 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_Sieb.fits                            NULL            TEST      -2147483648 -2147483648             0.997700 FORS2     FREE      FORS2.1999-11-18T12:53:30.610
 FORS2_Sieb.1.fits                          NULL            TEST      -2147483648 -2147483648             1.997800 FORS2     FREE      FORS2.1999-11-18T12:57:07.367
 FORS2_Sieb.2.fits                          NULL            TEST      -2147483648 -2147483648             1.994600 FORS2     FREE      FORS2.1999-11-18T13:51:03.413
 FORS2_Sieb.3.fits                          NULL            TEST      -2147483648 -2147483648             1.996700 FORS2     FREE      FORS2.1999-11-18T14:00:34.704
 FORS2_Sieb.4.fits                          NULL            TEST      -2147483648 -2147483648             0.996600 FORS2     FREE      FORS2.1999-11-18T14:02:58.797
 FORS2_Sieb.5.fits                          NULL            TEST      -2147483648 -2147483648             0.995400 FORS2     FREE      FORS2.1999-11-18T14:16:59.180
 FORS2_Sieb.6.fits                          NULL            TEST      -2147483648 -2147483648             1.995500 FORS2     FREE      FORS2.1999-11-18T14:20:28.732
 FORS2_Sieb.7.fits                          NULL            TEST      -2147483648 -2147483648             1.996600 FORS2     FREE      FORS2.1999-11-18T14:30:16.202
 FORS2_Sieb.8.fits                          NULL            TEST      -2147483648 -2147483648             2.007500 FORS2     FREE      FORS2.1999-11-18T14:42:01.369
 alignCcd.fits                              NULL            NULL      -2147483648 -2147483648             2.006900 FORS2     FREE      FORS2.1999-11-18T15:39:48.117
 alignCcd.1.fits                            NULL            NULL      -2147483648 -2147483648             2.006800 FORS2     FREE      FORS2.1999-11-18T15:42:34.032
 FORS2_Sieb.9.fits                          NULL            TEST      -2147483648 -2147483648             1.999000 FORS2     FREE      FORS2.1999-11-18T15:46:22.172
 FORS2_Sieb.10.fits                         NULL            TEST      -2147483648 -2147483648             1.995400 FORS2     FREE      FORS2.1999-11-18T16:34:20.167
 FORS2_Sieb.11.fits                         NULL            TEST      -2147483648 -2147483648             2.005300 FORS2     FREE      FORS2.1999-11-18T16:40:48.197
 FORS2_Sieb.12.fits                         NULL            TEST      -2147483648 -2147483648             2.000300 FORS2     FREE      FORS2.1999-11-18T16:44:51.619
 FORS2_Sieb.13.fits                         NULL            TEST      -2147483648 -2147483648             1.995600 FORS2     FREE      FORS2.1999-11-18T16:49:02.343
 FORS2_Sieb.14.fits                         NULL            TEST      -2147483648 -2147483648             1.996400 FORS2     FREE      FORS2.1999-11-18T16:53:49.706
 FORS2_Sieb.15.fits                         NULL            TEST      -2147483648 -2147483648             2.006500 FORS2     FREE      FORS2.1999-11-18T19:24:02.463
 FORS2_Sieb.16.fits                         NULL            TEST      -2147483648 -2147483648             0.994900 FORS2     FREE      FORS2.1999-11-18T19:26:53.075
 FORS2_Sieb.17.fits                         NULL            TEST      -2147483648 -2147483648             1.996600 FORS2     FREE      FORS2.1999-11-18T19:31:12.647
 FORS2_Sieb.18.fits                         NULL            TEST      -2147483648 -2147483648             1.997100 FORS2     FREE      FORS2.1999-11-18T19:35:45.241
 FORS2_Sieb.19.fits                         NULL            TEST      -2147483648 -2147483648             1.996600 FORS2     FREE      FORS2.1999-11-18T19:38:48.006
 FORS2_Sieb.20.fits                         NULL            TEST      -2147483648 -2147483648             2.005500 FORS2     FREE      FORS2.1999-11-18T19:43:41.427
 FORS2_Sieb.21.fits                         NULL            TEST      -2147483648 -2147483648             2.000000 FORS2     FREE      FORS2.1999-11-18T19:48:19.581
 alignCcd.2.fits                            NULL            NULL      -2147483648 -2147483648             2.000600 FORS2     FREE      FORS2.1999-11-18T20:09:46.798
 GRIS_300I_21.fits                          NULL            NULL      -2147483648 -2147483648           119.996400 FORS2     FREE      FORS2.1999-11-18T20:20:16.714
 GRIS_300I_21.1.fits                        NULL            NULL      -2147483648 -2147483648           119.990500 FORS2     FREE      FORS2.1999-11-18T20:36:27.775
