Observing Note Book Notes, Links, and Odds and Ends

Close Edit Permalink References

Air Mass HA 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 5.5 6.0 -40 3.1 3.1 3.3 3.6 -35 2.5 2.5 2.6 2.8 3.2 3.8 -30 2.1 2.1 2.2 2.3 2.6 3.0 3.7 -25 1.8 1.8 1.9 2.0 2.2 2.5 3.0 3.9 -20 1.6 1.6 1.7 1.8 1.9 2.2 2.5 3.2 -15 1.4 1.5 1.5 1.6 1.7 1.9 2.2 2.7 3.6 -10 1.3 1.3 1.4 1.4 1.6 1.7 2.0 2.4 3.0 -05 1.2 1.2 1.3 1.3 1.4 1.6 1.8 2.1 2.6 3.5 +00 1.2 1.2 1.2 1.3 1.3 1.5 1.6 1.9 2.3 3.0 +05 1.1 1.1 1.1 1.2 1.3 1.4 1.5 1.8 2.1 2.7 3.8 +10 1.1 1.1 1.1 1.2 1.2 1.3 1.5 1.7 2.0 2.4 3.2 +15 1.0 1.0 1.1 1.1 1.2 1.3 1.4 1.6 1.8 2.2 2.9 +20 1.0 1.0 1.0 1.1 1.1 1.2 1.3 1.5 1.7 2.1 2.6 3.6 +25 1.0 1.0 1.0 1.1 1.1 1.2 1.3 1.4 1.6 1.9 2.4 3.1 +30 1.0 1.0 1.0 1.1 1.1 1.2 1.3 1.4 1.6 1.8 2.2 2.8 3.9 +35 1.0 1.0 1.0 1.1 1.1 1.2 1.3 1.4 1.5 1.8 2.1 2.6 3.4 +40 1.0 1.0 1.0 1.1 1.1 1.2 1.3 1.4 1.5 1.7 2.0 2.4 3.0 +45 1.0 1.0 1.1 1.1 1.1 1.2 1.3 1.4 1.5 1.7 1.9 2.3 2.7 +50 1.1 1.1 1.1 1.1 1.1 1.2 1.3 1.4 1.5 1.7 1.9 2.1 2.5 +55 1.1 1.1 1.1 1.1 1.2 1.2 1.3 1.4 1.5 1.6 1.8 2.1 2.4 +60 1.1 1.1 1.2 1.2 1.2 1.3 1.3 1.4 1.5 1.6 1.8 2.0 2.2 +65 1.2 1.2 1.2 1.2 1.3 1.3 1.4 1.5 1.5 1.7 1.8 1.9 2.1 +70 1.3 1.3 1.3 1.3 1.4 1.4 1.4 1.5 1.6 1.7 1.8 1.9 2.1 +75 1.4 1.4 1.4 1.4 1.5 1.5 1.5 1.6 1.6 1.7 1.8 1.9 2.0 +80 1.5 1.5 1.5 1.6 1.6 1.6 1.6 1.7 1.7 1.8 1.8 1.9 2.0 +85 1.7 1.7 1.7 1.7 1.7 1.7 1.8 1.8 1.8 1.8 1.9 1.9 1.9 +90 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 1.9 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 5.5 6.0 HA

No tags