       FORS2.1999-11-17T00:59:31.930
 FORS2_LSS_SLIT321.1.fits                   60.A-9203(C)    TEST       1287099766   -94978656            29.998400 FORS2     LSS       FORS2.1999-11-17T01:06:43.566
 FORS2_LSS_SLIT321.2.fits                   60.A-9203(C)    TEST       1287099766   -94978656            29.999400 FORS2     LSS       FORS2.1999-11-17T01:13:45.741
 FORS2_LSS_SLIT321.3.fits                   60.A-9203(C)    TEST       1287100616   -94978440            29.997800 FORS2     LSS       FORS2.1999-11-17T01:16:55.948
 FORS2_LSS_SLIT321.4.fits                   60.A-9203(C)    TEST       1287101041   -94978296            29.997000 FORS2     LSS       FORS2.1999-11-17T01:18:47.610
 FORS2_LSS321.fits                          60.A-9203(C)    SCIENCE    1287054212   -94848948           293.712600 FORS2     LSS       FORS2.1999-11-17T01:36:44.486
 FORS2_STD321.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             6.993800 FORS2     IMG       FORS2.1999-11-17T02:06:39.427

Nov 24, 99 17:16 Page 1/4

CD.1999-11-16

Printed by

FORS 2 1/4

CD.1999-11-16

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_STD321.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.999800 FORS2     IMG       FORS2.1999-11-17T02:07:54.663
 FORS2_STD321.2.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.999300 FORS2     IMG       FORS2.1999-11-17T02:09:09.334
 FORS2_STD321.3.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             9.001300 FORS2     IMG       FORS2.1999-11-17T02:10:23.271
 FORS2_STD321.4.fits                        60.A-9203(C)    CALIB       138314998    19122984             6.999700 FORS2     IMG       FORS2.1999-11-17T02:17:04.910
 FORS2_STD321.5.fits                        60.A-9203(C)    CALIB       138314998    19122984             9.996100 FORS2     IMG       FORS2.1999-11-17T02:18:15.081
 FORS2_STD321.6.fits                        60.A-9203(C)    CALIB       138314998    19122984             9.998500 FORS2     IMG       FORS2.1999-11-17T02:19:32.722
 FORS2_STD321.7.fits                        60.A-9203(C)    CALIB       138314998    19122984            10.001200 FORS2     IMG       FORS2.1999-11-17T02:20:47.327
 FORS2_IMG321.1.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.927800 FORS2     IMG       FORS2.1999-11-17T02:26:21.567
 FORS2_IMG321.2.fits                        60.A-9203(C)    SCIENCE      59454000   -92746008          1799.925900 FORS2     IMG       FORS2.1999-11-17T02:57:19.673
 FORS2_IMG321.3.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708           899.965200 FORS2     IMG       FORS2.1999-11-17T03:34:02.685
 FORS2_IMG321.4.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708          1199.952900 FORS2     IMG       FORS2.1999-11-17T03:50:51.058
 FORS2_IMG321.5.fits                        60.A-9203(C)    SCIENCE     197047501  -127893708          2399.902200 FORS2     MOS       FORS2.1999-11-17T04:15:21.891
 FORSFieldAcq321.1.fits                     60.A-9203(C)    TEST       1287101160   -94982544             8.999900 FORS2     LSS       FORS2.1999-11-17T05:04:23.115
 FORS2_LSS_SLIT321.5.fits                   60.A-9203(C)    TEST       1287100152   -94978656             9.998800 FORS2     LSS       FORS2.1999-11-17T05:06:59.570
 FORS2_LSS321.4.fits                        60.A-9203(C)    SCIENCE    1286997382   -94693680            59.994900 FORS2     LSS       FORS2.1999-11-17T05:21:59.963
 FORSFieldAcq321.2.fits                     60.A-9203(C)    TEST        333502891  -175465656             9.997000 FORS2     MXU       FORS2.1999-11-17T05:36:57.764