 GRIS_300I_21.2.fits                        NULL            NULL      -2147483648 -2147483648           119.991500 FORS2     FREE      FORS2.1999-11-18T20:44:59.336
 FORS2_IMG_CAL322.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648             0.016300 FORS2     IMG       FORS2.1999-11-18T21:39:47.318
 FORS2_IMG_CAL322.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.015000 FORS2     IMG       FORS2.1999-11-18T21:40:37.275
 FORS2_IMG_CAL322.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018100 FORS2     IMG       FORS2.1999-11-18T21:41:26.138
 FORS2_IMG_CAL322.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017900 FORS2     IMG       FORS2.1999-11-18T21:42:15.862
 FORS2_IMG_CAL322.4.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019500 FORS2     IMG       FORS2.1999-11-18T21:43:05.683
 FORS2_IMG_CAL322.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019300 FORS2     IMG       FORS2.1999-11-18T21:44:00.985
 FORS2_IMG_CAL322.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.017700 FORS2     IMG       FORS2.1999-11-18T21:44:51.034
 FORS2_IMG_CAL322.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-18T21:45:40.132
 FORS2_IMG_CAL322.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020900 FORS2     IMG       FORS2.1999-11-18T21:46:32.877
 FORS2_IMG_CAL322.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-18T21:47:25.784
 FORS2_IMG_CAL322.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020400 FORS2     IMG       FORS2.1999-11-18T21:53:12.158
 FORS2_IMG_CAL322.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.024400 FORS2     IMG       FORS2.1999-11-18T21:55:00.742
 FORS2_IMG_CAL322.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.021500 FORS2     IMG       FORS2.1999-11-18T21:56:49.163
 FORS2_IMG_CAL322.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-18T21:58:38.047
 FORS2_IMG_CAL322.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-18T22:00:26.617
 FORS2_IMG_CAL322.15.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020600 FORS2     IMG       FORS2.1999-11-18T22:02:20.076
 FORS2_IMG_CAL322.16.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.019400 FORS2     IMG       FORS2.1999-11-18T22:04:08.544
 FORS2_IMG_CAL322.17.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020300 FORS2     IMG       FORS2.1999-11-18T22:05:56.560
 FORS2_IMG_CAL322.18.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.020000 FORS2     IMG       FORS2.1999-11-18T22:07:44.844
 FORS2_IMG_CAL322.19.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             0.018300 FORS2     IMG       FORS2.1999-11-18T22:09:33.108
 FORS2_IMG_CALSKY322.fits                   60.A-9203(C)    TEST       1275525000  -142440012             0.272700 FORS2     IMG       FORS2.1999-11-18T23:21:06.039
 FORS2_IMG_CALSKY322.1.fits                 60.A-9203(C)    CALIB      1275537970  -142440012             2.189900 FORS2     IMG       FORS2.1999-11-18T23:21:50.015
 FORS2_IMG_CALSKY322.2.fits                 60.A-9203(C)    CALIB      1275550941  -142440012             3.460500 FORS2     IMG       FORS2.1999-11-18T23:22:46.436
 FORS2_IMG_CALSKY322.3.fits                 60.A-9203(C)    CALIB      1275563912  -142440012             4.256000 FORS2     IMG       FORS2.1999-11-18T23:23:45.531
 FORS2_IMG_CALSKY322.4.fits                 60.A-9203(C)    TEST       1275525000  -142440012             0.271100 FORS2     IMG       FORS2.1999-11-18T23:25:03.179
 FORS2_IMG_CALSKY322.5.fits                 60.A-9203(C)    TEST       1275525000  -142440012             0.272700 FORS2     IMG       FORS2.1999-11-18T23:27:47.205
 FORS2_IMG_CALSKY322.6.fits                 60.A-9203(C)    TEST       1275525000  -142440012             0.271700 FORS2     IMG       FORS2.1999-11-18T23:28:57.242
 FORS2_IMG_CALSKY322.7.fits                 60.A-9203(C)    CALIB      1275512029  -142440012             1.317100 FORS2     IMG       FORS2.1999-11-18T23:29:40.785
 FORS2_IMG_CALSKY322.8.fits                 60.A-9203(C)    CALIB      1275499058  -142440012             2.065700 FORS2     IMG       FORS2.1999-11-18T23:30:41.871
 FORS2_IMG_CALSKY322.9.fits                 60.A-9203(C)    CALIB      1275486087  -142440012             2.701600 FORS2     IMG       FORS2.1999-11-18T23:31:39.023
 FORS2_IMG_CALSKY322.10.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.267700 FORS2     IMG       FORS2.1999-11-18T23:32:58.879

Nov 24, 99 17:19 Page 1/4

CD.1999-11-18

Printed by

FORS 2 1/4

CD.1999-11-18

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY322.11.fits                60.A-9203(C)    CALIB      1275537970  -142440012             1.857600 FORS2     IMG       FORS2.1999-11-18T23:33:42.424
 FORS2_IMG_CALSKY322.12.fits                60.A-9203(C)    CALIB      1275550941  -142440012             2.865600 FORS2     IMG       FORS2.1999-11-18T23:34:40.440
 FORS2_IMG_CALSKY322.13.fits                60.A-9203(C)    CALIB      1275563912  -142440012             3.704200 FORS2     IMG       FORS2.1999-11-18T23:35:39.074
 FORS2_IMG_CALSKY322.14.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.271200 FORS2     IMG       FORS2.1999-11-18T23:36:55.769
 FORS2_IMG_CALSKY322.15.fits                60.A-9203(C)    CALIB      1275512029  -142440012             7.000800 FORS2     IMG       FORS2.1999-11-18T23:37:40.366
 FORS2_IMG_CALSKY322.16.fits                60.A-9203(C)    CALIB      1275499058  -142440012            12.144100 FORS2     IMG       FORS2.1999-11-18T23:38:43.883
 FORS2_IMG_CALSKY322.17.fits                60.A-9203(C)    CALIB      1275486087  -142440012            15.952000 FORS2     IMG       FORS2.1999-11-18T23:39:52.849
 FORS2_IMG_CALSKY322.18.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.268200 FORS2     IMG       FORS2.1999-11-18T23:41:15.341
 FORS2_IMG_CALSKY322.19.fits                60.A-9203(C)    CALIB      1275537970  -142440012             0.268200 FORS2     IMG       FORS2.1999-11-18T23:42:05.544
 FORS2_IMG_CALSKY322.21.fits                60.A-9203(C)    TEST       1275525000  -142440012             0.271200 FORS2     IMG       FORS2.1999-11-18T23:44:47.599
 FORS2_IMG_CALSKY322.22.fits                60.A-9203(C)    CALIB      1275537970  -142440012            17.505000 FORS2     IMG       FORS2.1999-11-18T23:45:29.734
 FORS2_IMG_CALSKY322.23.fits                60.A-9203(C)    CALIB      1275550941  -142440012            31.925000 FORS2     IMG       FORS2.1999-11-18T23:46:41.829
 FORS2_IMG_CALSKY322.24.fits                60.A-9203(C)    CALIB      1275563912  -142440012            40.984600 FORS2     IMG       FORS2.1999-11-18T23:48:08.720
 FORSFieldAcq323.fits                       NULL            NULL       1259624998   -61530012            20.000000 NULL      NULL      FORS2.1999-11-19T00:22:55.928
 FORSFieldAcq323.1.fits                     NULL            NULL      -2147483648 -2147483648            20.000000 NULL      NULL      FORS2.1999-11-19T00:25:24.098
 FORS2_MOS_SPEC323.1.fits                   60.A-9203(C)    SCIENCE    1259627461   -61558200            19.998400 FORS2     MOS       FORS2.1999-11-19T00:44:46.161
 FORS2_MOS_STD323.fits                      60.A-9203(C)    CALIB      1259627461   -61558200           120.002000 FORS2     MOS       FORS2.1999-11-19T00:47:45.838
 FORSFieldAcq323.2.fits                     60.A-9203(C)    TEST       1259624880   -61530012             9.999900 FORS2     MOS       FORS2.1999-11-19T00:59:41.106
 FORS2_MOS_SLIT323.fits                     60.A-9203(C)    TEST       1259625549   -61530588             0.271600 FORS2     MOS       FORS2.1999-11-19T01:02:14.850
 FORS2_MOS_SLIT323.1.fits                   60.A-9203(C)    TEST       1259625549   -61530588            20.000500 FORS2     MOS       FORS2.1999-11-19T01:08:04.830
 FORS2_MOS_OFF323.fits                      60.A-9203(C)    SCIENCE    1259625549   -61528572             9.999900 FORS2     MOS       FORS2.1999-11-19T01:16:27.728
 FORS2_MOS_OFF323.1.fits                    60.A-9203(C)    SCIENCE    1259625546   -61526592             9.999300 FORS2     MOS       FORS2.1999-11-19T01:19:45.019
 FORS2_MOS_OFF323.2.fits                    60.A-9203(C)    SCIENCE    1259625542   -61521588             9.996200 FORS2     MOS       FORS2.1999-11-19T01:21:06.932
 FORS2_MOS_SLIT323.2.fits                   60.A-9203(C)    TEST       1259625549   -61528572            20.000000 FORS2     MOS       FORS2.1999-11-19T01:22:37.807
 FORS2_MOS_OFF323.3.fits                    60.A-9203(C)    SCIENCE    1259625546   -61526592            10.000700 FORS2     MOS       FORS2.1999-11-19T01:24:34.207
 FORS2_MOS_OFF323.4.fits                    60.A-9203(C)    SCIENCE    1259625542   -61521588             9.997200 FORS2     MOS       FORS2.1999-11-19T01:26:14.318
 FORS2_MOS_OFF323.5.fits                    60.A-9203(C)    SCIENCE    1259625535   -61511580             9.999300 FORS2     MOS       FORS2.1999-11-19T01:27:38.903
 FORS2_MOS_OFF323.6.fits                    60.A-9203(C)    SCIENCE    1259625549   -61528572             9.997400 FORS2     MOS       FORS2.1999-11-19T01:28:55.305
 FORS2_MOS_STD323.1.fits                    60.A-9203(C)    CALIB      1259625549   -61528572            20.006700 FORS2     MOS       FORS2.1999-11-19T01:30:34.475