 FORSFieldAcq321.3.fits                     60.A-9203(C)    TEST        333502891  -175465656             9.999300 FORS2     MXU       FORS2.1999-11-17T05:45:00.215
 FORSFieldAcq321.4.fits                     60.A-9203(C)    TEST        333502891  -175465656             9.998500 FORS2     MXU       FORS2.1999-11-17T05:48:34.362
 FORS2_MXU321.fits                          60.A-9203(C)    TEST        333505274  -175465836             9.997900 FORS2     LSS       FORS2.1999-11-17T05:50:55.594
 FORS2_ECH_MOVE321.fits                     60.A-9203(C)    SCIENCE     333513057  -175436100           899.966300 FORS2     ECH       FORS2.1999-11-17T05:57:40.629
 FORS2_IMG321.6.fits                        60.A-9203(C)    SCIENCE     333574426  -175201488            58.995400 FORS2     IMG       FORS2.1999-11-17T06:23:24.051
 FORSFieldAcq321.5.fits                     60.A-9203(C)    TEST        333502891  -175465656            10.000000 FORS2     MXU       FORS2.1999-11-17T06:29:54.156
 FORSFieldAcq321.6.fits                     60.A-9203(C)    TEST        333502891  -175465656            10.010300 FORS2     MXU       FORS2.1999-11-17T06:35:03.830
 FORS2_IMG321.7.fits                        60.A-9203(C)    SCIENCE     333558198  -175262796            60.005900 FORS2     IMG       FORS2.1999-11-17T06:37:11.950
 FORS2_MXU321.1.fits                        60.A-9203(C)    TEST        333646984  -174922524             9.999900 FORS2     LSS       FORS2.1999-11-17T06:40:06.058
 FORSFieldAcq321.7.fits                     60.A-9203(C)    TEST        333502891  -175465656            10.001000 FORS2     MXU       FORS2.1999-11-17T06:45:28.954
 FORS2_MXU321.2.fits                        60.A-9203(C)    TEST        333505008  -175465764             9.998800 FORS2     LSS       FORS2.1999-11-17T06:47:42.242
 FORS2_ECH_MOVE321.1.fits                   60.A-9203(C)    SCIENCE     333508993  -175450572           299.995100 FORS2     ECH       FORS2.1999-11-17T06:51:07.263
 FORS2_IMG321.8.fits                        60.A-9203(C)    SCIENCE     333514461  -175429692            30.001000 FORS2     IMG       FORS2.1999-11-17T07:04:15.313
 FORS2_IMG321.9.fits                        60.A-9203(C)    SCIENCE     333518310  -175414968            29.996600 FORS2     IMG       FORS2.1999-11-17T07:06:58.125
 FORS2_IMG321.10.fits                       60.A-9203(C)    SCIENCE     333531237  -175365576            29.996700 FORS2     IMG       FORS2.1999-11-17T07:12:05.924
 FORSFieldAcq321.8.fits                     60.A-9203(C)    TEST      -2147483648 -2147483648            10.004500 FORS2     MXU       FORS2.1999-11-17T07:15:57.820
 FORSFieldAcq321.9.fits                     60.A-9203(C)    TEST        333506181  -175462596             9.996600 FORS2     MXU       FORS2.1999-11-17T07:20:07.567
 FORS2_MXU321.3.fits                        60.A-9203(C)    TEST        333504946  -175465800             8.989000 FORS2     LSS       FORS2.1999-11-17T07:22:17.595
 FORS2_ECH_MOVE321.2.fits                   60.A-9203(C)    SCIENCE     333501184  -175480164           299.982000 FORS2     ECH       FORS2.1999-11-17T07:25:05.305
 FORSFieldAcq321.10.fits                    60.A-9203(C)    TEST        273719984  -239040000           100.002000 FORS2     MOS       FORS2.1999-11-17T07:38:41.207
 FORS2_IMG321.11.fits                       60.A-9203(C)    SCIENCE     273720798  -239042808           100.007400 FORS2     IMG       FORS2.1999-11-17T07:42:22.975