 FORS2_MOS323.fits                          60.A-9203(C)    SCIENCE    1259625549   -61528572            19.996900 FORS2     MOS       FORS2.1999-11-19T01:31:56.046
 FORS2_STD323.fits                          60.A-9203(C)    CALIB      1119577500   -38788992             7.001500 FORS2     IMG       FORS2.1999-11-19T01:39:27.875
 FORS2_STD323.1.fits                        60.A-9203(C)    CALIB      1119577500   -38788992             8.999200 FORS2     IMG       FORS2.1999-11-19T01:40:39.102
 FORS2_STD323.2.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            10.000100 FORS2     IMG       FORS2.1999-11-19T01:41:54.662
 FORS2_STD323.3.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            10.000200 FORS2     IMG       FORS2.1999-11-19T01:43:11.313
 FORS2_STD323.4.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            29.996400 FORS2     IMG       FORS2.1999-11-19T01:44:50.622
 FORS2_STD323.5.fits                        60.A-9203(C)    CALIB      1119577500   -38788992            10.000100 FORS2     IMG       FORS2.1999-11-19T01:46:26.004
 FORS2_STD323.6.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             6.991900 FORS2     IMG       FORS2.1999-11-19T01:51:41.609
 FORS2_STD323.7.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             9.999600 FORS2     IMG       FORS2.1999-11-19T01:52:53.207
 FORS2_STD323.8.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             9.996100 FORS2     IMG       FORS2.1999-11-19T01:54:09.431
 FORS2_STD323.9.fits                        60.A-9203(C)    CALIB      1202730001    -1308996             9.996500 FORS2     IMG       FORS2.1999-11-19T01:55:23.934
 FORS2_STD323.10.fits                       60.A-9203(C)    CALIB      1202730001    -1308996            29.004800 FORS2     IMG       FORS2.1999-11-19T01:57:03.686
 FORS2_STD323.11.fits                       60.A-9203(C)    CALIB      1202730001    -1308996            29.997900 FORS2     IMG       FORS2.1999-11-19T01:58:33.620
 FORS2_STD323.12.fits                       60.A-9203(C)    CALIB       138314998    19122984             7.002600 FORS2     IMG       FORS2.1999-11-19T02:03:57.156
 FORS2_STD323.13.fits                       60.A-9203(C)    CALIB       138314998    19122984            10.000400 FORS2     IMG       FORS2.1999-11-19T02:05:07.063
 FORS2_STD323.14.fits                       60.A-9203(C)    CALIB       138314998    19122984            10.003100 FORS2     IMG       FORS2.1999-11-19T02:06:21.085
 FORS2_STD323.15.fits                       60.A-9203(C)    CALIB       138314998    19122984             9.996500 FORS2     IMG       FORS2.1999-11-19T02:07:35.656
 FORS2_STD323.16.fits                       60.A-9203(C)    CALIB       138314998    19122984            29.987200 FORS2     IMG       FORS2.1999-11-19T02:09:15.003
 FORSFieldAcq323.3.fits                     60.A-9203(C)    TEST         50752681  -260875872             5.002400 FORS2     MOS       FORS2.1999-11-19T02:14:52.856
 FORS2_MOS_SLIT323.3.fits                   60.A-9203(C)    TEST         50754186  -260876807             4.992300 FORS2     MOS       FORS2.1999-11-19T02:18:06.991
 FORS2_MOS_SLIT323.4.fits                   60.A-9203(C)    TEST         50754186  -260876807             5.004400 FORS2     MOS       FORS2.1999-11-19T02:20:38.162
 FORS2_MOS323.1.fits                        60.A-9203(C)    SCIENCE      50754186  -260876807          2699.892200 FORS2     MOS       FORS2.1999-11-19T02:22:05.625
 FORSFieldAcq323.4.fits                     60.A-9203(C)    TEST         50754186  -260876807            20.006500 FORS2     MXU       FORS2.1999-11-19T03:32:49.005
 FORSFieldAcq323.5.fits                     60.A-9203(C)    TEST        333505303  -175449348            19.997900 FORS2     MXU       FORS2.1999-11-19T03:36:18.733
 FORS2_MXU323.fits                          60.A-9203(C)    TEST        333504212  -175449384            19.997600 FORS2     LSS       FORS2.1999-11-19T03:38:54.216
 FORS2_ECH_MOVE323.fits                     60.A-9203(C)    SCIENCE     333504212  -175449312          1799.927700 FORS2     ECH       FORS2.1999-11-19T03:41:47.924
 FORS2_MXU323.1.fits                        60.A-9203(C)    TEST        333504219  -175433472            20.008000 FORS2     LSS       FORS2.1999-11-19T04:21:28.304
 FORS2_MXU323.2.fits                        60.A-9203(C)    TEST        333504226  -175418460            19.998800 FORS2     LSS       FORS2.1999-11-19T04:23:21.082
 FORSFieldAcq323.6.fits                     60.A-9203(C)    TEST        333505303  -175449348            18.998400 FORS2     MXU       FORS2.1999-11-19T04:28:36.583
 FORS2_MXU323.3.fits                        60.A-9203(C)    TEST        333504489  -175449348            19.996200 FORS2     LSS       FORS2.1999-11-19T04:31:13.091

Nov 24, 99 17:19 Page 2/4

CD.1999-11-18

Printed by

FORS 2 2/4

CD.1999-11-18

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_ECH_MOVE323.1.fits                   60.A-9203(C)    SCIENCE     333504489  -175449420           169.608400 FORS2     ECH       FORS2.1999-11-19T04:34:18.968
 FORS2_ECH_MOVE323.2.fits                   60.A-9203(C)    SCIENCE     333504489  -175451760          1799.926200 FORS2     ECH       FORS2.1999-11-19T04:41:39.296
 FORS2_ECH_MOVE323.3.fits                   60.A-9203(C)    SCIENCE     333504482  -175467528          1799.932000 FORS2     ECH       FORS2.1999-11-19T05:13:40.369
 FORS2_STD323.17.fits                       60.A-9203(C)    CALIB       399840001    -1958004             7.004600 FORS2     IMG       FORS2.1999-11-19T05:52:16.833
 FORS2_STD323.18.fits                       60.A-9203(C)    CALIB       399840001    -1958004            10.000000 FORS2     IMG       FORS2.1999-11-19T05:53:27.362
 FORS2_STD323.19.fits                       60.A-9203(C)    CALIB       399840001    -1958004             9.997300 FORS2     IMG       FORS2.1999-11-19T05:54:41.658
 FORS2_STD323.20.fits                       60.A-9203(C)    CALIB       399840001    -1958004             9.998900 FORS2     IMG       FORS2.1999-11-19T05:55:56.444
 FORS2_STD323.21.fits                       60.A-9203(C)    CALIB       399840001    -1958004            29.997900 FORS2     IMG       FORS2.1999-11-19T05:57:36.465
 FORS2_IMG323.fits                          60.A-9203(C)    SCIENCE     410760000  -250305011           119.992400 FORS2     IMG       FORS2.1999-11-19T06:05:07.417
 FORSFieldAcq323.7.fits                     60.A-9203(C)    TEST        437709628    55619280            59.995400 FORS2     MOS       FORS2.1999-11-19T06:13:24.648
 FORSFieldAcq323.8.fits                     60.A-9203(C)    TEST        273650248  -238990032             9.999400 FORS2     LSS       FORS2.1999-11-19T06:22:57.326
 FORSFieldAcq323.9.fits                     60.A-9203(C)    TEST        273650248  -238990032             9.996800 FORS2     LSS       FORS2.1999-11-19T06:32:33.158
 FORSFocfAcq323.1.fits                      60.A-9203(C)    TEST        273650248  -238990032            49.995100 FORS2     LSS       FORS2.1999-11-19T06:34:23.416
 FORSFieldAcq323.10.fits                    60.A-9203(C)    TEST        273666996  -238989923             5.425500 FORS2     LSS       FORS2.1999-11-19T06:39:06.636
 FORSFocfAcq323.2.fits                      60.A-9203(C)    TEST        273666996  -238989923            49.995400 FORS2     LSS       FORS2.1999-11-19T06:40:51.860
 FORSFieldAcq323.11.fits                    60.A-9203(C)    TEST        273651724  -238989419             9.996800 FORS2     LSS       FORS2.1999-11-19T06:44:57.183
 FORSFocfAcq323.3.fits                      60.A-9203(C)    TEST        273651724  -238989419            50.007500 FORS2     LSS       FORS2.1999-11-19T06:46:48.753
 FORS2_IMG323.1.fits                        60.A-9203(C)    SCIENCE     273651793  -238989384            10.000000 FORS2     IMG       FORS2.1999-11-19T06:50:51.201
 FORS2_LSS323.fits                          60.A-9203(C)    SCIENCE     273651793  -238989384            49.994800 FORS2     LSS       FORS2.1999-11-19T06:52:44.345