 FORS2_MOS321.fits                          60.A-9203(C)    SCIENCE     273720798  -239042808           100.001300 FORS2     MOS       FORS2.1999-11-17T07:45:21.964
 FORS2_STD321.8.fits                        60.A-9203(C)    CALIB       399840001    -1958004             5.998600 FORS2     IMG       FORS2.1999-11-17T07:55:25.293
 FORS2_STD321.9.fits                        60.A-9203(C)    CALIB       399840001    -1958004             9.999500 FORS2     IMG       FORS2.1999-11-17T07:56:36.047
 FORS2_STD321.10.fits                       60.A-9203(C)    CALIB       399840001    -1958004            10.002100 FORS2     IMG       FORS2.1999-11-17T07:57:50.443
 FORS2_STD321.11.fits                       60.A-9203(C)    CALIB       399840001    -1958004             8.997600 FORS2     IMG       FORS2.1999-11-17T08:02:44.702
 FORS2_STD321.12.fits                       60.A-9203(C)    CALIB       399840001    -1958004            19.999900 FORS2     IMG       FORS2.1999-11-17T08:04:24.067
 FORS2_Sieb.10.fits                         NULL            TEST      -2147483648 -2147483648             1.994600 FORS2     FREE      FORS2.1999-11-17T08:12:06.775
 FORS2_Sieb.11.fits                         NULL            TEST      -2147483648 -2147483648             1.997000 FORS2     FREE      FORS2.1999-11-17T08:17:47.758
 FORS2_Sieb.12.fits                         NULL            TEST      -2147483648 -2147483648             1.995400 FORS2     FREE      FORS2.1999-11-17T08:19:31.914
 FORS2_Sieb.13.fits                         NULL            TEST      -2147483648 -2147483648             1.997900 FORS2     FREE      FORS2.1999-11-17T08:20:55.075
 FORS2_Sieb.14.fits                         NULL            TEST      -2147483648 -2147483648             1.994600 FORS2     FREE      FORS2.1999-11-17T08:23:12.817
 FORS2_Sieb.15.fits                         NULL            TEST      -2147483648 -2147483648             1.996600 FORS2     FREE      FORS2.1999-11-17T08:25:35.043
 FORS2_Sieb.16.fits                         NULL            TEST      -2147483648 -2147483648             1.999100 FORS2     FREE      FORS2.1999-11-17T08:27:13.946
 FORS2_Sieb.17.fits                         NULL            TEST      -2147483648 -2147483648             1.993000 FORS2     FREE      FORS2.1999-11-17T08:28:48.325
 FORS2_Sieb.18.fits                         NULL            TEST      -2147483648 -2147483648             1.996000 FORS2     FREE      FORS2.1999-11-17T08:34:03.260
 FORS2_Sieb.19.fits                         NULL            TEST      -2147483648 -2147483648             8.004900 FORS2     FREE      FORS2.1999-11-17T08:40:46.736
 FORS2_Sieb.20.fits                         NULL            TEST      -2147483648 -2147483648             8.001900 FORS2     FREE      FORS2.1999-11-17T08:47:05.103
 FORS2_Sieb.21.fits                         NULL            TEST      -2147483648 -2147483648             7.999200 FORS2     FREE      FORS2.1999-11-17T08:48:27.378
 FORS2_Sieb.22.fits                         NULL            TEST      -2147483648 -2147483648             8.001100 FORS2     FREE      FORS2.1999-11-17T08:49:47.440
 FORS2_Sieb.23.fits                         NULL            TEST      -2147483648 -2147483648             7.990700 FORS2     FREE      FORS2.1999-11-17T08:51:19.671
 FORS2_Sieb.24.fits                         NULL            TEST      -2147483648 -2147483648             8.002400 FORS2     FREE      FORS2.1999-11-17T08:53:16.134
 FORS2_Sieb.25.fits                         NULL            TEST      -2147483648 -2147483648             7.001400 FORS2     FREE      FORS2.1999-11-17T08:57:38.895