 FORSFieldAcq323.12.fits                    60.A-9203(C)    TEST        273719098  -239045076             9.996000 FORS2     HIT       FORS2.1999-11-19T06:58:12.331
 FORSFieldAcq323.13.fits                    60.A-9203(C)    TEST        273719098  -239045076             9.997300 FORS2     HIT       FORS2.1999-11-19T07:02:51.242
 FORSFocfAcq323.4.fits                      60.A-9203(C)    TEST        273719098  -239045076            49.997300 FORS2     HIT       FORS2.1999-11-19T07:04:42.422
 FORSFieldAcq323.14.fits                    60.A-9203(C)    TEST        273725848  -238972355             9.999700 FORS2     HIT       FORS2.1999-11-19T07:16:34.357
 FORSFocfAcq323.5.fits                      60.A-9203(C)    TEST        273725848  -238972355            49.994400 FORS2     HIT       FORS2.1999-11-19T07:18:24.131
 FORSFieldAcq323.15.fits                    60.A-9203(C)    TEST        273733336  -238972355             9.999700 FORS2     HIT       FORS2.1999-11-19T07:23:14.035
 FORSFocfAcq323.6.fits                      60.A-9203(C)    TEST        273733336  -238972355            49.995400 FORS2     HIT       FORS2.1999-11-19T07:25:05.935
 FORS2_IMG323.2.fits                        60.A-9203(C)    SCIENCE     273726907  -238972248            10.004000 FORS2     IMG       FORS2.1999-11-19T07:28:41.231
 FORS2_HIT_SLIT323.fits                     60.A-9203(C)    TEST        273726907  -238972248            49.997200 FORS2     HIT       FORS2.1999-11-19T07:30:33.064
 FORS2_IMG323.3.fits                        60.A-9203(C)    SCIENCE     437708998    55619280           599.978400 FORS2     IMG       FORS2.1999-11-19T07:39:18.787
 FORS2_IMG323.4.fits                        60.A-9203(C)    SCIENCE     437708998    55619280           299.993100 FORS2     IMG       FORS2.1999-11-19T07:50:30.723
 FORS2_IMG323.5.fits                        60.A-9203(C)    SCIENCE     437708998    55619280           299.992400 FORS2     IMG       FORS2.1999-11-19T07:56:34.695
 FORS2_IMG323.6.fits                        60.A-9203(C)    SCIENCE     437708998    55619280           299.992000 FORS2     IMG       FORS2.1999-11-19T08:02:37.346
 FORS2_IMG323.7.fits                        60.A-9203(C)    SCIENCE     437708998    55619280           299.989300 FORS2     IMG       FORS2.1999-11-19T08:08:40.627
 FORSFieldAcq323.16.fits                    60.A-9203(C)    TEST        437729371    55668276            19.997300 FORS2     LSS       FORS2.1999-11-19T08:17:41.323
 FORSFocfAcq323.7.fits                      60.A-9203(C)    TEST        437729371    55668276            19.996200 FORS2     LSS       FORS2.1999-11-19T08:19:41.441
 FORS2_LSS_SLIT323.fits                     60.A-9203(C)    TEST        437731668    55667772            30.000500 FORS2     LSS       FORS2.1999-11-19T08:24:49.118
 FORS2_LSS323.1.fits                        60.A-9203(C)    SCIENCE     437731671    55667772           899.962700 FORS2     LSS       FORS2.1999-11-19T08:26:41.658
 FORS2_IMG_CALSKY323.fits                   60.A-9203(C)    TEST        598335001   -97209000             2.012200 FORS2     IMG       FORS2.1999-11-19T08:48:22.099
 FORS2_IMG_CALSKY323.1.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.999400 FORS2     IMG       FORS2.1999-11-19T08:53:03.583
 FORS2_IMG_CALSKY323.2.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.995800 FORS2     IMG       FORS2.1999-11-19T08:56:14.268
 FORS2_IMG_CALSKY323.3.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.997400 FORS2     IMG       FORS2.1999-11-19T08:59:21.676
 FORS2_IMG_CALSKY323.4.fits                 60.A-9203(C)    CALIB       598335001   -97198992            54.285600 FORS2     IMG       FORS2.1999-11-19T09:00:06.575
 FORS2_IMG_CALSKY323.5.fits                 60.A-9203(C)    CALIB       598335001   -97188984            44.640900 FORS2     IMG       FORS2.1999-11-19T09:01:55.246
 FORS2_IMG_CALSKY323.6.fits                 60.A-9203(C)    CALIB       598335001   -97179012            34.609800 FORS2     IMG       FORS2.1999-11-19T09:03:34.154
 FORS2_IMG_CALSKY323.7.fits                 60.A-9203(C)    TEST        598335001   -97209000             1.996500 FORS2     IMG       FORS2.1999-11-19T09:05:14.659
 FORS2_IMG_CALSKY323.8.fits                 60.A-9203(C)    CALIB       598335001   -97219008            28.089100 FORS2     IMG       FORS2.1999-11-19T09:06:00.274
 FORS2_IMG_CALSKY323.9.fits                 60.A-9203(C)    CALIB       598334997   -97229016            22.087300 FORS2     IMG       FORS2.1999-11-19T09:07:23.029
 FORS2_IMG_CALSKY323.10.fits                60.A-9203(C)    CALIB       598334997   -97238988            16.769200 FORS2     IMG       FORS2.1999-11-19T09:08:40.098
 FORS2_IMG_CALSKY323.11.fits                60.A-9203(C)    TEST        598335001   -97209000             1.996200 FORS2     IMG       FORS2.1999-11-19T09:10:08.348
 FORS2_IMG_CALSKY323.12.fits                60.A-9203(C)    CALIB       598335001   -97198992            11.198500 FORS2     IMG       FORS2.1999-11-19T09:10:54.105
 FORS2_IMG_CALSKY323.13.fits                60.A-9203(C)    CALIB       598335001   -97188984             8.012000 FORS2     IMG       FORS2.1999-11-19T09:11:59.719
 FORS2_IMG_CALSKY323.14.fits                60.A-9203(C)    CALIB       598335001   -97179012             6.135000 FORS2     IMG       FORS2.1999-11-19T09:13:04.025
 FORS2_IMG_CALSKY323.15.fits                60.A-9203(C)    TEST        598335001   -97209000             2.008600 FORS2     IMG       FORS2.1999-11-19T09:14:27.778
 FORS2_IMG_CALSKY323.16.fits                60.A-9203(C)    CALIB       598335001   -97219008             3.984600 FORS2     IMG       FORS2.1999-11-19T09:15:14.965
 FORS2_IMG_CALSKY323.17.fits                60.A-9203(C)    CALIB       598334997   -97229016             1.956500 FORS2     IMG       FORS2.1999-11-19T09:16:15.200
 FORS2_IMG_CALSKY323.18.fits                60.A-9203(C)    CALIB       598334997   -97238988             3.488600 FORS2     IMG       FORS2.1999-11-19T09:17:13.763
 FORS2_IMG_CALSKY323.19.fits                60.A-9203(C)    TEST        598335001   -97209000             1.995800 FORS2     IMG       FORS2.1999-11-19T09:18:31.729
 FORS2_IMG_CALSKY323.20.fits                60.A-9203(C)    CALIB       598335001   -97198992            13.631500 FORS2     IMG       FORS2.1999-11-19T09:19:18.035
 FORS2_IMG_CALSKY323.21.fits                60.A-9203(C)    CALIB       598335001   -97188984            11.944600 FORS2     IMG       FORS2.1999-11-19T09:20:28.471