Nov 24, 99 17:16 Page 2/4

CD.1999-11-16

Printed by

FORS 2 2/4

CD.1999-11-16

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY321.fits                   60.A-9203(C)    TEST        598335001   -97209000             1.994700 FORS2     IMG       FORS2.1999-11-17T09:04:28.098
 FORS2_IMG_CALSKY321.1.fits                 60.A-9203(C)    CALIB       598335001   -97198992            30.087600 FORS2     IMG       FORS2.1999-11-17T09:05:13.244
 FORS2_IMG_CALSKY321.2.fits                 60.A-9203(C)    CALIB       598335001   -97188984            23.599800 FORS2     IMG       FORS2.1999-11-17T09:06:38.933
 FORS2_IMG_CALSKY321.3.fits                 60.A-9203(C)    CALIB       598335001   -97179012            18.160100 FORS2     IMG       FORS2.1999-11-17T09:07:56.402
 FORS2_IMG_CALSKY321.4.fits                 60.A-9203(C)    TEST        598335001   -97209000             0.996700 FORS2     IMG       FORS2.1999-11-17T09:10:23.309
 FORS2_IMG_CALSKY321.5.fits                 60.A-9203(C)    CALIB       598335001   -97219008            21.964300 FORS2     IMG       FORS2.1999-11-17T09:11:07.754
 FORS2_IMG_CALSKY321.6.fits                 60.A-9203(C)    CALIB       598334997   -97229016             8.593500 FORS2     IMG       FORS2.1999-11-17T09:12:26.376
 FORS2_IMG_CALSKY321.7.fits                 60.A-9203(C)    CALIB       598334997   -97238988             6.395400 FORS2     IMG       FORS2.1999-11-17T09:13:30.904
 FORS2_IMG_CALSKY321.8.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.998400 FORS2     IMG       FORS2.1999-11-17T09:15:50.339
 FORS2_IMG_CALSKY321.9.fits                 60.A-9203(C)    CALIB       598335001   -97198992             3.744000 FORS2     IMG       FORS2.1999-11-17T09:16:35.204
 FORS2_IMG_CALSKY321.10.fits                60.A-9203(C)    CALIB       598335001   -97188984             2.664300 FORS2     IMG       FORS2.1999-11-17T09:17:36.974
 FORS2_IMG_CALSKY321.11.fits                60.A-9203(C)    CALIB       598335001   -97179012             2.049200 FORS2     IMG       FORS2.1999-11-17T09:18:35.737
 FORS2_IMG_CALSKY321.12.fits                60.A-9203(C)    TEST        598335001   -97209000             2.008300 FORS2     IMG       FORS2.1999-11-17T09:20:58.178
 FORS2_IMG_CALSKY321.13.fits                60.A-9203(C)    TEST        598335001   -97209000             1.998000 FORS2     IMG       FORS2.1999-11-17T09:23:13.622
 FORS2_IMG_CALSKY321.14.fits                60.A-9203(C)    CALIB       598335001   -97198992             6.075900 FORS2     IMG       FORS2.1999-11-17T09:24:00.135
 FORS2_IMG_CALSKY321.15.fits                60.A-9203(C)    CALIB       598335001   -97188984             4.649800 FORS2     IMG       FORS2.1999-11-17T09:25:07.283
 FORS2_IMG_CALSKY321.16.fits                60.A-9203(C)    CALIB       598335001   -97179012             3.662600 FORS2     IMG       FORS2.1999-11-17T09:26:08.006
 FORS2_IMG_CAL321.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-17T09:33:29.197
 FORS2_IMG_CAL321.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018800 FORS2     IMG       FORS2.1999-11-17T09:34:22.117
 FORS2_IMG_CAL321.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018500 FORS2     IMG       FORS2.1999-11-17T09:35:13.284
 FORS2_IMG_CAL321.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021100 FORS2     IMG       FORS2.1999-11-17T09:36:03.927
 FORS2_IMG_CAL321.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021100 FORS2     IMG       FORS2.1999-11-17T09:36:54.075
 FORS2_IMG_CAL321.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.022000 FORS2     IMG       FORS2.1999-11-17T09:37:48.473
 FORS2_IMG_CAL321.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-17T09:38:38.641
 FORS2_IMG_CAL321.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021400 FORS2     IMG       FORS2.1999-11-17T09:39:27.807
 FORS2_IMG_CAL321.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021500 FORS2     IMG       FORS2.1999-11-17T09:40:17.215
 FORS2_IMG_CAL321.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020500 FORS2     IMG       FORS2.1999-11-17T09:41:07.371
 FORS2_IMG_CAL321.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.997400 FORS2     IMG       FORS2.1999-11-17T09:42:45.116
 FORS2_IMG_CAL321.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.994700 FORS2     IMG       FORS2.1999-11-17T09:43:39.530
 FORS2_IMG_CAL321.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.998000 FORS2     IMG       FORS2.1999-11-17T09:44:53.933
 FORS2_IMG_CAL321.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021400 FORS2     IMG       FORS2.1999-11-17T09:46:45.272
 FORS2_IMG_CAL321.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019800 FORS2     IMG       FORS2.1999-11-17T09:48:33.514