Nov 24, 99 17:19 Page 3/4

CD.1999-11-18

Printed by

FORS 2 3/4

CD.1999-11-18

 FRAME_ID                                   PROG_ID         TYPE      RA          DEC         EXPTIME              INS_ID    INS_MODE  PRODUCT_ID

 ------------------------------------------ --------------- --------- ----------- ----------- -------------------- --------- --------- -----------------------------
 FORS2_IMG_CALSKY323.22.fits                60.A-9203(C)    CALIB       598335001   -97179012             8.575600 FORS2     IMG       FORS2.1999-11-19T09:21:35.687
 FORS2_IMG_CAL323.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            98.992400 FORS2     IMG       FORS2.1999-11-19T09:47:56.288
 FORS2_IMG_CAL323.3.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             2.003500 FORS2     IMG       FORS2.1999-11-19T09:52:41.974
 FORS2_IMG_CAL323.5.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           100.004500 FORS2     IMG       FORS2.1999-11-19T09:55:15.990
 FORS2_IMG_CAL323.6.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648            98.993700 FORS2     IMG       FORS2.1999-11-19T09:57:50.041
 FORS2_IMG_CAL323.7.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.996700 FORS2     IMG       FORS2.1999-11-19T10:00:45.880
 FORS2_IMG_CAL323.8.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.999500 FORS2     IMG       FORS2.1999-11-19T10:01:40.235
 FORS2_IMG_CAL323.9.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648             1.998400 FORS2     IMG       FORS2.1999-11-19T10:02:51.696
 FORS2_IMG_CAL323.10.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             1.999100 FORS2     IMG       FORS2.1999-11-19T10:03:46.652
 FORS2_IMG_CAL323.11.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.994200 FORS2     IMG       FORS2.1999-11-19T10:04:57.535
 FORS2_IMG_CAL323.12.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             2.997000 FORS2     IMG       FORS2.1999-11-19T10:05:54.171
 FORS2_IMG_CAL323.13.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999100 FORS2     IMG       FORS2.1999-11-19T10:07:07.495
 FORS2_IMG_CAL323.14.fits                   60.A-9203(C)    CALIB     -2147483648 -2147483648             9.999100 FORS2     IMG       FORS2.1999-11-19T10:08:10.291
 FORS2_ECH_CAL_MOSSCRF323.fits              60.A-9203(C)    CALIB     -2147483648 -2147483648           599.972000 FORS2     ECH       FORS2.1999-11-19T10:12:51.916
 FORS2_ECH_CAL_MOSWAV323.fits               60.A-9203(C)    CALIB     -2147483648 -2147483648           299.983900 FORS2     ECH       FORS2.1999-11-19T10:25:57.319
 FORS2_MOS_CAL323.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648           249.996300 FORS2     MOS       FORS2.1999-11-19T10:34:20.314
 FORS2_MOS_CAL323.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           249.995400 FORS2     MOS       FORS2.1999-11-19T10:39:39.554
 FORS2_MOS_CAL323.2.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           299.981600 FORS2     MOS       FORS2.1999-11-19T10:45:56.758
 FORS2_LSS_CAL323.fits                      60.A-9203(C)    CALIB     -2147483648 -2147483648           124.993000 FORS2     LSS       FORS2.1999-11-19T10:54:13.279
 FORS2_LSS_CAL323.1.fits                    60.A-9203(C)    CALIB     -2147483648 -2147483648           299.981400 FORS2     LSS       FORS2.1999-11-19T10:59:24.538
 FORS2_Sieb.22.fits                         NULL            CALIB     -2147483648 -2147483648             1.997500 FORS2     FREE      FORS2.1999-11-19T11:08:16.670

Nov 24, 99 17:19 Page 4/4

CD.1999-11-18

Printed by

FORS 2 4/4

CD.1999-11-18