 FORS2_IMG_CAL321.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021000 FORS2     IMG       FORS2.1999-11-17T09:50:21.875
 FORS2_IMG_CAL321.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021200 FORS2     IMG       FORS2.1999-11-17T09:52:10.088
 FORS2_IMG_CAL321.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-17T09:53:58.696
 FORS2_IMG_CAL321.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.995900 FORS2     IMG       FORS2.1999-11-17T09:56:59.458
 FORS2_IMG_CAL321.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996100 FORS2     IMG       FORS2.1999-11-17T09:57:54.072
 FORS2_IMG_CAL321.20.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.994400 FORS2     IMG       FORS2.1999-11-17T09:59:05.297
 FORS2_IMG_CAL321.21.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.996800 FORS2     IMG       FORS2.1999-11-17T10:00:00.520
 FORS2_IMG_CAL321.22.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.998100 FORS2     IMG       FORS2.1999-11-17T10:01:11.330
 FORS2_IMG_CAL321.23.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.997300 FORS2     IMG       FORS2.1999-11-17T10:02:06.581
 FORS2_IMG_CAL321.24.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            10.001600 FORS2     IMG       FORS2.1999-11-17T10:03:19.480
 FORS2_IMG_CAL321.25.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999500 FORS2     IMG       FORS2.1999-11-17T10:04:27.023
 FORS2_IMG_CAL321.26.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             4.996500 FORS2     IMG       FORS2.1999-11-17T10:06:39.822
 FORS2_IMG_CAL321.28.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.993500 FORS2     IMG       FORS2.1999-11-17T10:12:04.580
 FORS2_IMG_CAL321.29.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648            99.991800 FORS2     IMG       FORS2.1999-11-17T10:14:39.973
 test.fits                                  NULL            TEST      -2147483648 -2147483648             8.000000 FORS2     FREE      FORS2.1999-11-17T10:22:18.722
 test.1.fits                                NULL            TEST      -2147483648 -2147483648            19.001300 FORS2     FREE      FORS2.1999-11-17T10:25:45.841
 test.2.fits                                NULL            TEST      -2147483648 -2147483648           199.987800 FORS2     FREE      FORS2.1999-11-17T10:29:41.524
 test.3.fits                                NULL            TEST      -2147483648 -2147483648            19.996500 FORS2     FREE      FORS2.1999-11-17T10:36:16.507
 HeHgCd_NO_NO.fits                          NULL            NULL      -2147483648 -2147483648            19.997500 FORS2     FREE      FORS2.1999-11-17T10:44:35.281
 HeHgCd_NO_500.fits                         NULL            NULL      -2147483648 -2147483648           199.998000 FORS2     FREE      FORS2.1999-11-17T10:45:56.651
 HeHgCd_600B_NO.fits                        NULL            NULL      -2147483648 -2147483648           599.982800 FORS2     FREE      FORS2.1999-11-17T10:50:23.304
 HeHgCd_600B_500.fits                       NULL            NULL      -2147483648 -2147483648           199.989400 FORS2     FREE      FORS2.1999-11-17T11:02:19.980
 HeHgCd_NO_NO.1.fits                        NULL            NULL      -2147483648 -2147483648            19.998400 FORS2     FREE      FORS2.1999-11-17T11:10:38.874
 HeHgCd_NO_500.1.fits                       NULL            NULL      -2147483648 -2147483648           199.985900 FORS2     FREE      FORS2.1999-11-17T11:12:00.460
 HeHgCd_600B_NO.1.fits                      NULL            NULL      -2147483648 -2147483648           599.982600 FORS2     FREE      FORS2.1999-11-17T11:16:26.273
 HeHgCd_600B_500.1.fits                     NULL            NULL      -2147483648 -2147483648           200.001800 FORS2     FREE      FORS2.1999-11-17T11:28:23.271
 HeHgCd_NO_NO.2.fits                        NULL            NULL      -2147483648 -2147483648            19.999500 FORS2     FREE      FORS2.1999-11-17T11:32:50.999

Nov 24, 99 17:16 Page 3/4

CD.1999-11-16

Printed by

FORS 2 3/4

CD.1999-11-16

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 HeHgCd_NO_500.2.fits                       NULL            NULL      -2147483648 -2147483648           199.994800 FORS2     FREE      FORS2.1999-11-17T11:34:11.029
 HeHgCd_600B_NO.2.fits                      NULL            NULL      -2147483648 -2147483648           599.972600 FORS2     FREE      FORS2.1999-11-17T11:38:37.261
 HeHgCd_600B_500.2.fits                     NULL            NULL      -2147483648 -2147483648           199.997700 FORS2     FREE      FORS2.1999-11-17T11:50:35.476

Nov 24, 99 17:16 Page 4/4

CD.1999-11-16

Printed by

FORS 2 4/4

CD.1999-11-16